StorageTek Tape Analytics

Quick Start Guide

Version 2.1.0

E58065-02

February 2015

This guide introduces you to Oracle's StorageTek Tape Analytics (STA). It is intended to provide just a sampling of the major STA screens and key features of the user interface.

When you are finished, we hope you will feel confident to explore more of STA on your own. See "Next Steps" and "Related Documents" for additional resources.

Quick Start Tasks

This guide provides step-by-step instructions for the following tasks. These tasks can be performed by anyone with a valid STA username, and they should take about an hour to complete.

- Task 1, "Log In"

- Task 2, "Apply a Dashboard Template"

- Task 3, "Explore the Dashboard"

- Task 4, "Display Information About a Library"

- Task 5, "Display Media Exchanges for a Library"

- Task 6, "Reset a Screen Filter"

- Task 7, "Display Full Details for Selected Exchanges"

- Task 8, "Display Aggregated Drive Data (Drives Analysis)"

- Task 9, "Export Data to a Spreadsheet"

- Task 10, "Display Context-Sensitive Help"

- Task 11, "Log Out"

Before You Begin

Before starting, you need to obtain the following information from your STA administrator:

- Recommended Web browsers and versions for STA. See the STA Requirements Guide for details.

- Web address (URL and port number) of the STA application on your company's network

- Your STA username and password

Note:
Sample screen shots are provided throughout this guide. The data you see is specific to your company, but the layout and organization of the screens should match the samples.

Task 1   Log In

Use the following steps to log into STA.

1. Start a supported web browser on your computer.

2. In the Location Bar or Address field, enter the STA URL and port number given to you by your STA administrator. A typical URL would be something like http://hostname:7021/STA.
The Login screen appears.

3. Enter the STA username and password you have been assigned, and then click Login.
Depending on the preference settings for your STA username, the Accessibility Settings dialog box may appear. STA offers a variety of accessibility features for users with low vision, blindness, color blindness, or other visual impairments. See the STA Screen Basics Guide for details.

4. Click Continue to bypass this dialog box.
The Dashboard appears. The Dashboard is always the first screen displayed whenever you log into STA. As noted above, you will see data specific to your company, but the screen layout should be the same as the following example.

Note:
Do not use your browser's Forward and Back (or Next and Previous) buttons for navigating through the STA screens. The use of these buttons could produce unpredictable results, as the data you see may be stale or out of sync with the data on the STA server.

Task 2   Apply a Dashboard Template

The appearance of most STA screens, including the Dashboard, can be controlled by templates. Templates define a variety of screen display characteristics, including graph and table layouts and filter criteria. See the STA User's Guide for details.

The name of the currently applied template is always displayed in the Templates toolbar.

In this example, the template name is "STA-Default," which is the default Dashboard delivered with the STA application. If a different Dashboard template has been assigned as the default for your STA username, then a different name is displayed here and your Dashboard display varies from the one shown above.

STA comes with several predefined templates that provide you with frequently used information about library components and activity. See the STA User's Guide for details. Use the following steps to apply a predefined template to the Dashboard display.

1. Select the Templates menu.
The menu displays all Dashboard templates that are available to your STA username.

2. In the menu, select STA-Dashboard-Quick-Start.
The template is applied, and the Dashboard display is updated to the following layout.

Task 3   Explore the Dashboard

The STA-Dashboard-Quick-Start template provides you with a high-level view of your tape library system. The Dashboard is divided into multiple panes, each showing a different aspect of your library environment.

- The Library Status, Media Health, Drive Health, and Robot Health panes summarize the current condition of your library system components.

- The Media Watch List and Drives Watch List panes alert you to drives and media that may need attention as soon as possible.

- The Mounts and I/O Throughput panes show line graphs of library activity over the last few hours.

On graphical Dashboard panes, you can display detailed information by moving your mouse over the different sections of the pane. You can also link to other screens from some Dashboard panes. See the STA Screen Basics Guide and the STA User's Guide for details. Use the following steps to explore some of these features.

