Oracle® Database

Quick Installation Guide

10g Release 2 (10.2) for Microsoft Windows (32-Bit)

B14318-01

August 2005

Oracle Database Quick Installation Guide, 10g Release 2 (10.2) for Microsoft Windows (32-Bit)

B14318-01

Copyright © 2005, Oracle. All rights reserved.

The Programs (which include both the software and documentation) contain proprietary information; they are provided under a license agreement containing restrictions on use and disclosure and are also protected by copyright, patent, and other intellectual and industrial property laws. Reverse engineering, disassembly, or decompilation of the Programs, except to the extent required to obtain interoperability with other independently created software or as specified by law, is prohibited.

The information contained in this document is subject to change without notice. If you find any problems in the documentation, please report them to us in writing. This document is not warranted to be error-free. Except as may be expressly permitted in your license agreement for these Programs, no part of these Programs may be reproduced or transmitted in any form or by any means, electronic or mechanical, for any purpose.

If the Programs are delivered to the United States Government or anyone licensing or using the Programs on behalf of the United States Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the Programs, including documentation and technical data, shall be subject to the licensing restrictions set forth in the applicable Oracle license agreement, and, to the extent applicable, the additional rights set forth in FAR 52.227-19, Commercial Computer Software—Restricted Rights (June 1987). Oracle Corporation, 500 Oracle Parkway, Redwood City, CA 94065.

The Programs are not intended for use in any nuclear, aviation, mass transit, medical, or other inherently dangerous applications. It shall be the licensee's responsibility to take all appropriate fail-safe, backup, redundancy and other measures to ensure the safe use of such applications if the Programs are used for such purposes, and we disclaim liability for any damages caused by such use of the Programs.

Oracle, JD Edwards, PeopleSoft, and Retek are registered trademarks of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

The Programs may provide links to Web sites and access to content, products, and services from third parties. Oracle is not responsible for the availability of, or any content provided on, third-party Web sites. You bear all risks associated with the use of such content. If you choose to purchase any products or services from a third party, the relationship is directly between you and the third party. Oracle is not responsible for: (a) the quality of third-party products or services; or (b) fulfilling any of the terms of the agreement with the third party, including delivery of products or services and warranty obligations related to purchased products or services. Oracle is not responsible for any loss or damage of any sort that you may incur from dealing with any third party.

This guide describes how to quickly install the Oracle Database Client product on 32-bit Windows systems. It includes information about the following:

1. Review Information About this Guide

2. Log In to the System with Administrator Privileges

3. Check the Hardware Requirements

4. Check the Software Requirements

5. Install the Oracle Database Software

6. Install Products from the Oracle Database Companion CD

7. What to Do Next

8. Additional Information

9. Documentation Accessibility

1 Review Information About this Guide

This guide describes how to install Oracle Database using the default installation options into a new Oracle home.

Tasks Described in this Guide

The procedures in this guide describe how to:

- Configure your system to support Oracle Database.

- Install the Oracle Database software on a local file system.

- Configure a general-purpose Oracle database that uses the local file system for database file storage.

- Install software from the Oracle Database Companion CD, which improves the performance of Oracle Database on your system.

Results of a Successful Installation

After you successfully install Oracle Database:

- The database that you created and the default Oracle Net listener process are running on the system.

- Oracle Enterprise Manager Database Control and iSQL*Plus are running and can be accessed using a Web browser.

- A single-node version of the Oracle Cluster Synchronization Services (CSS) daemon is running and is configured to start automatically when your system boots.

Tasks Not Described in this Guide

This guide does not describe how to complete the following tasks:

- Installing the software on a system that has an existing Oracle software installation.

- Installing Oracle Clusterware and Oracle Real Application Clusters (RAC).

- Installing Automatic Storage Management (ASM)

- Cloning an Oracle home

- Enabling Enterprise Manager e-mail notifications or automated backups.

- Using alternative storage options such as Automatic Storage Management (ASM) or raw devices for database storage.

Where to Get Additional Installation Information

For more detailed information about installing Oracle Database components, including information about the tasks not described in this guide, see one of the following guides:

- If you are installing the software on a single system or if you want to install Automatic Storage Management (ASM), see Oracle Database Installation Guide for Microsoft Windows (32-Bit).

- If you are installing Oracle Real Application Clusters (RAC), see Oracle Real Application Clusters Installation and Configuration Guide for your platform.

This guide also describes how to install Oracle Clusterware, which is a prerequisite for RAC installations.You can use Oracle Clusterware with single-instance Oracle Database installations as well.

