Oracle® Enterprise Manager Ops Center

Glossary of Icons

12c Release 3 (12.3.2.0.0)

E60734-02

June 2016

Oracle Enterprise Manager Ops Center has a variety of icons to represent an asset, the current state of an asset, and actions. Hover your mouse over an icon to display a tool tip that provides a brief description of the icon. In some cases, a badge icon appears in the corner of asset icon to show the asset's status.

When an icon is grayed out, it means that the feature is not functional for the current scenario or you have not been assigned the role to perform the action.

These are the categories of icons:

- Connectivity Icons

- Message Center Icons

- Monitoring Icons

- Incident Icons

- Hardware Icons

- Operating System Icons

- Boot Environment Icons

- Kernel Icons

- Oracle VM Server Icons

- Badges

- Job Icons

- Library Icons

- Network Icons

- Administration Icons

- Group Icons

- Process Icons

- Oracle SuperCluster Logical Domains Icons

Connectivity Icons

Connectivity icons display the session mode and connectivity. To determine if you run in Connected Mode and have access to My Oracle Support Services, check the icon in the upper right corner of the UI. If an icon is not colored, you are not in connected mode.

Figure 1-1 Session Connectivity Icons

The icons indicate:

- Whether or not Oracle Enterprise Manager Ops Center is connected to the Internet.

- Whether or not Oracle Enterprise Manager Ops Center is connected to the Oracle Knowledge Base.

- Whether or not Oracle Enterprise Manager Ops Center is connected to My Oracle Support Services.

Figure 1-2 Internet Connected

Figure 1-3 Internet Disconnected

Figure 1-4 Knowledge Base Connected

Figure 1-5 Knowledge Base Disconnected

Figure 1-6 My Oracle Support Services Connected

Figure 1-7 My Oracle Support Services Disconnected

Message Center Icons

You can create, view, and manage service requests from the Oracle Enterprise Manager Ops Center user interface.

Figure 1-8 Open Service Requests

Figure 1-9 Service Request Opened By Others

Figure 1-10 My Service Requests

Figure 1-11 Notifications

Figure 1-12 Delete All Notifications

Figure 1-13 My Incidents

Figure 1-14 Unassigned Incidents

Monitoring Icons

Monitoring rules and policies define the monitoring parameters. Monitoring rules define the alerting conditions. Rules are associated with, and determined by, the type of managed resource. Monitoring rules state the values and boundaries for an asset's activity. A monitoring policy defines alert configurations to be performed on one or more managed resources. It contains the information needed to monitor a managed asset with user-defined alert configurations, including defined thresholds and alert monitors.

These are the icons that are associated with monitoring rules and policies.

Figure 1-15 Add Alert Monitoring Rule

Figure 1-16 Deselect All Rules

Figure 1-17 Select All Rules

Figure 1-18 Edit Alert Monitoring Rule

Figure 1-19 Disable Alert Monitoring Rule

Figure 1-20 Delete Alert Monitoring Rule

Figure 1-21 Navigate to Monitoring Policy

Figure 1-22 Applying a Monitoring Policy

Figure 1-23 Extract a Monitoring Policy

Figure 1-24 Create a New Monitoring Policy

Figure 1-25 Copy Monitoring Policy

Figure 1-26 Delete Monitoring Policy

Figure 1-27 Set as Default Policy

Figure 1-28 View Associated Assets

Incident Icons

Incident icons are icons that reflect the current state of the incidents.

Figure 1-29 View Alerts

Figure 1-30 View Annotations

Figure 1-31 View Possible Impacts and Causes

Figure 1-32 View Comments

Figure 1-33 View Suggested Actions

Figure 1-34 Add Annotations

Figure 1-35 Assign Incidents

Figure 1-36 Acknowledge Incident

Figure 1-37 Take Action on Incidents

Figure 1-38 Mark Incident as Repaired

Figure 1-39 Close Incident

Hardware Icons

Hardware icons represent the various types of hardware used to manage the datacenter.