1. Choose any bar chart, such as the Library Status pane, and move your mouse over the graph to display detailed values for each of the bar chart segments. In this example, rolling over the SL3000 bar reveals there are two SL3000 libraries in a degraded state.

2. Move your mouse over any line graph, such as the Mounts (Hourly) pane, to display detail for each of the data points on the line.

3. The units of measure and scaling of the graphs vary from pane to pane, so be sure to check the labels on each axis. STA adjusts the scaling according to the actual data displayed to show as much detail as possible.
For example, in the following I/O Throughput (Hourly) pane, the vertical axis is labeled "Megabytes," with markers every 3M (three million), from 0M to 14M. Each data point on the line graph, therefore, represents millions of megabytes, which converts to terabytes (TB). The hover text for the selected data point indicates 5,696,455.62 MB Read and Written, which converts to roughly 5.69 TB.

4. Bar chart, pie chart, and area chart segments are active links. In the Robot Health pane, click a bar chart segment.

You are taken to the Library Components – Robots Overview screen, which displays detailed information about the robots included in the bar segment that you clicked—in this example, all robots with a "Use" health.

Task 4   Display Information About a Library

The Navigation Bar is the primary method for moving around the STA screens. It consists of a series of vertical accordion tabs that expand and collapse according to your selections. Use the following steps to display the Libraries –  Overview screen.

1. In the Navigation Bar, the Tape System Hardware tab is expanded because you are currently on a screen within that tab. Select the Libraries Overview link.

The Libraries – Overview screen is displayed. Following is an example of the STA-Default template delivered with the STA application. As with the Dashboard, this screen display may vary if a custom template has been assigned to your STA username as the default.

2. Note that the screen is divided into a Graphics Area at the top and a Table Area below. Most STA Overview screens include these two sections. See the STA Screen Basics Guide for details.
Also note the Status Line at the bottom of the screen. It indicates the following:

- Columns Hidden – it is normal for table columns to be hidden. STA collects hundreds of data attributes for your tape library system, and most screen templates display only a subset. You can selectively show or hide any of the available attributes. See the STA Screen Basics Guide for details.

- Columns Frozen – The first table column is always frozen in position as you scroll to the right on the screen.

- Number of records displayed – In this example, the value displayed indicates that STA is monitoring a tape library system that includes 39 libraries.

3. Select the Templates menu, then select STA-Lib-Quick-Start.

4. This template collapses the Graphics Area display so you can display a longer list in the Table Area.

Task 5   Display Media Exchanges for a Library

Although the Navigation Bar is the primary method of navigation, you can also navigate by using active links that occur throughout the STA screens. On the Libraries – Overview screen, the fields with blue text are active links that allow you to navigate to other screens to see related data. Move the mouse over an entry to see the selection cursor.

The Dismounts column shows the total number of media dismounts that have occurred in each library. Each dismount marks the end of an exchange, in which a piece of media has been mounted in a drive and read/write activity has potentially been performed. The libraries send detailed data to STA as each media move, mount, and dismount occurs, and this data is collected, analyzed, and reported by STA across your entire tape library system. See the STA User's Guide for details.

Use the following steps to view detailed exchange data.

1. Locate a library for which the value in the Dismounts column is greater than zero. This indicates that the library has had some media exchange activity. Click the active link in the Dismounts column.

2. You are taken to the Exchanges Overview screen, which shows detail for media exchanges. The most recent exchanges are at the top of the list. The STA-Default template for this screen, delivered with the STA application, is shown below.

Task 6   Reset a Screen Filter

Note that a filter has been applied to the data, and the filter criteria are displayed at the top of the table. Whenever you navigate to a screen using a link, a filter is automatically applied based on criteria intrinsic to the originating link. See the STA User's Guide for details.

In this example, the filter indicates that the screen displays data only for the selected library and only for exchanges that have occurred since 7/15/2013. In addition, the total number of records displayed is indicated in the Status Line. You will see filter and record count details specific to your environment.

Use the following steps to reset the screen filter and display all available exchange records.

1. Click the Reset Filter icon in the Table Toolbar to remove all filter criteria and display all exchanges for all libraries.

