Oracle® Enterprise Manager

Grid Control Quick Installation Guide

for HP-UX Itanium

10g Release 3 (10.2.0.3)

E10081-01

March 2007

Oracle Enterprise Manager Grid Control Quick Installation Guide for HP-UX Itanium, 10g Release 3 (10.2.0.3)

E10081-01

Copyright © 2007, Oracle. All rights reserved.

The Programs (which include both the software and documentation) contain proprietary information; they are provided under a license agreement containing restrictions on use and disclosure and are also protected by copyright, patent, and other intellectual and industrial property laws. Reverse engineering, disassembly, or decompilation of the Programs, except to the extent required to obtain interoperability with other independently created software or as specified by law, is prohibited.

The information contained in this document is subject to change without notice. If you find any problems in the documentation, please report them to us in writing. This document is not warranted to be error-free. Except as may be expressly permitted in your license agreement for these Programs, no part of these Programs may be reproduced or transmitted in any form or by any means, electronic or mechanical, for any purpose.

If the Programs are delivered to the United States Government or anyone licensing or using the Programs on behalf of the United States Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the Programs, including documentation and technical data, shall be subject to the licensing restrictions set forth in the applicable Oracle license agreement, and, to the extent applicable, the additional rights set forth in FAR 52.227-19, Commercial Computer Software—Restricted Rights (June 1987). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

The Programs are not intended for use in any nuclear, aviation, mass transit, medical, or other inherently dangerous applications. It shall be the licensee's responsibility to take all appropriate fail-safe, backup, redundancy and other measures to ensure the safe use of such applications if the Programs are used for such purposes, and we disclaim liability for any damages caused by such use of the Programs.

Oracle, JD Edwards, and PeopleSoft are registered trademarks of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

The Programs may provide links to Web sites and access to content, products, and services from third parties. Oracle is not responsible for the availability of, or any content provided on, third-party Web sites. You bear all risks associated with the use of such content. If you choose to purchase any products or services from a third party, the relationship is directly between you and the third party. Oracle is not responsible for: (a) the quality of third-party products or services; or (b) fulfilling any of the terms of the agreement with the third party, including delivery of products or services and warranty obligations related to purchased products or services. Oracle is not responsible for any loss or damage of any sort that you may incur from dealing with any third party.

This guide describes how to quickly install Oracle Enterprise Manager Grid Control on HP Itanium systems. It includes information about the following:

- Reviewing Information About This Guide

- System Requirements

- Mounting the Product Disk

- Installing Oracle Enterprise Manager Grid Control

- Other Installation or Upgrade Options

- Documentation Accessibility

Reviewing Information About This Guide

This guide describes how to perform a basic installation of Oracle Enterprise Manager Grid Control into a new database or into an existing database.

Tasks Described in this Guide

The procedures in this guide describe how to:

- Configure your system to support the following installation types:

- "Enterprise Manager Grid Control Using a New Database" installation type, which installs the Management Service, central Management Agent, and Management Repository database on a single host

- "Enterprise Manager Grid Control Using an Existing Database" installation type, which installs the Management Service and central Management Agent on one host, and installs the Management Repository in an existing, qualified database

Note:
For performance reasons, Oracle recommends that you do not install both the Management Service and Management Repository on the same host. Refer to "Hardware Requirements" for more information.

- Add a system to the grid, which installs the central Management Agent on a target host

- Mount the product disk

- Install Grid Control using Oracle Universal Installer's interactive mode

- Find more information about other installation scenarios

Tasks Not Described in This Guide

This guide covers only the basic installation type described above and does not describe how to complete the following tasks:

- Install Grid Control in any non-interactive mode

- Configure your system to support installation of an additional Management Service or Management Agent

- Upgrade an existing installation to the latest version

- Install Grid Control on Real Application Clusters

- Troubleshoot your installation session

- Configure post-installation settings

- Use Enterprise Manager Grid Control

- Require secure communications between all Management Agents and the secure Management Service

Where to Get Additional Installation Information

For more information about installing Oracle Enterprise Manager Grid Control, including tasks not described in this manual, refer to Oracle Enterprise Manager Installation and Basic Configuration, which is available on the product disk. To access this book, use a Web browser to open the index.htm file located in the top-level directory of the installation media, then select the Documentation tab.

Note:
The entire documentation library for Enterprise Manager can be found on the Oracle Technology Network:
http://www.oracle.com/technology/documentation/oem.html

This site may contain later versions of all books, including Oracle Enterprise Manager Installation and Basic Configuration.

System Requirements

The system or systems must meet the minimum hardware and software requirements.

Even though Oracle Universal Installer runs prerequisite checks on your system to verify that it meets the listed requirements, to make sure that prerequisite checks do not fail, you should verify the requirements before running Oracle Universal Installer.

Note:
Only requirements for the Management Service and/or Management Repository host(s) are given here. Management Agent and other requirements can be found in Oracle Enterprise Manager Installation and Basic Configuration.