Both of these guides are available on the Oracle Database installation media. To access them, use a Web browser to open the welcome.htm file in the database directory of the DVD, then select the Documentation tab.

For more information about installing Oracle Database Companion CD components, see one of the following guides:

- Oracle Database Companion CD Installation Guide for Microsoft Windows (32-Bit)

- Oracle Database Companion CD Quick Installation Guide for Microsoft Windows (32-Bit)

These guides are available in the companion directory on the Oracle Database installation media.

2 Log In to the System with Administrator Privileges

Log on as a member of the Administrators group to the computer on which to install Oracle components. If you are installing on a Primary Domain Controller (PDC) or a Backup Domain Controller (BDC), log on as a member of the Domain Administrators group.

3 Check the Hardware Requirements

The following hardware components are required for Oracle Database:

Table 1 Hardware Requirements

Requirement

Minimum Value

Physical memory (RAM)

256 MB minimum, 512 MB recommended

Virtual memory

Double the amount of RAM

Disk space

Basic Installation Type total: 2.04 GB

Advanced Installation Types total: 1.94 GB

See Table 2 for details.

Video adapter

256 colors

Processor

550 MHz minimum

3.1 Hard Disk Space Requirements

Table 2 lists the space requirements for NTFS. The starter database requires 1.03 GB of disk space. The figures in this table include the starter database. FAT32 space requirements are slightly larger.

Table 2 Disk Space Requirements for NTFS

Installation Type

TEMP Space

C:\Program Files\Oracle

Oracle Home

Datafiles *

Total

Basic Installation

125 MB

3.1 MB

905 MB

1.03 GB

2.04 GB

Advanced Installation: Enterprise Edition

125 MB

3.1 MB

905 MB **

950 MB **

1.94 GB **

Advanced Installation: Standard Edition

125 MB

3.1 MB

905 MB **

950 MB **

1.94 GB **

Advanced Installation: Personal Edition

125 MB

3.1 MB

905 MB **

950 MB **

1.94 GB **

* Refers to the contents of the admin, flash_recovery_area, and oradata directories in the ORACLE_BASE directory.

** This size can be higher depending on the installation options selected, such as languages or additional components. If you choose to install Oracle Database with automated backups enabled, include at least 2 GB extra for datafile disk space.

See Also:

"About NTFS File System and Windows Registry Permissions" in Oracle Database Platform Guide for Microsoft Windows (32-Bit)

To ensure that the system meets these requirements, follow these steps:

1. Determine the physical RAM size. For a computer using Windows 2003, for example, open System in the Windows Control Panel and select the General tab. If the size of the physical RAM installed in the system is less than the required size, then you must install more memory before continuing.

2. Determine the size of the configured virtual memory (also known as paging file size). For a computer using Windows 2003, for example, open System in the Control Panel, select the Advanced tab, and click Settings in the Performance section. Then select the Advanced tab. The virtual memory is listed in the Virtual Memory section.
If necessary, see your operating system documentation for information about how to configure additional virtual memory.

3. Determine the amount of free disk space on the system. For a computer using Windows 2003, for example, open My Computer, right-click the drive where the Oracle software is to be installed, and choose Properties.

4. Determine the amount of disk space available in the temp directory. This is equivalent to the total amount of free disk space, minus what will be needed for the Oracle software to be installed.
If there is less than 125 MB of disk space available in the temp directory, then first delete all unnecessary files. If the temp disk space is still less than 125 MB, then set the TEMP or TMP environment variable to point to a different hard drive. For a computer using Windows 2003, for example, open System in the Control Panel, select the Advanced tab, and click Environment Variables.

4 Check the Software Requirements

Table 3 lists the software requirements for Oracle Database.

Table 3 Software Requirements

Requirement

Value

System Architecture

Processor: Intel (x86), AMD64, and Intel EM64T

Note: Oracle provides 32-bit (x86), 64-bit (Itanium), and 64-bit (x64) versions of Oracle Database for Windows. The 32-bit database version, which this installation guide describes, runs on the 32-bit version of Windows on either x86 or x64 hardware. Oracle provides limited certification for 32-bit Oracle Database on 64-bit Windows (x64). For additional information, visit OracleMetaLink at:

http://metalink.oracle.com

Operating System

Oracle Database for Windows is supported on the following operating systems:

- Windows 2000 with service pack 1 or later. All editions, including Terminal Services and Microsoft Windows 2000 MultiLanguage Edition (MLE), are supported.

