Oracle® Fusion Middleware

Oracle WebCenter Content構成リファレンス

11gリリース1 (11.1.1)

E49668-04(原本部品番号:E10726-07)

2015年4月

Oracle WebCenter Contentシステムの構成変数について説明する管理者および開発者向けのドキュメント。

Oracle Fusion Middleware Oracle WebCenter Content構成リファレンス 11gリリース1 (11.1.1)

E49668-04

Copyright © 1996, 2015, Oracle and/or its affiliates.All rights reserved.

原本著者: Kalpana N

原本協力者: Oracle WebCenter Content開発およびサポート

このソフトウェアおよび関連ドキュメントの使用と開示は、ライセンス契約の制約条件に従うものとし、知的財産に関する法律により保護されています。ライセンス契約で明示的に許諾されている場合もしくは法律によって認められている場合を除き、形式、手段に関係なく、いかなる部分も使用、複写、複製、翻訳、放送、修正、ライセンス供与、送信、配布、発表、実行、公開または表示することはできません。このソフトウェアのリバース・エンジニアリング、逆アセンブル、逆コンパイルは互換性のために法律によって規定されている場合を除き、禁止されています。

ここに記載された情報は予告なしに変更される場合があります。また、誤りが無いことの保証はいたしかねます。誤りを見つけた場合は、オラクル社までご連絡ください。

このソフトウェアまたは関連ドキュメントを、米国政府機関もしくは米国政府機関に代わってこのソフトウェアまたは関連ドキュメントをライセンスされた者に提供する場合は、次の通知が適用されます。

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

このソフトウェアもしくはハードウェアは様々な情報管理アプリケーションでの一般的な使用のために開発されたものです。このソフトウェアもしくはハードウェアは、危険が伴うアプリケーション(人的傷害を発生させる可能性があるアプリケーションを含む)への用途を目的として開発されていません。このソフトウェアもしくはハードウェアを危険が伴うアプリケーションで使用する際、安全に使用するために、適切な安全装置、バックアップ、冗長性(redundancy)、その他の対策を講じることは使用者の責任となります。このソフトウェアもしくはハードウェアを危険が伴うアプリケーションで使用したことに起因して損害が発生しても、オラクル社およびその関連会社は一切の責任を負いかねます。

OracleおよびJavaはOracle Corporationおよびその関連企業の登録商標です。その他の名称は、それぞれの所有者の商標または登録商標です。

Intel、Intel Xeonは、Intel Corporationの商標または登録商標です。すべてのSPARCの商標はライセンスをもとに使用し、SPARC International, Inc.の商標または登録商標です。AMD、Opteron、AMDロゴ、AMD Opteronロゴは、Advanced Micro Devices, Inc.の商標または登録商標です。UNIXは、The Open Groupの登録商標です。

このソフトウェアまたはハードウェア、そしてドキュメントは、第三者のコンテンツ、製品、サービスへのアクセス、あるいはそれらに関する情報を提供することがあります。適用されるお客様とOracle Corporationとの間の契約に別段の定めがある場合を除いて、Oracle Corporationおよびその関連会社は、第三者のコンテンツ、製品、サービスに関して一切の責任を負わず、いかなる保証もいたしません。適用されるお客様とOracle Corporationとの間の契約に定めがある場合を除いて、Oracle Corporationおよびその関連会社は、第三者のコンテンツ、製品、サービスへのアクセスまたは使用によって損失、費用、あるいは損害が発生しても一切の責任を負いかねます。