The applied filter area is blank and the record count indicates that all records are available for display.

Task 7   Display Full Details for Selected Exchanges

Use the following steps to display full detail on the three most recent exchanges.

1. Select the first three exchanges in the table, as follows:

1. Select the first exchange by clicking anywhere in the first table row other than a column with an active link. For example, on the Exchanges Overview screen you can click in the Last Annotation or Drive Model columns, but not in the Exchange Start or Drive Serial Number columns. Clicking in a column with an active link activates the link and takes you to another screen before you have selected all the records.

2. To select the next two records in the table, Shift-click the third row in the table, again by clicking anywhere in the row other than a column with an active link.

2. Click the Detail View icon in the Table Toolbar.

The three selected exchanges are added to the graphs at the top of the screen, and full details are displayed in text form in the bottom part of the screen.

3. Click the Collapse Pane icon in the middle of the screen to hide the Graphics Area and display more of the text detail.

The Detail View displays all available attributes for each record. You can scroll down to view all three selected records.

The attributes for each record are grouped into related information sets. For example, data about the drive used in the exchange is grouped under the "Drive" heading. By grouping related attributes, the Detail View provides a complete picture of the selected records. See the STA Data Reference Guide for definitions of the record attributes.

The attribute values displayed in underlined blue text are active links. If you select a link, you are taken to the associated screen, filtered for that value.

4. Click a Drive Serial Number link.

You are taken to the Drives – Overview screen filtered for the selected drive. The screen display remains in the Detail View, and the data for the selected drive is added to the graphs in the top part of the screen.

5. Click the List View icon to switch to the List View display.

The example below shows the STA-Default template for the Drives – Overview screen. Your display may look different if a different template has been assigned as the default for your STA username.

Task 8   Display Aggregated Drive Data (Drives Analysis)

STA Analysis screens show aggregated data for library components or events. The data is displayed in the form of a pivot table, which you can modify to group data into categories of your choice. See the STA Screen Basics Guide for details.

Use the following steps to display aggregated data and the underlying detail for it.

1. In the Navigation Bar, select Analysis under the Drives tab.

The Drives – Analysis screen has a Graph Area at the top and a pivot table at the bottom. The example below shows the STA-Default template for the Drives – Analysis screen. Drive health data is aggregated by library complex, library ID, and drive manufacturer.

2. The values in the table cells are active links. Move the mouse over an entry to see the selection cursor.

3. Click the link to see detail for the aggregated number.

The Drives – Overview screen is displayed, filtered to show just the drives represented by the selected value in the pivot table cell.

Task 9   Export Data to a Spreadsheet

You can export data from list view tables and pivot tables to a variety of formats. This can be useful for transferring selected STA data to other applications, such as spreadsheets and presentation applications. See the STA Screen Basics Guide for details.

Use the following steps to export table data from the Drives – Overview screen.

1. Select the Export icon in the Table Toolbar.
The available formats are listed in the pull-down menu.

2. Select the Drives.xls option in the menu.

Depending on your browser settings, a dialog box appears for you to save the file. Following is an example of a typical dialog box on a Windows computer.

3. Complete the dialog box to save the file.

Task 10   Display Context-Sensitive Help

STA includes context-sensitive help for all screens. Most screens have multiple help buttons for different areas of the screen, and depending on which button you select, a context-sensitive help topic describing that area of the screen is displayed.

Use the following steps to display help for different areas of the Drives – Overview screen.

1. Move the mouse over the Help link in the Main Toolbar to see the selection cursor.

2. Click the link to display a help topic for the current screen (in this case, Drives – Overview). The topic is displayed in a separate tab in your browser window. The Help link in the Main Toolbar always displays help for the current screen.

The help topic includes several active links to other topics, which are marked with blue underlined text. Move your cursor over the links to see the selection cursor.

3. Return to the browser tab running the Drives – Overview screen. Click the Help icon in the Graphics Area toolbar.

This time a help topic describing the Graphics Area toolbar for the Drives – Overview screen is displayed.

See the STA User's Guide for complete details about the STA online help system.