- Windows Server 2003 - all editions

- Windows XP Professional

Windows NT is not supported.

Windows Multilingual User Interface Pack is supported on Windows Server 2003 and Windows XP Professional.

Compiler

Pro*Cobol has been tested and certified with the following two compilers:

- ACUCOBOL-GT version 6.2

- Micro Focus Net Express 4.0

Object Oriented COBOL (OOCOBOL) specifications are not supported.

The following components are supported with the Microsoft Visual C++ .NET 2002 7.0 and Microsoft Visual C++ .NET 2003 7.1 compilers:

- Oracle C++ Call Interface

- Oracle Call Interface

- GNU Compiler Collection (GCC)

- External callouts

- PL/SQL native compilation

- XDK

Note: If you plan to use GNU Compiler Collection as your primary compiler, see "Configuring GNU Compiler Collection as the Primary Compiler" in Oracle Database Installation Guide for Microsoft Windows (32-Bit) for configuration instructions.

Network Protocol

The Oracle Net foundation layer uses Oracle protocol support to communicate with the following industry-standard network protocols:

- TCP/IP

- TCP/IP with SSL

- Named Pipes

5 Install the Oracle Database Software

To install the Oracle Database software:

1. If you are installing Oracle Database on a multihomed computer or a computer that uses multiple aliases, use the System in the Control Panel to create the ORACLE_HOSTNAME system environment variable. Set this variable to point to the host name of the computer on which you are installing Oracle Database.

2. Insert Oracle Database installation media and navigate to the database directory. Alternatively, navigate to the directory where you downloaded or copied the installation files.
Use the same installation media to install Oracle Database on all supported Windows platforms.

3. Double-click setup.exe to start Oracle Universal Installer.

4. In the Welcome window, select either Basic Installation or Advanced Installation, and then answer the prompts as needed.

See Also:

Chapter 1 in Oracle Database Installation Guide for Microsoft Windows (32-Bit) for more information on the Basic and Advanced installation methods

The subsequent windows that appear, which are listed in Table 4, depend on the installation method you have chosen. The order in which the windows appear depends on the options you select.

5. Follow these guidelines to complete the installation:

- Do not install Oracle Database 10g release 2 (10.2) software into an existing Oracle home that contains Oracle9i or earlier software.

- If you install Oracle Database 10g release 2 (10.2) in an Oracle home directory that already contains Oracle Database 10g release 2 (10.2) client software, the listener is not created. To create the listener, install and run Oracle Net Configuration Assistant after the installation. If the Administrator client is installed before Oracle Database, Oracle Net Configuration Assistant is already installed.

- Follow the instructions displayed in the Oracle Universal Installer windows. If you need additional information, click Help.

- When prompted for a password, follow these guidelines:

Make the password be between 4 and 30 characters long.

Use the database character set for the password's characters, which can include the underscore (_), dollar ($), and pound sign (#) characters.

Do not start passwords with a numeral.

Do not use a user name for a password.

Do no use Oracle reserved words for the password.

Do not use change_on_install for the SYS account password.

Do not use manager for the SYSTEM account password.

Do not use sysman for the SYSMAN account password.

Do not use dbsnmp for the DBSNMP account password.

If you choose to use the same password for all the accounts, do not use change_on_install, manager, sysman, or dbsnmp as a password.

Have the password include at least 1 alphabetic, 1 numeric, and 1 punctuation mark character

Do not use simple or obvious words, such as welcome, account, database, and user for the password.

Note:

You must remember the passwords that you specify.

- Do not modify the Java Runtime Environment (JRE) except by using a patch provided by Oracle Support Services. Oracle Universal Installer automatically installs the Oracle-supplied version of the JRE. This version is required to run Oracle Universal Installer and several Oracle assistants.

- If you encounter errors while installing or linking the software, see Appendix G in Oracle Database Installation Guide for Microsoft Windows (32-Bit) for information about troubleshooting.

- If you chose an installation type that runs Database Configuration Assistant and Oracle Net Configuration Assistant in interactive mode, you must provide detailed information about configuring your database and network.

If you need assistance when using the Database Configuration Assistant or Oracle Net Configuration Assistant in interactive mode, click Help on any window.

Note:

If you chose a default installation, Database Configuration Assistant and Oracle Net Configuration Assistant run non-interactively.