Figure 1-40 Server Icon

Figure 1-41 Blade Icon

Figure 1-42 Chassis Icon

Figure 1-43 CPU Icon

Figure 1-44 Disk Controller Icon

Figure 1-45 Disk Expander

Figure 1-46 Ethernet Port Icon

Figure 1-47 Fan Icon

Figure 1-48 Fan Tray Icon

Figure 1-49 Generic Hardware Icon

Figure 1-50 Hard Disk Icon

Figure 1-51 I/O Board Icon

Figure 1-52 I/O Module Icon

Figure 1-53 Memory Icon

Figure 1-54 Memory Board Icon

Figure 1-55 PCI Icon

Figure 1-56 Power Control Setting Icon

Figure 1-57 Power Supply Setting Icon

Figure 1-58 System Icon

Figure 1-59 Utilization CPU

Figure 1-60 Utilization File System

Figure 1-61 Utilization

Figure 1-62 Utilization IO

Figure 1-63 Utilization Memory

Figure 1-64 Utilization Network

Figure 1-65 Utilization Swap Icon

Figure 1-66 Utilization System Load Icon

Figure 1-67 XSCF Icon

Operating System Icons

Operating system are icons that depict the type of operating system and the actions that are associated with the operating system.

Figure 1-68 Linux Operating System Icon

Figure 1-69 Oracle Solaris Icon

Figure 1-70 Oracle Solaris Cluster Icon

Figure 1-71 Microsoft Windows Icon

Figure 1-72 New Update OS Job

Figure 1-73 Deploy/Update Software

Figure 1-74 Reboot

Figure 1-75 Attach Network

Figure 1-76 Place in Maintenance

Figure 1-77 Update Operating System

Boot Environment Icons

A boot environment is an instance of a bootable Oracle Solaris image plus additional software packages that are installed onto the image, and the set of all file systems and devices (disk slices and mount points) that are required to operate an Oracle Solaris OS instance.

These icons that are associated with Boot Environment.

Figure 1-78 Create New Boot Environment

Figure 1-79 Activate Boot Environment and Reboot

Figure 1-80 Active Boot Environment

Figure 1-81 Active Boot Environment Upon Reboot

Figure 1-82 Delete New Boot Environment

Figure 1-83 Synchronize Boot Environment

Kernel Icons

The kernel is a program that constitutes the central core of a computer operating system. It has complete control over everything that occurs in the system.

Figure 1-84 Tree Node Icon

Oracle VM Server Icons

These are icons that are related to the functions for Oracle VM Server.

Figure 1-85 Oracle VM for x86

Figure 1-86 Oracle VM for SPARC

Figure 1-87 LDOM Server Pool

Figure 1-88 Oracle VM for SPARC Server Pool

Figure 1-89 Global Zone

Figure 1-90 Non-Global Zone

Badges

Badges are special types of icons that appear in the corner of asset icons to show the status of the assets.

Figure 1-91 Critical Badge

Figure 1-92 Warning Badge

Figure 1-93 Info Badge

Figure 1-94 Configure Badge

Figure 1-95 Shutdown Badge

Figure 1-96 Update Badge

Figure 1-97 Lock Badge

Figure 1-98 Unreachable Badge

Figure 1-99 Installation Badge

Job Icons

Every action creates a job. Many jobs can run at the same time and some jobs take longer than others to complete. To follow the progress of a particular job, you can display the job details.

Figure 1-100 All Jobs

Figure 1-101 Jobs In Progress

Figure 1-102 Jobs Waiting For User Input

Figure 1-103 Jobs Stopped

Figure 1-104 Jobs Scheduled

Figure 1-105 Jobs Partially Successful

Figure 1-106 Jobs Suspended

Figure 1-107 Jobs Failed

Figure 1-108 Jobs Successful

Figure 1-109 View Job Details

Figure 1-110 Re-run Selected Jobs

Figure 1-111 Display Selected Target Details

Figure 1-112 Debug Jobs Using OCDoctor

Figure 1-113 Mode Actual

Figure 1-114 Delete Selected Jobs

Library Icons

Libraries store and manage cached data, images, packages, and metadata. A software library stores images for provisioning operations. A Storage Library is a file system on the virtual host's server or it can be accessed through an NFS server or SAN network. Guest configurations for its operating system, data, CPU, memory, and network as metadata are stored in the storage library associated with the virtual host.