目次

タイトルおよび著作権情報

はじめに

- 対象読者

- ドキュメントのアクセシビリティについて

- 関連ドキュメント

- 表記規則

このガイドで説明する新機能

- 11g リリース1 (11.1.1.9)の新機能と変更機能

- 11g リリース1 (11.1.1.8)の新機能と変更された機能

- 11g リリース1 (11.1.1.7)の新機能と変更された機能

- このマニュアルに記載されているその他の重要な変更

1 システム構成変数の概要

- 1.1 ドキュメントの編成

- 1.2 Oracle WebCenter Contentの用語

2 使用方法別の構成変数リスト

- 2.1 アーカイバ

- 2.2 バッチ・ローダー

- 2.3 クライアント

- 2.4 Content Tracker

- 2.5 コンテンツ・アイテム

- 2.6 コンテンツ・プロファイル

- 2.7 コンテンツ・サーバー

- 2.8 変換

- 2.8.1 Inbound Refinery

- 2.8.2 PDF Converter

- 2.8.2.1 一般変数

- 2.8.2.2 Microsoft Office

- 2.8.2.3 InDesign

- 2.8.2.4 その他のフォーマット

- 2.8.3 Dynamic Converter

- 2.9 データベース

- 2.10 日付と時間

- 2.11 デバッグ

- 2.12 ディレクトリとパス

- 2.13 フィールド表示

- 2.14 フォルダとWebDAV

- 2.15 HTMLプレビュー

- 2.16 索引の作成

- 2.17 JSP

- 2.18 ローカライゼーション

- 2.19 ページ表示

- 2.20 ポップアップ・カレンダ

- 2.21 レコード

- 2.22 スキーマ

- 2.23 検索

- 2.24 セキュリティ

- 2.24.1 内部セキュリティ

- 2.24.2 外部セキュリティ

- 2.25 文字列

- 2.26 ユーザー

- 2.27 Webサーバー

- 2.28 ワークフロー

3 構成変数

- AccessListPrivilegesGrantedWhenEmpty

- AccesslistPrivilegesGrantedWhenEmpty

- AdditionalIndexBuildParams

- AdditionalSubscriptionCollatedFieldList

- AllowAllRedirectUrls

- AllowAlternateMetaFile

- AllowConcurrentUpdate

- AllowForceDelete

- AllowMatchesInDateCheck

- AllowPrimaryMetaFile

- AllowRetentionPeriodWithoutCutoff

- AllowSamePrimaryAlternateExtensions

- AllowSecondaryConversion

- AllowSkippedHyperlinktoCauseIncomplete

- AppendToAllowedUploadServices

- AppletChunkSize

- AppletChunkThreshold

- ArchiverDoLocks

- ArchiverTouchMonitorInterval

- ArchiverTraceLockMaintenance

- ArchiverTraceLocks

- AuthorDelete

- AutoNumberPrefix

- AutoNumberWidth

- BatchLoaderPath

- BatchLoaderUserName

- BinDir

- CachedResultRowCount

- ChunkedRequestTrace

- CleanUp

- ClearMissingAttributes

- coaoShowLinkExtensions

- CollectionDeleteEnabled

- CollectionHiddenMeta

- CollectionInfoEnabled

- CollectionInhibitUpdateMeta

- CollectionLinkEnabled

- CollectionLocation

- CollectionMeta

- CollectionMoveEnabled

- CollectionReadOnlyMarkedFolders

- CollectionReadOnlyMeta

- CollectionReleasedOnly

- CollectionSecurityReadOnly

- CollectionTrashDeleteDate

- CollectionTrashDeleteLocation

- CollectionTrashDeleteOldName

- CollectionTrashDeleter

- CollectionWebDAVServer

- ColumnMapFile

- ConfigDir

- ConversionCacheExpirationPeriodInDays

- CookieAuthTimeoutInDays

- CookieProxyPassword

- createAlternateMetaFile

- createPrimaryMetaFile

- DatabasePreserveCase

- DatabaseWildcards

- DatedCacheIntervalDays

- DataDir

- DateOutputFormat

- DCMaxFileSize

- DCTimeOut

- DCViewFormat

- DebugStdConversion

- DefaultAccounts

- DefaultFilterInputFormat

- DefaultFilterOutputFormat

- DefaultGraphicTimeout

- DefaultHtmlConversion

- DefaultHtmlRefreshTimeoutInSeconds

- DefaultNativeTimeout

- DefaultPasswordEncoding

- DefaultPostscriptTimeout

- DirectoryLockingLogPath

- DisableContentProfiles

- DisableDBLongIntegerField

- DisableESigSSLCheck

- DisableForcedConversions

- DisableGzipCompression

- DisableHttpUploadChunking

- DisableKeepingForcedConversions

- DisableOptimizedLatestReleaseQuerying

- DisableSharedCacheChecking

- DistillerPath

- DoDocNameOrder

- dodSkipCatFolderRequirement

- DomainControllerName

- DoMetaInternetSearch

- DownloadApplet

- DtmPort

- DynamicConverterHtmlFlavor

- EmailNotificationType

- EnableDocumentHighlight

- EnableEnvironmentPackager

- EnableErrorFile

- EnableExpirationNotifier

- EnableRebuildForcesReconversion

- EnableSchemaPublish

- ExclusiveCheckout

- ExpireRevisionOnly

- FileEncoding

- FldEnforceCaseInsensitiveNameUniqueness

- FldEnforceFolderFileNameUniqueness

- ForcedConversionRules

- ForceDistinctRevLabels

- ForceDocTypeChoice

- ForceJdbcSync

- ForcePermissionCheckforAllowedUploadServices

- ForceSecurityGroupChoice

- FormInheritMetaDataFieldList

- FrameMakerCyclesAllowed

- FrameMakerTimeout

- GetCopyAccess

- HasExternalUsers

- HasSiteStudio

- HideVitalReview

- HighlightBegin

- HighlightEnd

- HtmlDataInputFilterLevel

- HTMLEditorPath

- HttpAbsoluteCgiRoot

- HttpAbsoluteWebRoot

- HttpBrowserHttpHostDoesNotHavePort

- HttpIgnoreWebServerInternalPortNumber

- HttpRelativeCgiRoot

- HttpRelativeWebRoot

- HttpServerAddress

- IDC_Name

- IdcAnalyzeLogDir

- IdcAuthExtraRequestParams

- IdcCommandFile

- IdcCommandLog

- IdcCommandServerHost

- IdcCommandUser

- IdcHttpHeaderVariables

- IdcHomeDir

- IdcLocale

- IdcNativeDir

- IdcResourcesDir

- IdcServerBindAddress

- IdcServerSocketQueueDepth

- IdcServerThreadQueryTimeout

- IndexableRenditions

- IndexerAutoWorkInterval

- IndexerLargeFileSize

- IndexerRebuildStagingManualCopy

- IndexerRebuildStagingPath