Hardware Requirements

The system or systems must meet the minimum hardware requirements for hard disk space, available memory, processor speed, and operating memory.

Hard Disk Space Requirements

The hard disk requirements are:

- 9 GB for the "Enterprise Manager Grid Control Using a New Database" installation type

- 6.2 GB for the "Enterprise Manager Grid Control Using an Existing Database" installation type

Available Memory Requirements

The available operating memory requirements for installation are:

- To install "Enterprise Manager Grid Control Using a New Database," a minimum of 1 GB of available operating memory for the host

- To install "Enterprise Manager Grid Control Using an Existing Database," a minimum of 1 GB of available operating memory for the node

Operating Requirements

The hardware requirements to run Enterprise Manager are:

- Minimum of 2 GB of free physical memory for the host running the Management Service

- Minimum of 2 GB of free physical memory for the Management Repository node

Refer to Oracle Enterprise Manager Grid Control Installation and Basic Configuration for recommended CPU and memory allocation for the Management Service and Management Repository for Enterprise Manager deployments of various size.

Software Requirements

The system or systems must meet the minimum software requirements for operating system, packages, and kernel parameters.

Operating System Requirements

The operating system version must be HP-UX 11i V2 (11.23).

Note:
Refer to OracleMetaLink's "Certify and Availability" page for additional information about these platforms.
To determine which version of HP-UX is installed, enter the following command:

# uname -a

HP-UX hostname B.11.23 U ia64 0201599680 unlimited-user license

Note:
The listed kernel versions are only required for the "Enterprise Manager Grid Control Using a New Database" installation type. They are not required if you are using an existing, qualified database for your Management Repository.

Packages Requirements

The packages required for the supported HP-UX versions are listed below:

HP-UX 11i V2 (11.23)

- For installation on HP-UX 11.23, the following packages or later versions are required:

- Patch Bundle for HP-UX 11i V2 (B.11.23), September 2004

- BUNDLE11i, Revision B.11.23.0409.3

- The following patches or later versions are required:

- PHSS_31849:linker + fdp cumulative patch

- PHSS_31852: aC++ Runtime (PA A.03.61)

Kernel Parameters Requirements

The system must have at least the following recommended kernel parameters:

Parameter

Recommended Formula or Value

ksi_alloc_max

32768

max_thread_proc

256

maxdsiz

1073741824

maxdsiz_64bit

2147483648

maxssiz

134217728

maxssiz_64bit

1073741824

maxuprc

3687

msgmap

4098

msgmni

4096

msgseg

32767

msgtql

4096

ncsize

34816

nfile

63488

nflocks

4096

ninode

34816

nkthread

7184

nproc

4096

semmni

4096

semmns

8192

semmnu

4092

semvmx

32767

shmmax

1073741824

shmmni

512

shmseg

120

vps_ceiling

64

Note:

If the current value of any parameters is higher than the value listed in this table, do not change the value for that parameter.

To view the current value or formula of these kernel parameters, and to change them if necessary, follow these steps:

1. Set the DISPLAY environment variable to specify the display of the local system. This is an optional step.
Bourne, Bash or Korn shell:

$ DISPLAY=localhost:0.0; export DISPLAY

C Shell $ setnev DISPLAY localhost: 0.0

2. Start System Administration Manager (SAM) # /usr/sbin/sam

3. Choose the Kernel Configuration area and the Configurable Parameters area.

4. Check the value or formula specified for each of these parameters and if necessary, modify the value or that formula. Refer to the SAM Online Help for more details.

5. Exit from SAM

6. If you modify the value for any of these parameters, you must restart your system.
# /sbin/shutdown -r now

7. After you restart the system, log in and switch to the root user if necessary.

Mounting the Product Disk

On most HP-UX PA-RISC systems, the product disk mounts automatically when you insert it into the drive. If the disk does not mount automatically, follow these steps to mount it manually:

1. Switch user to "root" user:
$ su - root

2. If necessary, enter a command similar to the following to eject the mounted disk, and then remove it from the drive: # / usr/ sbin/ umount/ SD_DVD

3. Insert the disk into the drive.

4. Enter a command similar to the following:
# /usr/sbin/mount -F cdfs -o rr/dev/dsk/cxtyz/SD_DVD. In this exampple, /SD_DVD is the disk mount point directory and /deve/ dsk/ cxtyz is the device name for the disk device. For example, /dev/ dsk/ c0t2d0.

5. If the Oracle Universal Installer prompts you for the location, enter the disk mount point directory path. For example:

- /SD_DVD

Installing Oracle Enterprise Manager Grid Control

Once you have configured your system to meet hardware and software requirements, start Oracle Universal Installer (OUI) and install Grid Control as follows:

1. Start OUI by executing the following commands:

1. Navigate to the home directory by entering the following command:
cd <enter>

2. Enter the following command:
<mounted location>/Disk1/runInstaller

For example: Enter the command as follows:

/SD_DVD/runInstaller

Alternately, you can change directory to the Parent Directory (the root directory where you will install the Oracle home) and specify the full path to the runInstaller script.

