Oracle® Database

Quick Installation Guide

11g Release 1 (11.1) for Microsoft Windows x64

B32305-05

August 2010

This guide describes how to quickly install the Oracle Database product on Windows x64 systems. It includes information about the following:

1. Review Information About this Guide

2. Log On to the System with Administrator Privileges

3. Check the Hardware Requirements

4. Check the Software Requirements

5. Web Browser Support

6. Install the Oracle Database Software

7. Installing Oracle Database Examples

8. What to Do Next?

9. Additional Information

10. Documentation Accessibility

1 Review Information About this Guide

This guide describes how to install Oracle Database using the default installation options into a new Oracle home.

Tasks Described in this Guide

The procedures in this guide describe how to:

- Configure your system to support Oracle Database.

- Install the Oracle Database software on a local file system.

- Configure a general-purpose Oracle database that uses the local file system for database file storage.

Results of a Successful Installation

After you successfully install Oracle Database:

- The database that you created and the default Oracle Net listener process are running on the system.

- Oracle Enterprise Manager Database Control is running and can be accessed using a Web browser.

- A single-node version of the Oracle Cluster Synchronization Services daemon is running and is configured to start automatically when your system boots.

Tasks Not Described in this Guide

This guide covers the Basic Installation scenario and does not describe how to complete the following tasks:

- Installing the software on a system that has an existing Oracle software installation.

- Installing Oracle Clusterware and Oracle Real Application Clusters.

- Installing Automatic Storage Management.

- Cloning an Oracle home.

- Enabling Enterprise Manager e-mail notifications or automated backups.

- Using alternative storage options such as Automatic Storage Management.

Where to Get Additional Installation Information

For more detailed information about installing Oracle Database components, including information about the tasks not described in this guide, see one of the following guides:

- If you are installing the software on a single system or if you want to install Automatic Storage Management , see Oracle Database Installation Guide for Microsoft Windows.

- If you are installing Oracle Real Application Clusters, see Oracle Clusterware Installation Guide for Microsoft Windows and Oracle Real Application Clusters Installation Guide for Microsoft Windows. These guides describe how to install Oracle Clusterware and Oracle Real Application Clusters. Oracle Clusterware is a prerequisite for Oracle Real Application Clusters installations.

All these guides are available on the product media. To access these guides, use a Web browser to open the welcome.htm file located in the top-level directory of the installation media, and then select the Documentation tab.

For information about installing Oracle Database examples, see Oracle Database Examples Installation Guide.

2 Log On to the System with Administrator Privileges

Log on as a member of the Administrators group to the computer on which to install Oracle components. If you are installing on a Primary Domain Controller (PDC) or a Backup Domain Controller (BDC), log on as a member of the Domain Administrators group.

3 Check the Hardware Requirements

The following hardware components are required for installing Oracle Database:

Table 1 Hardware Requirements

Requirement

Minimum Value

Physical memory (RAM)

1 GB minimum

Virtual memory

Double the amount of RAM

Disk space

Total: 5.22 GB

See Table 2 for details.

Processor

AMD64, or Intel Extended memory (EM64T)

Video adapter

256 colors

3.1 Hard Disk Space Requirements

Table 2 lists the space requirements on NTFS. Oracle recommends installing Oracle components on NTFS. NTFS allows for strong security of database files, trace files, incident data, and so on, stored in Oracle home. The starter database requires 720 MB of disk space. The figures in this table include the starter database. FAT32 space requirements are slightly higher.

Table 2 Disk Space Requirements on NTFS

Installation Type

TEMP Space

C:\Program Files\Oracle

Oracle Home

Datafiles *

Total

Basic Installation

125 MB

2 MB

3.1 GB

2.0 GB

5.22 GB

Advanced Installation: All Editions

125 MB

2 MB

3.1 GB **

2.0 GB **

5.22 GB **

* Refers to the contents of the admin, cfgtoollogs, flash_recovery_area, and oradata directories in the ORACLE_BASE directory.

** This size can be higher depending on the installation options selected, such as languages or additional components. If you choose to install Oracle Database with automated backups enabled, include at least 2 GB extra for data file disk space.

See Also:
"About NTFS File System and Windows Registry Permissions" in Oracle Database Platform Guide for Microsoft Windows

To ensure that the system meets these requirements, follow these steps:

1. Determine the physical RAM size. For example, on a Windows 2003 computer, open System in the Windows Control Panel and select the General tab. If the size of the physical RAM installed in the system is less than the required size, then you must install more memory before continuing.