Figure 1-115 New Local Software Library

Figure 1-116 New NAS Software Library

Figure 1-117 New SAN Storage Library

Figure 1-118 Set Enterprise Controller Storage Library

Figure 1-119 Move Metadata

Figure 1-120 Add Storage

Figure 1-121 Enable Sharing

Network Icons

Oracle Enterprise Manager Ops Center manages networks for its virtual hosts. Guests in the network communicate with each other or with the Internet through these virtual hosts. Use networks to:

- Manage individual hosts

- Connect hosts to the Proxy Controller

- Allow guests to communicate with each other or with the Internet

- Connect remote JMX with the public API

These are the icons that are associated with Network.

Figure 1-122 Create Network Domain

Figure 1-123 Delete Network Domain

Figure 1-124 Connect Guests

Figure 1-125 Create Public Network

Figure 1-126 Define Network

Figure 1-127 Edit Attributes

Administration Icons

Oracle Enterprise Manager Ops Center provides you with a variety of tools for understanding and managing your datacenter. The Administration icons are associated with actions that you use to configure and manage Oracle Enterprise Manager Ops Center.

The following icons are associated with Administration.

Figure 1-128 Register Enterprise Controller

Figure 1-129 Ops Center Downloads

Figure 1-130 Set Enterprise Controller Storage Library

Figure 1-131 Setup Connection Mode

Figure 1-132 Edit Authentications

Figure 1-133 Proxy Deployment Wizard

Figure 1-134 Configure Local Agent

Figure 1-135 Self Diagnosis

Figure 1-136 Unconfigure Enterprise Controller

Figure 1-137 Change HTTP Proxy

Figure 1-138 Edit Energy Cost

Figure 1-139 Add User

Figure 1-140 DHCP Config

Figure 1-141 Subnets

Figure 1-142 External DHCP Server

Figure 1-143 Navigate to Selected Oracle VM Manager

Figure 1-144 Discover Oracle VM Managers

Figure 1-145 Discover Oracle VM Server

Figure 1-146 Discover File Server

Figure 1-147 Discover iSCSI Storage

Group Icons

Group icons are icons that are associated with administrative structures that organize assets so that you can locate an asset quickly or perform operations on all assets of the same type.

Figure 1-148 Create Group

Figure 1-149 Add Assets to Groups

Figure 1-150 Remove Asset From Group

Figure 1-151 Move Assets to Group

Figure 1-152 Add Attribute Icon

Figure 1-153 Add Rule Icon

Figure 1-154 Delete Attribute Icon

Figure 1-155 Delete Rule Icon

Process Icons

These are icons associated to the processes of Oracle Enterprise Manager Ops Center.

Figure 1-156 CPU Tree Node Icon

Figure 1-157 Memory Tree Node Icon

Figure 1-158 Tree Node Icon

Oracle SuperCluster Logical Domains Icons

Icons for Oracle SuperCluster logical domains.

The following icons are related to Oracle SuperCluster logical domains.

Figure 1-159 SuperCluster Dedicated Domains

Figure 1-160 SuperCluster I/O Domains

Figure 1-161 SuperCluster Root Domains

Oracle® Enterprise Manager Ops Center Glossary of Icons, 12c Release 3 (12.3.2.0.0)

E60734-02

Copyright © 2007, 2016, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2017, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Pre-General Availability Draft Documentation Notice

If this document is in public or private pre-General Availability status:

This documentation is in pre-General Availability status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.

Private Pre-General Availability Draft Documentation Notice

If this document is in private pre-General Availability status:

The information contained in this document is for informational sharing purposes only and should be considered in your capacity as a customer advisory board member or pursuant to your pre-General Availability trial agreement only. It is not a commitment to deliver any material, code, or functionality, and should not be relied upon in making purchasing decisions. The development, release, and timing of any features or functionality described in this document remains at the sole discretion of Oracle.

This document in any form, software or printed matter, contains proprietary information that is the exclusive property of Oracle. Your access to and use of this confidential material is subject to the terms and conditions of your Oracle Master Agreement, Oracle License and Services Agreement, Oracle PartnerNetwork Agreement, Oracle distribution agreement, or other license agreement which has been executed by you and Oracle and with which you agree to comply. This document and information contained herein may not be disclosed, copied, reproduced, or distributed to anyone outside Oracle without prior written consent of Oracle. This document is not part of your license agreement nor can it be incorporated into any contractual agreement with Oracle or its subsidiaries or affiliates.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.