- IndexerTouchMonitorInterval

- IndexerTraceCycleListChanges

- IndexerTraceLockFileChanges

- IndexerTraceStartStop

- InitialColID

- InstanceDescription

- InstanceMenuLabel

- IntradocDir

- IntradocRealm

- IntradocServerHostName

- IntradocServerPort

- IsAllowIndexRenditions

- IsAutoArchiver

- IsAutoNumber

- IsAutoQueue

- IsAutoSearch

- IsContentRefineryPresent

- IsDpSubmitErrorFatal

- IsDynamicConverterEnabled

- IsFormsPresent

- IsJava

- IsJdbcLockTrace

- IsJdbcQueryTrace

- IsJspServerEnabled

- IsOverrideFormat

- IsPageDebug

- isPhysicallySplitDir

- IsPrimaryUserBase

- isRepromptLogin

- IsSavedWfCompanionFile

- isValidateFile

- IsWebServerPagesOnly

- JdbcConnectionString

- JdbcDriver

- JdbcPassword

- JdbcPasswordEncoding

- JdbcUser

- JspAdminQuery

- JspDefaultIndexPage

- JspEnabledGroups

- JvmCommandLine

- LatestReleasedTimestampTimeout

- LdapAdminDN

- LdapAdminPassword

- LdapPort

- LdapServer

- LdapSuffix

- LkDisableOnRebuild

- LkDisableReferenceInfo

- LkDisallowConversionFormats

- LkIsSecureSearch

- LkReExtractOnRebuild

- LkRefreshBatchSize

- LkRefreshErrorPercent

- LkRefreshErrorsAllowed

- LkRefreshErrorThreshold

- LmDefaultLayout

- LmDefaultSkin

- LocaleArchiverDateFormat

- LogMessagePrefix

- LogName

- MacSupportsSignedApplets

- MailServer

- MajorRevSeq

- MaxArchiveErrorsAllowed

- MaxCollectionSize

- MaxConversionCacheSizeInMegs

- MaxDocIndexErrors

- MaxErrorsAllowed

- MaxIndexableFileSize

- MaxIntegerAllowed

- MaxNumRecursiveStepDefinitions

- MaxQueryRows

- MaxRequestThreadCount

- MaxResults

- MaxRowsPerTableArchiveExportBatch

- MaxSavedSearchResults

- MaxSearchableSubfolders

- MaxSearchConnections

- MaxSizeResourceFileCacheMillions

- MaxStandardDatabaseResults

- MemoFieldSize

- MinIndexableFileSize

- MinIntegerAllowed

- MinMemoFieldSize

- MinorRevSeq

- MSPubexePath

- MultiUpload

- NeverTimeoutForcedConversionsTemplateChange

- NoAutomation

- noInfoColumn

- noRevisionsColumn

- NoSearchConnectionCloseOnDocChange

- NotationForRequiredFields

- NotificationIntervalInDays

- NotificationMaximum

- NotificationQuery

- NotifyExtras

- NotifyTime

- NtlmSecurityEnabled

- NumAdditionalRenditions

- NumConnections

- OdbcDateFormat

- OpenOfficeListenerPort

- OpenOfficeListenerURL

- OpenOfficePath

- PageMakerExePath

- PLUGIN_DEBUG

- PostConversionTimeOut

- PostprocessPDFPath

- PostscriptPrinterName

- PowerPointPrintOutput

- PreconversionPath

- PreconversionWaitTime

- PreviewOutputExtension

- PreviewPath

- PrimaryWorkQueueTimeout

- PrinterPortPath

- Priority

- ProcessExcelUrlHyperlinks

- ProcessInDesignBookMarks

- ProcessInDesignHyperlinks

- ProcessInDesignInternalPDFThumbnail

- ProcessInDesignLinkUpdate

- ProcessInDesignPDFCompatibility50

- ProcessPowerpointHyperlinks

- ProcessVisioInternalHyperlinks

- ProcessVisioUrlHyperlinks

- ProcessWordBookMarks

- ProcessWordComments

- ProcessWordEmailLinks

- ProcessWordFootEndNote

- ProcessWordHeadings

- ProcessWordHyperlinks

- ProcessWordToc

- ProcessWordUrlHyperlinks

- ProviderClass

- ProviderConfig

- ProviderConnection

- ProviderCredentialsMap

- ProviderDir

- ProviderType

- pucDefaultTime

- pucEnableOnSearch

- pucHideTimeInDateFields

- pucUseMonthLocale

- pucUseWeekdayLocale

- pucXOffset

- pucYOffset

- pucZIndex

- QueueDir

- RecordsManagementDenyAuthorFreePassOnRMSecurity

- RecordsManagementNumberOverwriteOnDelete

- RedirectHostsFilter

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds1

- RequestAuditIntervalSeconds2

- RequestAuditListDepth1

- RequestAuditListDepth2

- RequestAuditSubClassificationField

- ResultsTitle

- RmaAddDocWhereClauseForScreening

- RmaAllowKeepOrDestroyMetadataOption

- RmaEnableFilePlan

- RmaEnableFixedClones

- RmaEnablePostFilterOnScreening

- RmaFilePlanVolumePrefix and RmaFilePlanVolumeSuffix

- RmaFixedClonesTitleSuffix

- RMAHideExternalFieldsFromCheckInUpdate

- RMAHideExternalFieldsFromSearchInfo

- RmaNotifyDispReviewerAndCatAuthor

- RmaNotifyReviewerAndAlternateReviewer

- rule:IsFragmentOnly

- SceUseNativeInDataFeeds

- SchemaAllowRecursiveFileMove

- SchemaBuildDigestFile

- SchemaPublishCheckInterval

- SchemaPublishInterval

- SchemaPublishMaximumInterval

- SchemaPublishMinimumInterval

- SchemaPublishRenameRetryInitialInterval

- SchemaPublishRenameRetryIterations

- SchemaPublishRetryInterval

- SchemaPublishRetryIntervalMax

- SchemaVerifyPublishing

- SchemaWin32RenameDelayInterval

- SctAutoTruncateDataStrings

- SctComponentDir

- SctDebugLogEnabled

- SctDebugLogFilePath

- SctDebugServiceBinderDumpEnabled

- SctDoNotArchive