2. Determine the size of the configured virtual memory (also known as paging file size). For example, on a Windows 2003 computer, open System, select the Advanced tab, and click Settings in the Performance section. Then select the Advanced tab. The virtual memory is listed in the Virtual Memory section.
If necessary, see your operating system documentation for information about how to configure additional virtual memory.

3. Determine the amount of free disk space on the system. For example, on a Windows 2003 computer, open My Computer, right-click the drive where the Oracle software is to be installed, and choose Properties.

4. Determine the amount of disk space available in the temp directory. This is equivalent to the total amount of free disk space, minus what will be needed for the Oracle software to be installed.
If there is less than 125 MB of disk space available in the temp directory, then first delete all unnecessary files. If the temp disk space is still less than 125 MB, then set the TEMP or TMP environment variable to point to a different hard drive. For example, on a Windows 2003 computer, open System, select the Advanced tab, and click Environment Variables.

4 Check the Software Requirements

Table 3 lists the software requirements for Oracle Database.

Table 3 Software Requirements

Requirement

Value

System Architecture

Processor: AMD64, or Intel EM64T

Note: Oracle provides 32-bit (x86) and 64-bit (x64) versions of Oracle Database for Microsoft Windows. The 64-bit (x64) database version, which this installation guide describes, runs on the 64-bit version of Windows on AMD64 and EM64T hardware. Oracle provides limited certification for 32-bit Oracle Database Client on 64-bit Windows (x64). For additional information, visit My Oracle Support (formerly OracleMetaLink) at:

https://support.oracle.com

Operating System

Oracle Database for Windows x64 is supported on the following operating systems:

- Windows Server 2003 - all x64 editions

- Windows Server 2003 R2 - all x64 editions

- Windows XP Professional x64 Edition

- Windows Vista x64 - Business, Enterprise, and Ultimate editions

Windows Multilingual User Interface Pack is supported on Windows Server 2003, Windows Server 2003 R2, Windows XP Professional, and Windows Vista.

Compiler

Pro*Cobol is supported with Micro Focus Net Express 5.0.

The following components are supported with the Windows 2003 Microsoft Platform SDK (or later) and Intel compiler version 8.1:

- Oracle C++ Call Interface

- Oracle Call Interface

- External callouts

- Pro*C

- XDK

Microsoft Visual C++ 8 (Visual Studio 2005) is supported for Oracle C++ Call Interface. GNU Compiler Collection (GCC) and Object Oriented COBOL (OOCOBOL) specifications are not supported.

OCCI libraries are installed under ORACLE_BASE\ORACLE_HOME\oci\lib\msvc\vc8. When developing OCCI applications with MSVC++ 8.0, ensure that the OCCI libraries are correctly selected from this directory for linking and executing.

Network Protocol

The Oracle Net foundation layer uses Oracle protocol support to communicate with the following industry-standard network protocols:

- TCP/IP

- TCP/IP with SSL

- Named Pipes

Oracle Database Client

If you plan to connect to Oracle Database 11g Release 1 (11.1) from a release of Oracle Database Client that is earlier than 11g Release 1 (11.1), the following conditions apply:

- Oracle Database Client is version 9.2.0.4 or higher. See Note 207303.1 on My Oracle Support (formerly OracleMetaLink) for more details and up to date information.

- If the earlier Oracle Database Client is running on the same computer as Oracle Database 11g Release 1 (11.1), a bequeath connection cannot be used.

Oracle recommends upgrading Oracle Database Client to the latest patchset (9.2.0.8, 10.2.0.5, or later). You can download the patchset from the Patches and Updates section of My Oracle Support (formerly OracleMetaLink) at:

https://support.oracle.com

5 Web Browser Support

The following Web browsers are supported for Oracle Enterprise Manager Database Control:

- Netscape Navigator 7.2

- Netscape Navigator 8.1

- Mozilla version 1.7

- Microsoft Internet Explorer 6.0 SP2

- Microsoft Internet Explorer 7.0 or later

- Firefox 1.0.4

- Firefox 1.5

- Firefox 2.0

Note:
Microsoft Internet Explorer 7.0 is the only web browser certified on Windows Vista.

6 Install the Oracle Database Software

To install the Oracle Database software:

Note:
If you run Oracle Universal Installer when Windows Scheduler jobs are running, then you may encounter unexplained installation problems if your Windows Scheduler job is performing cleanup, and temporary files are deleted before the installation is finished. Oracle recommends that you complete installation before the Windows Scheduler jobs are run, or disable Windows Scheduler jobs that perform cleanup of temporary files until after the installation is completed.