2. The following table describes the recommended action for each OUI screen for the first two installation types.
If you need more assistance, click Help on that screen. If you have trouble with the installation, check out the "Troubleshooting" chapter of Oracle Enterprise Manager Grid Control Installation and Basic Configuration.

Installation Screen

Recommended Action

Specify Installation Type

Select one of the installation types provided. The complete installation type is chosen by default.

Specify Installation Location

Specify the "parent" directory location for the installation. All Oracle homes created during installation will be placed as subdirectories under the parent directory.

Language Selection

Select the languages to run Grid Control in. The language you specify here is not the language of the installation session.

Specify Inventory Directory and Credentials

Appears only during the first installation of Oracle products on a system.
Specify the full path of the Oracle Inventory directory. Make sure to select the appropriate operating group.

Product-Specific Prerequisite Checks

Verify that all prerequisite checks succeed.
OUI checks the system to verify that it is configured correctly to support your Oracle software. If you have met all hardware and software requirements in this guide, all of the checks should pass.

If a check fails, review the cause of failure, rectify the problem, and retry the check. You can also choose to manually verify failed checks if you are satisfied that your system meets the requirements.

Specify Configuration

Appears only for the "Enterprise Manager Grid Control Using a New Database" installation type.
Specify the name of the database you want to create, as well as the location to store the Management Repository files. Choose a file location outside of the Oracle home.

Select the OSDBA and OSOPER groups that you are a member of. These memberships are required to grant the SYSDBA and SYSOPER privileges required to create the new database.

Specify Repository Database Configuration

Appears only for the "Enterprise Manager Grid Control Using an Existing Database" installation type.
Specify the database connection details for your existing, qualified database, as well as the locations for the new Management Repository tablespaces.

Specify Optional Configuration

All parameters can be configured through Grid Control after installation.
If you want, set the parameters for email notification, OracleMetaLink credentials, and proxy configuration settings.

Specify Security Options

Appears only for the "Enterprise Manager Grid Control Using a New Database" installation type.
Specify password used to secure the Management Service, as well as passwords to secure the Management Repository Database.

Specify Passwords

Appears only for the "Enterprise Manager Grid Control Using an Existing Database" installation type.
Specify the password used to secure the Management Service, as well as the SYSMAN password.

Summary

Review the information displayed here, then click Install.

Install

This screen displays status information while the product is being installed.

Execute Configuration Scripts

When prompted, read the instructions and run the scripts listed here. You must run the scripts as root from a terminal window.

Configuration Assistants

Displays status information for configuration assistants

End of Installation

Contains important information about your installation, including the URLs configured for your applications. Make a note of these URLs.
The port numbers used in these URLs are recorded in the following file:

$ORACLE_HOME/install/portlist.ini

Other Installation or Upgrade Options

In addition to performing a complete Grid Control installation, either by using the embedded database or an existing, qualified one, you can perform the following other installation or upgrade operations:

- Install an additional Management Service.

- Install Management Agents using the Agent Deployment application. This application is part of the Grid Control installation, and can be used to "push" Management Agents from a central location to one or more target hosts in a single operation.

To initiate a deployment operation, click the Install Agent link on the Grid Control Deployments page. For more details, refer to the "Installing the Management Agent Using Agent Deploy" section in Oracle Enterprise Manager Installation and Basic Configuration.

- Install Management Agents using the agentDownload script. Launch this script on each target host to "pull" files from a central staging location. The requirements for the agentDownload script are:

1. The agentDownload script must have execute permission. After you have downloaded the script, change the file permissions as follows:
chmod +x agentDownload.<os>

2. Ensure that the "jar" command and "wget" is in the system PATH.

To download and run the agentDownload script:

1. Log into the target host.

2. Bring up the browser window.

3. Download the agentDownload script from:
/agentDownload .<OS>">http://mgmthost27.acme.com:4889/agent_download/10.2.0.3.0/<OS>/agentDownload .<OS>

4. Navigate to the directory where the agentDownload script is available.

5. Change the file permissions as follows:
chmod +x agentDownload . <OS>

6. Execute the agentDownload script as follows:
run agentDownload . <OS>

For example:

/agentDownload.linux -b /scratch/agentInstall

You can use the -h option to see the usage details.

- Upgrade a previous, qualified version of Enterprise Manager Grid Control. Existing versions of Enterprise Manager will be automatically detected.

Refer to Oracle Enterprise Manager Grid Control Installation and Basic Configuration for detailed information and instructions on all of the above operations.

Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible, with good usability, to the disabled community. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at http://www.oracle.com/accessibility/.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

TTY Access to Oracle Support Services

Oracle provides dedicated Text Telephone (TTY) access to Oracle Support Services within the United States of America 24 hours a day, seven days a week. For TTY support, call 800.446.2398.

This document includes the following sections:

- Accessibility Instructions

- TTY Access to Oracle Support Services

- Documentation Accessibility

Copyright © 2007, Oracle. All rights reserved.