- SctDoNotPopulateAccessLogColumns

- SctExternalUserLogEnabled

- SctFilterPluginLogDir

- SctIgnoreDirectories

- SctIgnoreFileTypes

- SctLogDir

- SctLogEnabled

- SctLogSecurity

- SctMaxRecentCount

- SctMaxRereadTime

- SctReductionAvailableDatesLookback

- SctReductionLogDir

- SctReductionRequireEventLogs

- SctrEnableSecurityCheck

- SctScheduledReductionEnable

- SctSimplifyUserAgents

- SctSnapshotEnable

- SctSnapshotLastAccessEnable

- SctSnapshotLastAccessField

- SctSnapshotLongCountEnable

- SctSnapshotLongCountField

- SctSnapshotLongCountInterval

- SctSnapshotShortCountEnable

- SctSnapshotShortCountField

- SctSnapshotShortCountInterval

- SctTrackContentAccessOnly

- SctUseGMT

- SearchCacheCleanerInterval

- SearchCacheMaxItemAgeInMinutes

- SearchDebugLevel

- SearchDir

- SearchIndexerEngineName

- SearchQueryFormat

- SearchQueryTrace

- SecondaryConversionStepName

- SelfRegisteredAccounts

- SelfRegisteredRoles

- ServiceStartupTimeout

- ShowContentForStorageBrowse

- ShowCreateExternalMenu

- showDocActions

- ShowEmailMetadataMenu

- ShowHyperlinkBox

- IsSimpleProfilesEnabled

- ShowOnlyKnownAccounts

- ShowRevisionsColumn

- showSearchResultsCheckoutColumn

- SkipMozillaMailToWorkaround

- SmtpPort

- SocketHostAddressSecurityFilter

- SocketHostNameSecurityFilter

- SourcePath

- StdPageWidth

- StrConfineOverflowChars

- StyleForRequiredFields

- SubjectsDir

- SubscriptionCollatedFieldList

- SubscriptionMethod

- SysAdminAddress

- SystemDateFormat

- SystemLocale

- SystemTimeZone

- TempDir

- TextIndexerFilterValidateFormats

- TimeoutChangedTemplateForcedConversionsInMins

- TimeoutMismatchedForcedConversionsInMins

- TimeoutPerOneMegInSec

- TraceConversionCacheCleanup

- TraceResourceConflict

- TraceResourceLoad

- TraceResourceOverride

- UieHideSearchCheckboxes

- UniversalSearchAllowFullText

- UploadApplet

- UseAccounts

- UseAdsi

- UseCascadingStyleSheets

- UseDatabaseWfInQueue

- UseDatabaseShortIndexName

- UseFourDigitYear

- UseNestedGroups

- UseNetscape

- UseNtlm

- UserCache

- UserCacheMaxSize

- UserCacheClusterSupport

- UserCacheMaxSizeMatchInitialSize

- UserCacheTimeout

- UseRedirectedOutput

- UseRevisionCreateDate

- UserFilteredSubjects

- UseSearchCache

- UseSecureLdap

- UseSSL

- VaultDir

- VerboseMode

- WarnAboutTimeZone

- WebBrowserPath

- WebDAVMaxInactiveInterval

- WeblayoutDir

- WebServerAuthOnly

- WorkflowDir

- WorkflowIntervalHours

- XMLEncodingMode

はじめに

このドキュメントでは、Oracle WebCenter Contentで使用するシステム構成変数について説明します。

対象読者

このガイドは、変数を使用してOracle WebCenter Contentの機能にアクセスし、それらをカスタマイズする管理者および開発者を対象としています。

ドキュメントのアクセシビリティについて

Oracleのアクセシビリティについての詳細情報は、Oracle Accessibility ProgramのWebサイト(http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc)を参照してください。

Oracle Supportへのアクセス

サポートをご購入のOracleのお客様は、My Oracle Supportにアクセスして電子サポートを受けることができます。詳細情報は(http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info) か、聴覚に障害のあるお客様は (http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs)を参照してください。

関連ドキュメント

詳細は、Oracle WebCenter Contentドキュメント・セットに含まれる次のドキュメントを参照してください。

- Oracle WebCenter Contentリリース・ノート

- Oracle Fusion Middleware Oracle WebCenter Contentサービス・リファレンス

- Oracle Fusion Middleware Oracle WebCenter Contentによる開発

- Oracle Middleware Oracle WebCenter Contentの管理

- Oracle Middleware Oracle WebCenter Contentのマネージング

Oracle WebCenter Content Serverに関する詳細は、『The Definitive Guide to Stellent Content Server Development』(Brian Huff著、2006年、Apress、Berkeley、CA)を参照してください。

表記規則

このマニュアルでは次の表記規則を使用します。

規則

意味

太字

太字は、操作に関連するGraphical User Interface要素、または本文中で定義されている用語および用語集に記載されている用語を示します。

イタリック体

イタリックは、ユーザーが特定の値を指定するプレースホルダ変数を示します。

固定幅フォント

固定幅フォントは、段落内のコマンド、URL、サンプル内のコード、画面に表示されるテキスト、または入力するテキストを示します。

このガイドで説明する新機能

次のトピックでは、Oracle WebCenter Contentの新機能と変更された機能について、およびこのガイドに記載されるその他の重要な変更について紹介し、詳細情報へのリンクを提供します

11g リリース1 (11.1.1.9)の新機能と変更機能

Oracle WebCenter Content 11gリリース1 (11.1.1.9)では、次の構成変数が追加または変更されています。

- MaxRowsPerTableArchiveExportBatchは、フォルダ構造データをエクスポートする前に、アーカイブする表の行の最大数を設定します。

- SceUseNativeInDataFeedsは、SESCrawlerExportコンポーネントが索引の作成用にWeb表示可能ファイルまたはネイティブ・ファイルを選択できるようにします。

11g リリース1 (11.1.1.8)の新機能と変更された機能

Oracle WebCenter Content 11gリリース1 (11.1.1.8)では、次の構成変数が追加または変更されています。

- EmailNotificationTypeは、ワークフローとサブスクリプションが異なるコンテンツ・サーバー・ユーザー・インタフェースに含まれる場合に、通知電子メール内のリンクがポイントする先を指定します。

- DisableESigSSLCheckは、ワークフローで電子シグネチャを使用する場合、そのSSL要件を無効にします。

- HttpBrowserHttpHostDoesNotHavePortは、コンテンツ・サーバーの管理サーバーとアプレットのために計算されたHTTPアドレスにポート番号がないため、ポート番号を探す必要があることをコンテンツ・サーバーに通知します。

- CachedResultRowCountのデフォルト値は変更されています。

- coaoShowLinkExtensionsは、「Checkout and Openコンポーネント」の「編集」メニューが、指定されたファイル拡張子値の場合のみ表示されるように制限します。