1. If you are installing Oracle Database on a multihomed computer or a computer that uses multiple aliases, use the System in the Control Panel to create the ORACLE_HOSTNAME system environment variable. Set this variable to point to the host name of the computer on which you are installing Oracle Database.

2. Insert Oracle Database installation media and navigate to the database directory. Alternatively, navigate to the directory where you downloaded or copied the installation files.
Use the same installation media to install Oracle Database on all supported Windows platforms.

3. Double-click setup.exe to start Oracle Universal Installer.

4. On the Welcome screen, the Basic Installation is selected by default. If you want to perform an advanced installation, then select Advanced Installation, and then answer the prompts as needed.

See Also:
Chapter 1 in Oracle Database Installation Guide for Microsoft Windows for more information on the Basic and Advanced installation methods

The subsequent windows that appear, which are listed in Table 4, depend on the installation method you have chosen. The order in which the windows appear depends on the options you select.

5. Follow these guidelines to complete the installation:

Note:
If you perform a Custom installation, then ensure that you install only the components covered by your license. You cannot install Standard Edition using Custom installation.

- Do not install Oracle Database 11g Release 1 (11.1) software into an existing Oracle home.

- Follow the instructions displayed in the Oracle Universal Installer screens. If you need additional information, click Help.

- When prompted for a password, follow these guidelines:
Make the password between 8 and 30 characters long.

Use the database character set for the password's characters, which can include the underscore (_), dollar ($), and pound sign (#) characters.

Do not start passwords with a numeral.

Do not use a user name for a password.

Do no use Oracle reserved words for the password.

Do not use change_on_install for the SYS account password.

Do not use manager for the SYSTEM account password.

Do not use sysman for the SYSMAN account password.

Do not use dbsnmp for the DBSNMP account password.

If you choose to use the same password for all the accounts, do not use change_on_install, manager, sysman, or dbsnmp as a password.

Have the password include at least 1 alphabetic, 1 numeric, and 1 punctuation mark character.

Do not use simple or obvious words, such as welcome, account, database, and user for the password.

Note:
You must remember the passwords that you specify.

- Do not modify the Java Runtime Environment (JRE) except by using a patch provided by Oracle Support Services. Oracle Universal Installer automatically installs the Oracle-supplied version of the JRE. This version is required to run Oracle Universal Installer and several Oracle assistants.

- If you encounter errors while installing or linking the software, see Appendix F in Oracle Database Installation Guide for Microsoft Windows for information about troubleshooting.

- If you chose an installation type that runs Database Configuration Assistant and Oracle Net Configuration Assistant in interactive mode, you must provide detailed information about configuring your database and network.
If you need assistance when using the Database Configuration Assistant or Oracle Net Configuration Assistant in interactive mode, click Help on any screen.

Note:
If you chose a default installation, Database Configuration Assistant and Oracle Net Configuration Assistant run non-interactively.

6. When the configuration tools finish, click Exit, then click Yes to exit from Oracle Universal Installer.

7. When Oracle Enterprise Manager Database Control opens in a Web browser, enter the user name and password you created during the installation.
You can log in as SYS, SYSTEM, or SYSMAN. If you log in as SYS, then you must connect AS SYSDBA. Enter the password you specified for the account during installation.

8. Optionally, delete the OraInstalldate_time directory if you want to remove the temporary files that were created during the installation process. The OraInstalldate_time directory holds about 45 MB of files. This directory is created in the location set by the TEMP environment variable setting.
Restarting your computer also removes the OraInstalldate_time directory.

9. See Chapter 4 in Oracle Database Installation Guide for Microsoft Windows for information about postinstallation tasks that you must complete after you have installed Oracle Database.

Table 4 Oracle Universal Installer Screens

Screen

Recommended Action

Select a Product to Install

This screen enables you to install any one for the following products:

- Oracle Database 11g

- Oracle Client

- Oracle Clusterware

Click Next.

Select Installation Method

Select one of the following, then click Next:

- Basic Installation: This installation method, selected by default, lets you quickly install Oracle Database using minimal input. It installs the software and optionally creates a general-purpose database using the information that you specify on this screen.

- Advanced Installation: Lets you perform more complex installations, such as creating individual passwords for different accounts, creating specific types of starter databases (for example, for transaction processing or data warehouse systems), using different language groups, specifying e-mail notifications, and so on.

Select Installation Type

Select Enterprise Edition, Standard Edition, Personal Edition, or Custom.

Click Next.