Task 11   Log Out

Use the following steps to end your STA application session. It is always best to explicitly log out of STA, rather than simply closing the browser window or tab in which it is running. When you log out, application memory is released immediately; otherwise, it is released only after your session times out.

1. Return to the browser tab running the STA application.

2. Click the Logout link in the Main Toolbar.

The Logged Out dialog box appears.

3. Click the Go to Login button to return to the Login dialog box.

This completes the Quick Start activities.

Next Steps

As you gain experience with STA and the data that it collects, you may want to explore how you can use STA to better manage your tape library system. See the STA User's Guide for some of the types of questions STA can help you to answer.

Related Documents

The STA documentation set consists of the following documents.

For users of the STA application

- STA Quick Start Guide—Use this guide to introduce yourself to the STA application and some features of the user interface.

- STA User's Guide—Use this guide for instructions on using all STA application features, including the Dashboard, templates, filters, alerts, Executive Reports, logical groups, and STA media validation. This guide also provides instructions for administering and managing STA usernames, email addresses, service logs, and SNMP connections with the monitored libraries.

- STA Screen Basics Guide—Use this guide for full details about the STA user interface. It describes the screen navigation and layout, and the use of graphs and tables.

- STA Data Reference Guide—Use this guide to look up definitions for all STA tape library system screens and data attributes.

For installers and administrators of the STA server and application

- STA Release Notes—Read this document before installing and using STA. It contains important release information, including known issues. This document is included in the STA media pack download.

- STA Requirements Guide—Use this guide to learn about minimum and recommended requirements for using STA. This guide includes the following requirements: library, drive, server, user interface, STA media validation, and IBM RACF access control.

- STA Installation and Configuration Guide—Use this guide to plan for installation of STA, install the Linux operating system, install the STA application, and then configure STA to begin monitoring the libraries. This guide also provides instructions for upgrading to a new version of STA.

- STA Administration Guide—Use this guide for information about STA server administration tasks, such as STA services configuration, database backup and restore, and password administration for database accounts.

- STA Security Guide—Read this document for important STA security information, including requirements, recommendations, and general security principles.

- STA Licensing Information User Manual—Read this document for information about use of third-party technology distributed with the STA product.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.

StorageTek Tape Analytics Quick Start Guide, Version 2.1.0

E58065-02

Copyright © 2013, 2015, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Oracle Legal Notices

Copyright Notice

Copyright © 1994-2016, Oracle and/or its affiliates. All rights reserved.

License Restrictions Warranty/Consequential Damages Disclaimer

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

Warranty Disclaimer

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

Restricted Rights Notice

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

Hazardous Applications Notice

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Trademark Notice

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

Third-Party Content, Products, and Services Disclaimer

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Alpha and Beta Draft Documentation Notice

If this document is in preproduction status:

This documentation is in preproduction status and is intended for demonstration and preliminary use only. It may not be specific to the hardware on which you are using the software. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to this documentation and will not be responsible for any loss, costs, or damages incurred due to the use of this documentation.

Private Alpha and Beta Draft Documentation Notice

If this document is in private preproduction status:

The information contained in this document is for informational sharing purposes only and should be considered in your capacity as a customer advisory board member or pursuant to your beta trial agreement only. It is not a commitment to deliver any material, code, or functionality, and should not be relied upon in making purchasing decisions. The development, release, and timing of any features or functionality described in this document remains at the sole discretion of Oracle.

This document in any form, software or printed matter, contains proprietary information that is the exclusive property of Oracle. Your access to and use of this confidential material is subject to the terms and conditions of your Oracle Master Agreement, Oracle License and Services Agreement, Oracle PartnerNetwork Agreement, Oracle distribution agreement, or other license agreement which has been executed by you and Oracle and with which you agree to comply. This document and information contained herein may not be disclosed, copied, reproduced, or distributed to anyone outside Oracle without prior written consent of Oracle. This document is not part of your license agreement nor can it be incorporated into any contractual agreement with Oracle or its subsidiaries or affiliates.

Documentation Accessibility

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Access to Oracle Support

Oracle customers that have purchased support have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.