- 次の変数は削除され、今後はサポートされません。

- ARCHIVE_COLLECTION

- SearchCacheHardLimit

- SearchCacheSoftLimit

- SearchCacheTrace

- SearchConnectionWaitTimeout

11g リリース1 (11.1.1.7)の新機能と変更された機能

Oracle WebCenter Content 11gリリース1 (11.1.1.7)では、次の構成変数が追加または変更されています。

- DoMetaInternetSearchは、メタデータ・フィールドをインターネットで検索する構文を有効にします。

- FldEnforceFolderFileNameUniquenessは、フォルダ名とファイル名の一意性チェックでの大/小文字の区別を解除し、パス解決での大/小文字の区別を解除します。
この変数により、フォルダに子ドキュメントと同じ名前の子フォルダを作成できなくなります。

- MaxIndexableFileSizeは、索引の作成の最大ドキュメント・ファイル・サイズを設定します。

- MinIndexableFileSizeは、索引の作成の最小ドキュメント・ファイル・サイズを設定します。

- UseNestedGroupsは、JPSプロバイダで使用され、Oracle WebCenter Content Serverが認証プロバイダでのユーザーの直接および間接のグループ・メンバーシップを取得するかどうかを指定します。

このマニュアルに記載されているその他の重要な変更

このガイドはリリース11g (11.1.1.7)でいくつかの点が更新されました。

- このガイドは、Oracle WebCenter Contentのconfig.cfgファイル、intradoc.cfgファイルおよび他の.cfgファイルで使用可能な構成変数に関する情報のみを記載するように再構成されました。一部の変数は、Idocスクリプトでも使用できます。
Idocスクリプト、Idocスクリプト関数、およびIdocスクリプトのみで使用される変数に関する情報はすべて、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』に移動されました。

- 各章(主なコンテンツ・サーバー変数、管理および構成に関する変数、および機能に関する変数)の内容のリストは削除されました。

- 型のマスター・リストは削除されました。

- 使用方法のマスター・リストは、構成変数のみを参照するように改訂されました。

1 システム構成変数の概要

このガイドでは、Oracle WebCenter Contentのシステム構成変数の使用方法と構文について説明し、構成設定の例を示します。

この章の項目は次のとおりです。

- ドキュメントの編成

- Oracle WebCenter Contentの用語

1.1 ドキュメントの編成

このガイドに記載されている情報は、Oracle WebCenter Content 11gリリース1 (11.1.1)に基づいています。ここに記載されている情報は、製品テクノロジの進化、およびハードウェアとオペレーティング・システムの作成や変更によって、変更されることがあります。ブラウザ、データベース、Webサーバー、オペレーティング・システムの技術的な性質により、オラクル社はサード・パーティ製製品の全バージョンおよび機能との互換性の保証は致しかねます。

このガイドは、次の章で構成されています。

- 第2章「使用方法別の構成変数リスト」では、すべての変数を、Oracle WebCenter Content (デバッガ、Inbound Refineryなど)で使用される状況別に分類して示します。

- 第3章「構成変数」では、すべての変数をアルファベット順に示します。

1.2 Oracle WebCenter Contentの用語

Oracle WebCenter Contentのドキュメントでは、Oracle WebCenter ContentおよびOracle WebCenter Content Serverの構成に関連付けられたディレクトリ内の変数を指すときに、次の用語を使用しています。

- IdcHomeDir: この変数は、Oracle WebCenter Contentのホームにあるucm/idcディレクトリを参照しており、このディレクトリには、Oracle WebCenter Contentサーバー・メディアが置かれています。サーバー・メディアは、Oracle WebCenter Content Server、Oracle WebCenter Content: Inbound RefineryまたはOracle WebCenter Content: Recordsのソフトウェアを実行できます。これは、基本的に読取り専用のディレクトリです。デフォルトの場所はWCC_ORACLE_HOME/ucm/idcです。デフォルトの場所の変数部分は変更可能ですが、パスをucm/idcから変更することはできません。

- DomainHome: この変数は、Oracle WebLogic Serverのアプリケーション・サーバー上で実行するためにOracle WebCenter Contentアプリケーションがデプロイされる、ユーザー指定のディレクトリを参照します。DomainHome/ucm/short-product-id/binディレクトリには、intradoc.cfgファイルおよび実行可能ファイルがあります。DomainHomeのデフォルトの場所はMW_HOME/user_projects/domains/base_domainですが、このパスとドメイン名(base_domain)は、アプリケーション・サーバーにOracle WebCenter Contentアプリケーションをデプロイするときに変更できます。

- short-product-id: この変数は、アプリケーション・サーバーにデプロイされるOracle WebCenter Contentサーバーのタイプを参照します。この名前はコンテキスト・ルート(デフォルトはHttpRelativeWebRoot構成値)として使用されます。次の値を指定できます。

- cs (Oracle WebCenter Content Server)

- ibr (Oracle WebCenter Content: Inbound Refinery)

- urm (Oracle WebCenter Content: Records)

- IntradocDir: この変数は、アプリケーション・サーバーにデプロイされているOracle WebCenter Contentアプリケーションの一部であるOracle WebCenter Contentインスタンスに固有の構成ファイルとデータ・ファイルのルート・ディレクトリを参照します。Oracle WebCenter Contentインスタンスのいずれかのタイプ(コンテンツ・サーバー(cs)、Inbound Refinery (ibr)またはRecords (urm))用に、このIdocスクリプト変数を構成します。このディレクトリは別の場所にあってもかまいませんが、デフォルトの場所はDomainHome/ucm/short-product-idです。指定したディレクトリは、インスタンス・ディレクトリへの絶対パスで、特定のサーバーまたはノードに一意である必要があります。このディレクトリに存在するbin/ディレクトリには、起動ファイル(intradoc.cfgと実行可能ファイル)が格納されています。