Specify Home Details

The Oracle base path appears by default. You can change the path based on your requirement.

In the Software Location section, accept the default values or enter the Oracle home name and directory path in which you want to install Oracle components. The directory path should not contain spaces.

Click Next.

Available Product Components

If you selected Custom for the Installation Type, this screen is displayed. Select the components to be installed from the list and click Next. To learn more about each component, place the mouse over the component name.

Product-specific Prerequisite Checks

This screen checks that the system meets the minimum requirements for the installation. Correct any errors that Oracle Universal Installer may have found, and then click Next.

Upgrade an Existing Database

This screen is displayed if you have a previous updatable version of Oracle Database or Automatic Storage Management installed. For in-place database installations where Automatic Storage Management is running, Automatic Storage Management is upgraded automatically.

Click Yes if you want to upgrade or No if not. If you click Yes, the Summary screen is displayed.

For more information about upgrades, see Oracle Database Upgrade Guide.

Select Configuration Option

Select one of the following:

- Create a database: Select this option if you are creating a database of the following types: General purpose, Transaction processing, and Data warehousing. The Advanced option lets you perform a custom installation.

- Configure Automatic Storage Management: Select this option to create an Automatic Storage Management instance only. To create an Automatic Storage Management instance, you must provide an Automatic Storage Management SYS Password. After you provide this password, Oracle Universal Installer lets you create an Automatic Storage Management disk group. After you complete this Oracle Universal Installer session, you can run it again to install and configure one or more Oracle databases that will use Automatic Storage Management.

- Install database Software only: Select this option to install the database software only, but not create a database or configure Automatic Storage Management.

Select Automatic Storage Management Option

If you selected Configure Automatic Storage Management from the Select Configuration Option screen, and if you have Oracle Enterprise Manager 11g Grid Control installed, then this screen is displayed. Select Yes or No, depending on the requirement to use Grid Control to manage Automatic Storage Management. If you select Yes, then select from the list of Enterprise Management agents to use.

Configure Automatic Storage Management

If you selected Configure Automatic Storage Management from the Select Configuration Option screen, this screen is displayed. Enter the disk group name. The disk group list shows both candidate and member disks; you can click Show Candidates or Show All to filter their display. Then, select the redundancy level and member disks for the disk group.

For Redundancy Level, choose one of the following options. If you do not choose a redundancy level, the disk group defaults to normal redundancy.

- High: With this option, the contents of the disk group are three-way mirrored by default. To create a disk group with high redundancy, you must specify at least three failure groups (a minimum of three devices).

- Normal: In a normal redundancy level, by default, the data files of the disk group are two-way mirrored and the control files are three-way mirrored. You can choose to create certain files that are three-way mirrored or not mirrored. To create a disk group with normal redundancy, you must specify at least two failure groups (a minimum of two devices) for two-way mirroring.

- External: If you select this option, Automatic Storage Management does not mirror the contents of the disk group. Choose this redundancy level when the disk group contains devices, such as RAID devices, that provide their own data protection; or the use of the database does not require uninterrupted access to data, for example, in a development environment where you have a suitable backup strategy.

Select Database Configuration

Select the database configuration that best meets the requirements: General Purpose / Transaction Processing, Data Warehouse, or Advanced.

See the online Help provided by either Oracle Universal Installer or Oracle Database Configuration Assistant for a description of these preconfigured database types.

Click Next.

7 Installing Oracle Database Examples

If you plan to use the following products or features, then download and install the products from the Oracle Database Examples media:

- Oracle JDBC Development Drivers

- Oracle Database Examples

- Oracle Context Companion

- Various Oracle product demonstrations

For information about installing software and various Oracle product demonstrations from the Oracle Database Examples media, see Oracle Database Examples Installation Guide.

8 What to Do Next?

To become familiar with this release of Oracle Database, Oracle suggests that you complete the following tasks:

- Log in to Oracle Enterprise Manager Database Control using a Web browser.
Oracle Enterprise Manager Database Control is a Web-based application that you can use to manage a single Oracle database. The default URL for Database Control is:

http://host.domain:port/em/

Log in with the user name SYSMAN. Use the password that you specified for this user during the Oracle Database installation.

- See Chapter 4 of Oracle Database Installation Guide for Microsoft Windows for information about required and optional postinstallation tasks, depending on the components that you want to use.

- Review Chapter 5 of Oracle Database Installation Guide for Microsoft Windows for information about how to get started using Oracle Database.