6. When the configuration tools finish, click Exit, then click Yes to exit from Oracle Universal Installer.

7. When Oracle Enterprise Manager Database Control opens a Web browser, enter the username and password you created during the installation.
You can log in as SYS, SYSTEM, or SYSMAN. If you log in as SYS, then you must connect AS SYSDBA. Enter the password you specified for the account during installation.

8. Optionally, delete the OraInstalldate_time directory if you want to remove the temporary files that were created during the installation process. The OraInstalldate_time directory holds about 45 MB of files. This directory is created in the location set by the TEMP environment variable setting.
Restarting your computer also removes the OraInstalldate_time directory.

9. See Chapter 4 in Oracle Database Installation Guide for Microsoft Windows (32-Bit) for information about postinstallation tasks that you must complete after you have installed Oracle Database.

Table 4 Oracle Universal Installer Screens

Screen

Recommended Action

Select Installation Method

Select one of the following, then click Next:

- Basic Installation: Lets you quickly install Oracle Database using minimal input. It installs the software and optionally creates a general-purpose database using the information that you specify on this window.

- Advanced Installation: Lets you perform more complex installations, such as creating individual passwords for different accounts, creating specific types of starter databases (for example, for transaction processing or data warehouse systems), using different language groups, specifying e-mail notifications, and so on.

Select Installation Type

Select Enterprise Edition, Standard Edition, Personal Edition, or Custom. Click Next.

Specify Home Details

In the Destination section, accept the default values or enter the Oracle home name and directory path in which to install Oracle components. The directory path should not contain spaces.

Click Next.

Available Product Components

If you selected Custom for the Installation Type, this window appears. Select from the list and click Next. To learn more about each component, position the mouse over the component's name.

Product-specific Prerequisite Checks

This window checks that your system meets the minimum requirements for the installation. Click Next.

Upgrade an Existing Database

If you have a previous updatable version of Oracle Database or Automatic Storage Management installed, this window appears. For in-place database installations where Automatic Storage Management is running, ASM is upgraded automatically.

Click Yes if you want to upgrade or No if not. If you click Yes, the Summary window appears next.

For more information on upgrades, refer to Oracle Database Upgrade Guide.

Select Configuration Option

Select one of the following:

- Create a database: Select this option if you are creating a database using the following database types: General purpose, Transaction processing, Data warehousing. The Advanced option starts Database Configuration Assistant for advanced database creation configuration options.

- Configure Automatic Storage Management (ASM): Select this option to create an Automatic Storage Management instance only. To create an ASM instance, you must provide an ASM SYS Password. After you provide this password, Oracle Universal Installer lets you create an ASM disk group. After you complete this Oracle Universal Installer session, you can run it again to install and configure one or more Oracle databases that will use ASM.

- Install database Software only: Select this option to install the database software only but not create a database or configure Automatic Storage Management.

Select ASM Management Option

If you selected Configure Automatic Storage Management (ASM) from the Select Configuration Option window, and if you have Oracle Enterprise Manager 10g Grid Control installed, this window appears. Select Yes or No, depending on if you want to use Grid Control to manage Automatic Storage Management. If you select Yes, then select from the list of Enterprise Management agents to use.

Configure Automatic Storage Management

Appears if you selected Configure Automatic Storage Management (ASM) from the Select Configuration Option window. Enter the disk group name. The disk group list shows both candidate and member disks; you can click Show Candidates or Show All to filter their display. Then select the disk group's redundancy level and its member disks.

For Redundancy Level, choose one of the following. The default is normal redundancy.

- High: The contents of the disk group are three-way mirrored by default. To create a disk group with high redundancy, specify at least three failure groups (a minimum of three devices).

- Normal: By default the datafiles of the disk group are two-way mirrored and the control files are three-way mirrored. You can create certain files that are three-way mirrored or not mirrored. To create a disk group with normal redundancy, specify at least two failure groups (a minimum of two devices) for two-way mirroring.

- External: ASM does not mirror the contents of the disk group. Choose this option when 1) the disk group contains devices, such as RAID devices, that provide their own data protection; or 2) the database does not require uninterrupted access to data, for example, if you have a suitable backup strategy already in place.

Select Database Configuration

Select the database configuration that best meets your needs: General Purpose, Transaction Processing, Data Warehouse; Advanced.

See the online help provided by either Oracle Universal Installer or Database Configuration Assistant for a description of these preconfigured database types.

Click Next.

6 Install Products from the Oracle Database Companion CD

The Oracle Database Companion CD contains products that improve the performance of or complement Oracle Database. For most installations, Oracle recommends that you install Oracle Database 10g Products from the Companion CD.