2 使用方法別の構成変数リスト

この章では、Oracle WebCenter Content変数を一般的な使用方法で分類して示します。

この章の内容は、次のとおりです。

- アーカイバ

- バッチ・ローダー

- クライアント

- Content Tracker

- コンテンツ・アイテム

- コンテンツ・プロファイル

- コンテンツ・サーバー

- 変換

- データベース

- 日付と時間

- デバッグ

- ディレクトリとパス

- フィールド表示

- フォルダとWebDAV

- HTMLプレビュー

- 索引の作成

- JSP

- ローカライズ

- ページ表示

- ポップアップ・カレンダ

- レコード

- スキーマ

- 検索

- セキュリティ

- 文字列

- ユーザー

- Webサーバー

- ワークフロー

2.1 アーカイバ

次の変数は、アーカイバ・ユーティリティに関連しています。

AllowMatchesInDateCheck
ArchiverDoLocks
ArchiverTouchMonitorInterval
ArchiverTraceLockMaintenance
ArchiverTraceLocks
CollectionLocation
IsAutoArchiver
LocaleArchiverDateFormat
MaxArchiveErrorsAllowed
MaxRowsPerTableArchiveExportBatch
OdbcDateFormat

2.2 バッチ・ローダー

次の変数は、バッチ・ローダー・ユーティリティに関連しています。

BatchLoaderPath
BatchLoaderUserName
CleanUp
EnableErrorFile
MaxErrorsAllowed

2.3 クライアント

次の変数は、クライアント・アプリケーションに関連しています。

AppendToAllowedUploadServices
DownloadApplet
ForcePermissionCheckforAllowedUploadServices
MacSupportsSignedApplets
MultiUpload
showDocActions
UploadApplet

2.4 Content Tracker

次の変数は、Content Trackerアプリケーションに関連しています。

SctAutoTruncateDataStrings
SctComponentDir
SctDebugLogEnabled
SctDebugLogFilePath
SctDebugServiceBinderDumpEnabled
SctDoNotArchive
SctDoNotPopulateAccessLogColumns
SctExternalUserLogEnabled
SctFilterPluginLogDir
SctIgnoreDirectories
SctIgnoreFileTypes
SctLogDir
SctLogEnabled
SctLogSecurity
SctMaxRecentCount
SctMaxRereadTime
SctReductionAvailableDatesLookback
SctReductionLogDir
SctReductionRequireEventLogs
SctrEnableSecurityCheck
SctScheduledReductionEnable
SctSimplifyUserAgents
SctSnapshotEnable
SctSnapshotLastAccessEnable
SctSnapshotLastAccessField
SctSnapshotLongCountEnable
SctSnapshotLongCountField
SctSnapshotLongCountInterval
SctSnapshotShortCountEnable
SctSnapshotShortCountField
SctSnapshotShortCountInterval
SctTrackContentAccessOnly
SctUseGMT

2.5 コンテンツ・アイテム

次の変数は、コンテンツ・アイテムに関連しています。

AllowAlternateMetaFile
AllowForceDelete
AllowPrimaryMetaFile
AllowSamePrimaryAlternateExtensions
AutoNumberPrefix
AutoNumberWidth
CachedResultRowCount
createAlternateMetaFile
createPrimaryMetaFile
EmailNotificationType
EnableExpirationNotifier
ExpireRevisionOnly
FormInheritMetaDataFieldList
ForceDistinctRevLabels
ForceDistinctRevLabels
HasSiteStudio
IsAutoNumber
LkDisableReferenceInfo
LkDisallowConversionFormats
LkIsSecureSearch
LkReExtractOnRebuild
LkRefreshBatchSize
LkRefreshErrorsAllowed
LkRefreshErrorPercent
LkRefreshErrorThreshold
MinorRevSeq
MinorRevSeq
noInfoColumn
noRevisionsColumn
NotificationMaximum
NotificationQuery
NotifyExtras
NotifyTime
NumAdditionalRenditions
showDocActions

2.6 コンテンツ・プロファイル

次の変数は、コンテンツ・プロファイル・アプリケーションに関連しています。

DisableContentProfiles
IsDpSubmitErrorFatal

2.7 コンテンツ・サーバー

次の変数は、コンテンツ・サーバーに関連しています。

AccessListPrivilegesGrantedWhenEmpty
AdditionalSubscriptionCollatedFieldList
AppendToAllowedUploadServices
AppletChunkSize
AppletChunkThreshold
ChunkedRequestTrace
ClearMissingAttributes
coaoShowLinkExtensions
CookieAuthTimeoutInDays
CookieProxyPassword
DefaultHtmlRefreshTimeoutInSeconds
DefaultPasswordEncoding
DisableDBLongIntegerField
DisableHttpUploadChunking
DisableSharedCacheChecking
DoDocNameOrder
DownloadApplet
FileEncoding
FldEnforceCaseInsensitiveNameUniqueness
FldEnforceFolderFileNameUniqueness
ForcePermissionCheckforAllowedUploadServices
HasExternalUsers
HttpAbsoluteCgiRoot
HttpAbsoluteWebRoot
HttpRelativeCgiRoot
IDC_Name
IdcCommandFile
IdcCommandLog
IdcCommandServerHost
IdcCommandUser
IdcServerBindAddress
IdcServerSocketQueueDepth
IdcServerThreadQueryTimeout
InstanceDescription
InstanceMenuLabel
IntradocServerHostName
IntradocServerPort
IsFormsPresent
isValidateFile
IsWebServerPagesOnly
JvmCommandLine
LmDefaultLayout
LmDefaultSkin
LogMessagePrefix
LogName
MacSupportsSignedApplets
MailServer
MaxIntegerAllowed
MaxQueryRows
MaxRequestThreadCount
MaxRowsPerTableArchiveExportBatch
MaxSizeResourceFileCacheMillions
MaxStandardDatabaseResults
MinIntegerAllowed
MinIntegerAllowed
MinorRevSeq
NoAutomationSceUseNativeInDataFeeds
PrimaryWorkQueueTimeout
ProviderClass
ProviderConfig
ProviderConnection
ProviderCredentialsMap
ProviderType
SceUseNativeInDataFeeds
ServiceStartupTimeout
ShowCreateExternalMenu
SkipMozillaMailToWorkaround
SmtpPort
SubscriptionCollatedFieldList
SubscriptionMethod
SysAdminAddress
UploadApplet
UserCacheClusterSupport
UserCacheMaxSizeMatchInitialSize
UserCacheMaxSize
UserCacheTimeout
UseRevisionCreateDate
XMLEncodingMode

