Oracle® Hyperion Calculation Manager

Error Message Reference

Release 11.1.2.4

Copyright © 2013-2015, Oracle and/or its affiliates. All rights reserved.

Authors: EPM Information Development Team

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS:

Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

This guide contains information about error messages that may be generated when you use Oracle Hyperion Calculation Manager.

EPMCAL-0000000008: This is an invalid database type: ''{0}''. Unable to create repository object. Please contact customer support.

Cause: Found an invalid database type. Supported database types are ORACLE, SQLSERVER and DB2.

Action: Reconfigure the Calculation Manager database configuration with a supported database.

Level: 1

Type: ERROR

EPMCAL-0000000009: An error occurred while creating a repository object. Please make sure your Calculation Manager configuration is correct.

Cause: Creating an internal RDBMS object failed. Please make sure the database configuration information for Calculation Manager is correct.

Action: Make sure that the database information for Calculation Manager is correct, and the RDBMS is up and running.

Level: 1

Type: ERROR

EPMCAL-0000000012: The database configuration is not set up correctly. Please contact customer support.

Cause: Creating an internal RDBMS object failed. Please make sure the database configuration information for Calculation Manager is correct.

Action: Make sure that the database information for Calculation Manager is correct, and the RDBMS is up and running.

Level: 1

Type: ERROR

EPMCAL-0000000013: An error occurred while executing query: ''{0}''

Cause: A SQL query failed to execute against the database where Calculation Manager is configured.

Action: Please check the database logs for more details.

Level: 1

Type: ERROR

EPMCAL-0000000018: The JDBC driver {0} cannot be unregistered.

Cause: The JDBC driver for the configured database Calculation Manager could not be unregistered.

Action: Please make sure that the JDBC drivers are present in the class path.

Level: 32

Type: ERROR

EPMCAL-0000000020: The JDBC driver {0} cannot be registered.

Cause: The JDBC driver for the configured database Calculation Manager could not be registered.

Action: Make sure the JDBC driver used in the database configuration exists in the class path.

Level: 1

Type: ERROR

EPMCAL-0000000029: The EPM registry is not available.

Cause: The EPM registry is not available.

Action: Please check the EPM Registry log file to see why it failed to connect.

Level: 1

Type: ERROR

Oracle Hyperion Calculation Manager - Error Message Reference

calc_manager_err_message_ref