Table of Contents

10g Release 2 (10.2.0.2)

B31145-01

Contents

Connector Framework Release Notes

- Documentation Description and Access

- Key Features

- Prerequisites

- Installing the Connector Framework

- Uninstalling the Connector Framework

- Configuring and Using the Connector Framework

- Known Issues

- Universal Limitations

- Patches

- EMCLI modify_target Does not Propagate Monitoring Credentials to Agent (Generic Platform)

- VIPCA States that the Interface is Not Public (Linux and Windows Platforms)

- Creating CRS Clone SWLIB COMP fails if "Files to Exclude" Filed is not Empty (Windows Platform)

- Clone Job Does not Exit if Postscript Fails (Windows Platform)

- RAC Issues

- RAC Database Instance Name Becomes Uppercase (Windows Platform)

- File under DB Home Cannot be Removed When Deleting Node from RAC for Windows (Windows Platform)

- API to Remove Membership from a CRS Cluster (Generic Platform)

- RACDeleteNode has Message "Error: Could not Read any NLS Message Catalog!" (Windows Platform)

- DBCA Issues

- DBCA Silent Mode Registers the Database Instance Name in Lowercase (Windows Platform)

- DBCA (Silent) Registers Cluster Database Name in Uppercase when Creating CFS RAC (Generic Platform)

- Password File is not Generated When DBCA Creates or Adds an Instance in Silent Mode (Windows Platform)

- Other Issues

- PERLBIN is not Properly Resolved for Host CMD and Job on Linux OMS to NT Agent (Windows Platform)

- CVU does not Allow Private IP for Public (Generic Platform)

- Documentation Accessibility