2.8 変換

この項では、次に示す様々な変換アプリケーションに関連する変数について説明します。

- 第2.8.1項「Inbound Refinery」

- 第2.8.2項「PDF Converter」

- 第2.8.3項「Dynamic Converter」

2.8.1 Inbound Refinery

次の変数は、Inbound Refineryに関連しています。

AllowSecondaryConversion
DefaultFilterInputFormat
DefaultFilterOutputFormat
DefaultGraphicTimeout
DefaultNativeTimeout
DefaultNativeTimeout
FileEncoding
IsAutoQueue
IsContentRefineryPresent
JvmCommandLine
MaxConversionCacheSizeInMegs
MaxNumRecursiveStepDefinitions
PostConversionTimeOut
PreconversionPath
PreconversionWaitTime
QueueDir
SecondaryConversionStepName
VaultDir
VerboseMode
WeblayoutDir

2.8.2 PDF Converter

この項では、PDF Converterに関連する変数について説明します。

- 第2.8.2.1項「一般変数」

- 第2.8.2.2項「Microsoft Office」

- 第2.8.2.3項「InDesign」

- 第2.8.2.4項「その他のフォーマット」

2.8.2.1 一般変数

次の変数は、PDF Converterに関連しています。

DefaultPostscriptTimeout
DistillerPath
NumAdditionalRenditions
PostprocessPDFPath
PostscriptPrinterName
PrinterPortPath
ShowHyperlinkBox

2.8.2.2 Microsoft Office

次の変数は、Microsoft OfficeアプリケーションとPDF Converterの連携に関連しています。

AllowSkippedHyperlinktoCauseIncomplete
OpenOfficePath
PowerPointPrintOutput
ProcessExcelUrlHyperlinks
ProcessPowerpointHyperlinks
ProcessVisioInternalHyperlinks
ProcessVisioUrlHyperlinks
ProcessWordBookMarks
ProcessWordComments
ProcessWordEmailLinks
ProcessWordFootEndNote
ProcessWordHeadings
ProcessWordHyperlinks
ProcessWordToc
ProcessWordUrlHyperlinks

2.8.2.3 InDesign

次の変数は、Adobe InDesignとPDF Converterの連携に関連しています。

ProcessInDesignBookMarks
ProcessInDesignHyperlinks
ProcessInDesignInternalPDFThumbnail
ProcessInDesignLinkUpdate
ProcessInDesignPDFCompatibility50

2.8.2.4 その他のフォーマット

次の変数は、様々なネイティブ・アプリケーションとPDF Converterの連携に関連しています。

FrameMakerCyclesAllowed
FrameMakerTimeout
MSPubexePath
OpenOfficeListenerPort
OpenOfficeListenerURL
PageMakerExePath

2.8.3 Dynamic Converter

次の変数は、Dynamic Converterに関連しています。

ConversionCacheExpirationPeriodInDays
DatedCacheIntervalDays
DCMaxFileSize
DCTimeOut
DCViewFormat
DefaultFilterInputFormat
DefaultFilterOutputFormat
DefaultHtmlConversion
DisableForcedConversions
DisableKeepingForcedConversions
DisableOptimizedLatestReleaseQuerying
DynamicConverterHtmlFlavor
EnableRebuildForcesReconversion
ForcedConversionRules
HighlightBegin
HighlightEnd
IsDynamicConverterEnabled
LatestReleasedTimestampTimeout
MaxConversionCacheSizeInMegs
NeverTimeoutForcedConversionsTemplateChange
rule:IsFragmentOnly
TimeoutChangedTemplateForcedConversionsInMins
TimeoutMismatchedForcedConversionsInMins
TraceConversionCacheCleanup
UseCascadingStyleSheets

2.9 データベース

次の変数は、データベースに関連しています。

ColumnMapFile
ConfigDir
DatabasePreserveCase
DatabaseWildcards
ForceJdbcSync
IsJdbcLockTrace
IsJdbcQueryTrace
JdbcConnectionString
JdbcDriver
JdbcPassword
JdbcPasswordEncoding
JdbcUser
MemoFieldSize
MinMemoFieldSize
NumConnections
UseDatabaseShortIndexName

2.10 日付と時間

次の変数は、日付と時間のフォーマットおよび操作に関連しています。

DateOutputFormat
SystemDateFormat
SystemTimeZone
UseFourDigitYear
WarnAboutTimeZone

2.11 デバッグ

次の変数は、デバッグに関連しています。

ArchiverTraceLockMaintenance
ArchiverTraceLocks
ChunkedRequestTrace
DebugStdConversion
DirectoryLockingLogPath
EnableEnvironmentPackager
EnableErrorFile
ForceJdbcSync
IdcAnalyzeLogDir
IndexerTraceCycleListChanges
IndexerTraceLockFileChanges
IndexerTraceStartStop
IsJava
IsJdbcLockTrace
IsJdbcQueryTrace
IsPageDebug
LogMessagePrefix
LogName
PLUGIN_DEBUG
RequestAuditAdditionalVerboseFieldsList
RequestAuditIntervalSeconds1
RequestAuditIntervalSeconds2
RequestAuditListDepth1
RequestAuditListDepth2
RequestAuditSubClassificationField
SearchDebugLevel
SearchQueryTrace
TempDir
TraceResourceConflict
TraceResourceLoad
TraceResourceOverride
UseRedirectedOutput
VerboseMode

2.12 ディレクトリとパス

次の変数は、ディレクトリとファイル・パスに関連しています。

BinDir
CollectionLocation
ConfigDir
DataDir
HTMLEditorPath
HttpAbsoluteCgiRoot
HttpAbsoluteWebRoot
HttpRelativeCgiRoot
HttpRelativeWebRoot
HttpServerAddress
IdcAnalyzeLogDir
IdcHomeDir
IdcNativeDir
IdcResourcesDir
IntradocDir
isPhysicallySplitDir
ProviderDir
SearchDir
SubjectsDir
TempDir
UserCache
VaultDir
WebBrowserPath
WeblayoutDir
WorkflowDir