- Read Oracle Database 2 Day DBA guide, to learn more about using Oracle Enterprise Manager Database Control to administer a database.
This guide, designed for new Oracle DBAs, describes how to use Oracle Enterprise Manager Database Control to manage all aspects of an Oracle database installation. It also provides information about how to enable e-mail notifications and automated backups, which you might not have configured during the installation.

9 Additional Information

This section contains information about the following:

- Product Licenses

- Purchasing Licenses, Version Updates, and Documentation

- Contacting Oracle Support Services

- Locating Product Documentation

Product Licenses

You are welcome to install and evaluate the products included in this media pack for 30 days under the terms of the Trial License Agreement. However, you must purchase a program license if you want to continue using any product after the 30 day evaluation period. See the following section for information about purchasing program licenses.

See Also:
Oracle Database Licensing Information

Purchasing Licenses, Version Updates, and Documentation

You can purchase program licenses, updated versions of Oracle products, and printed versions of Oracle documentation from the Oracle Store Web site:

http://oraclestore.oracle.com/

Contacting Oracle Support Services

If you have purchased Oracle Product Support, you can call Oracle Support Services for assistance 24 hours a day, seven days a week. For information about purchasing Oracle Product Support or contacting Oracle Support Services, go to the Oracle Support Services Web site:

http://www.oracle.com/support/

Locating Product Documentation

Documentation for Oracle products is available in both HTML and Adobe portable document format (PDF) formats from several locations:

- On disks in the media pack:

- Platform-specific documentation is available on the installation media. To access the documentation, see the welcome.htm file located in the top-level directory of the installation media.

- Generic product documentation is available on the Oracle Documentation Library.

- From the Oracle Technology Network Web site:

http://www.oracle.com/technology/documentation/

To view PDF documents, download the free Adobe Acrobat Reader from the Adobe Web site, if necessary:

http://www.adobe.com/

10 Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible to all users, including users that are disabled. To that end, our documentation includes features that make information available to users of assistive technology. This documentation is available in HTML format, and contains markup to facilitate access by the disabled community. Accessibility standards will continue to evolve over time, and Oracle is actively engaged with other market-leading technology vendors to address technical obstacles so that our documentation can be accessible to all of our customers. For more information, visit the Oracle Accessibility Program Web site at http://www.oracle.com/accessibility/.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

Access to Oracle Support

Oracle customers have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/support/contact.html or visit http://www.oracle.com/accessibility/support.html if you are hearing impaired.

Oracle Database Quick Installation Guide, 11g Release 1 (11.1) for Microsoft Windows x64

B32305-05

Copyright © 1996, 2010, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this software or related documentation is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, the following notice is applicable:

U.S. GOVERNMENT RIGHTS Programs, software, databases, and related documentation and technical data delivered to U.S. Government customers are "commercial computer software" or "commercial technical data" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, the use, duplication, disclosure, modification, and adaptation shall be subject to the restrictions and license terms set forth in the applicable Government contract, and, to the extent applicable by the terms of the Government contract, the additional rights set forth in FAR 52.227-19, Commercial Computer Software License (December 2007). Oracle USA, Inc., 500 Oracle Parkway, Redwood City, CA 94065.

This software is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications which may create a risk of personal injury. If you use this software in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure the safe use of this software. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software in dangerous applications.

Oracle is a registered trademark of Oracle Corporation and/or its affiliates. Other names may be trademarks of their respective owners.

This software and documentation may provide access to or information on content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2016, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Alpha and Beta Draft Documentation Notice

If this document is in preproduction status:

This documentation is in preproduction status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.

Private Alpha and Beta Draft Documentation Notice

If this document is in private preproduction status:

The information contained in this document is for informational sharing purposes only and should be considered in your capacity as a customer advisory board member or pursuant to your beta trial agreement only. It is not a commitment to deliver any material, code, or functionality, and should not be relied upon in making purchasing decisions. The development, release, and timing of any features or functionality described in this document remains at the sole discretion of Oracle.

This document in any form, software or printed matter, contains proprietary information that is the exclusive property of Oracle. Your access to and use of this confidential material is subject to the terms and conditions of your Oracle Master Agreement, Oracle License and Services Agreement, Oracle PartnerNetwork Agreement, Oracle distribution agreement, or other license agreement which has been executed by you and Oracle and with which you agree to comply. This document and information contained herein may not be disclosed, copied, reproduced, or distributed to anyone outside Oracle without prior written consent of Oracle. This document is not part of your license agreement nor can it be incorporated into any contractual agreement with Oracle or its subsidiaries or affiliates.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.