See Also:

- Oracle Database Companion CD Installation Guide for Microsoft Windows (32-Bit)

- Oracle Database Companion CD Quick Installation Guide for Microsoft Windows (32-Bit)

7 What to Do Next

To become familiar with this release of Oracle Database, Oracle suggests that you complete the following tasks:

- Log in to Oracle Enterprise Manager Database Control using a Web browser.

Oracle Enterprise Manager Database Control is a Web-based application that you can use to manage a single Oracle database. The default URL for Database Control is:

http://host.domain:port/em/

Log in with the user name SYSMAN. Use the password that you specified for this user during the Oracle Database installation.

- See Chapter 4 of Oracle Database Installation Guide for Microsoft Windows (32-Bit) for information about required and optional postinstallation tasks, depending on the components that you want to use.

- Review Chapter 5 of Oracle Database Installation Guide for Microsoft Windows (32-Bit) for information about how to get started using Oracle Database.

- Read Oracle Database 2 Day DBAOracle Database 2 Day DBA guide, to learn more about using Oracle Enterprise Manager Database Control to administer a database.

This guide, designed for new Oracle DBAs, describes how to use Oracle Enterprise Manager Database Control to manage all aspects of an Oracle database installation. It also provides information about how to enable e-mail notifications and automated backups, which you might not have configured during the installation.

8 Additional Information

This section contains information about the following:

- Product Licenses

- Purchasing Licenses, Version Updates, and Documentation

- Contacting Oracle Support Services

- Locating Product Documentation

Product Licenses

You are welcome to install and evaluate the products included in this media pack for 30 days under the terms of the Trial License Agreement. However, you must purchase a program license if you want to continue using any product after the 30 day evaluation period. See the following section for information about purchasing program licenses.

See Also:

Oracle Database Licensing Information

Purchasing Licenses, Version Updates, and Documentation

You can purchase program licenses, updated versions of Oracle products, and printed versions of Oracle documentation from the Oracle Store Web site:

http://oraclestore.oracle.com/

Contacting Oracle Support Services

If you have purchased Oracle Product Support, you can call Oracle Support Services for assistance 24 hours a day, seven days a week. For information about purchasing Oracle Product Support or contacting Oracle Support Services, go to the Oracle Support Services Web site:

http://www.oracle.com/support/

Locating Product Documentation

Documentation for Oracle products is available in both HTML and Adobe portable document format (PDF) formats from several locations:

- On disks in the media pack:

- Platform-specific documentation is available on the installation media. To access the documentation, see the welcome.htm file located in the top-level directory of the DVD.

- Generic product documentation is available on the Oracle Documentation Library on the DVD.

- From the Oracle Technology Network Web site:

http://www.oracle.com/technology/documentation/

To view PDF documents, download the free Adobe Acrobat Reader from the Adobe Web site, if necessary:

http://www.adobe.com/

9 Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible, with good usability, to the disabled community. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at

http://www.oracle.com/accessibility/

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

TTY Access to Oracle Support Services

Oracle provides dedicated Text Telephone (TTY) access to Oracle Support Services within the United States of America 24 hours a day, seven days a week. For TTY support, call 800.446.2398.

This document includes the following sections:

- Accessibility Instructions - Delete This Section After Reading

- TTY Access to Oracle Support Services

- Documentation Accessibility

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2016, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Alpha and Beta Draft Documentation Notice

If this document is in preproduction status:

This documentation is in preproduction status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.

Private Alpha and Beta Draft Documentation Notice

If this document is in private preproduction status:

The information contained in this document is for informational sharing purposes only and should be considered in your capacity as a customer advisory board member or pursuant to your beta trial agreement only. It is not a commitment to deliver any material, code, or functionality, and should not be relied upon in making purchasing decisions. The development, release, and timing of any features or functionality described in this document remains at the sole discretion of Oracle.

This document in any form, software or printed matter, contains proprietary information that is the exclusive property of Oracle. Your access to and use of this confidential material is subject to the terms and conditions of your Oracle Master Agreement, Oracle License and Services Agreement, Oracle PartnerNetwork Agreement, Oracle distribution agreement, or other license agreement which has been executed by you and Oracle and with which you agree to comply. This document and information contained herein may not be disclosed, copied, reproduced, or distributed to anyone outside Oracle without prior written consent of Oracle. This document is not part of your license agreement nor can it be incorporated into any contractual agreement with Oracle or its subsidiaries or affiliates.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.