2.13 フィールド表示

次の変数は、コンテンツ・サーバーのWebページでのメタデータ・フィールドの表示に関連しています。

ForceDocTypeChoice
ForceSecurityGroupChoice
IsOverrideFormat
MemoFieldSize
MinMemoFieldSize
NotationForRequiredFields
ShowOnlyKnownAccounts
ShowRevisionsColumn
StyleForRequiredFields

2.14 フォルダとWebDAV

次の変数は、コントリビューション・フォルダおよびWebDAVのインストールと使用に関連しています。

CollectionDeleteEnabled
CollectionHiddenMeta
CollectionInfoEnabled
CollectionInhibitUpdateMeta
CollectionLinkEnabled
CollectionMeta
CollectionMoveEnabled
CollectionReadOnlyMarkedFolders
CollectionReadOnlyMeta
CollectionReleasedOnly
CollectionSecurityReadOnly
CollectionTrashDeleteDate
CollectionTrashDeleteLocation
CollectionTrashDeleteOldName
CollectionTrashDeleter
CollectionWebDAVServer
InitialColID
MaxSearchableSubfolders
WebDAVMaxInactiveInterval

2.15 HTMLプレビュー

次の変数は、HTMLプレビューに関連しています。

DtmPort
DisableGzipCompression
PreviewOutputExtension
PreviewPath

2.16 索引の作成

次の変数は、索引の作成に関連しています。

AdditionalIndexBuildParams
AllowConcurrentUpdate
DateOutputFormat
IndexableRenditions
IndexerAutoWorkInterval
IndexerLargeFileSize
IndexerRebuildStagingManualCopy
IndexerRebuildStagingPath
IndexerTouchMonitorInterval
IndexerTraceCycleListChanges
IndexerTraceLockFileChanges
IndexerTraceStartStop
IsAllowIndexRenditions
LkDisableOnRebuild
LkRefreshErrorsAllowed
MaxCollectionSize
MaxDocIndexErrors
MaxIndexableFileSize
MinIndexableFileSize
SceUseNativeInDataFeeds
TimeoutPerOneMegInSec
TextIndexerFilterValidateFormats

2.17 JSP

次の変数は、JSPサポートに関連しています。

IsJspServerEnabled
JspAdminQuery
JspDefaultIndexPage
JspEnabledGroups

2.18 ローカライゼーション

次の変数は、ローカライゼーションに関連しています。

DefaultFilterInputFormat
DefaultFilterOutputFormat
FileEncoding
IdcLocale
LocaleArchiverDateFormat
SystemDateFormat
SystemLocale
SystemTimeZone
WarnAboutTimeZone

2.19 ページ表示

次の変数は、コンテンツ・サーバーのWebページの表示に関連しています。

noInfoColumn
noRevisionsColumn
ResultsTitle
showDocActions
showSearchResultsCheckoutColumn
StdPageWidth

2.20 ポップアップ・カレンダ

次の変数は、ポップアップ・カレンダで使用されています。

pucDefaultTime
pucEnableOnSearch
pucHideTimeInDateFields
pucUseMonthLocale
pucUseWeekdayLocale
pucXOffset
pucYOffset
pucZIndex

2.21 レコード

次の変数は、Oracle WebCenter Content: Recordsで使用されています。

AccesslistPrivilegesGrantedWhenEmpty
AllowRetentionPeriodWithoutCutoff
dodSkipCatFolderRequirement
HideVitalReview
RecordsManagementDenyAuthorFreePassOnRMSecurity
RecordsManagementNumberOverwriteOnDelete
RmaAddDocWhereClauseForScreening
RmaAllowKeepOrDestroyMetadataOption
RmaEnableFilePlan
RmaEnableFixedClones
RmaEnablePostFilterOnScreening
RmaFilePlanVolumePrefixおよびRmaFilePlanVolumeSuffix
RmaFixedClonesTitleSuffix
RMAHideExternalFieldsFromCheckInUpdate
RMAHideExternalFieldsFromSearchInfo
RmaNotifyDispReviewerAndCatAuthor
RmaNotifyReviewerAndAlternateReviewer
ShowContentForStorageBrowse
ShowEmailMetadataMenu
IsSimpleProfilesEnabled
UieHideSearchCheckboxes

2.22 スキーマ

スキーマは、スキーマの各部分間の関係に影響する可能性のある変更が生じたときには必ず、再公開されます。これらの設定は公開要因に関連しています。

次の変数は、スキーマに関連しています。

EnableSchemaPublish
SchemaAllowRecursiveFileMove
SchemaBuildDigestFile
SchemaPublishCheckInterval
SchemaPublishInterval
SchemaPublishMaximumInterval
SchemaPublishMinimumInterval
SchemaPublishRenameRetryInitialInterval
SchemaPublishRenameRetryIterations
SchemaPublishRetryInterval
SchemaPublishRetryIntervalMax
SchemaVerifyPublishing
SchemaWin32RenameDelayInterval

2.23 検索

次の変数は、検索に関連しています。

AllowForceDelete
CachedResultRowCount
DoMetaInternetSearch
EnableDocumentHighlight
HasSiteStudio
IsAutoSearch
MaxResults
MaxSavedSearchResults
MaxSearchConnections
noInfoColumn
noRevisionsColumn
NoSearchConnectionCloseOnDocChange
ResultsTitle
SearchCacheCleanerInterval
SearchCacheMaxItemAgeInMinutes
SearchDebugLevel
SearchDir
SearchIndexerEngineName
SearchQueryFormat
SearchQueryTrace
showDocActions
UniversalSearchAllowFullText
UseSearchCache

2.24 セキュリティ

この項では、セキュリティに関連する変数について説明します。

- 第2.24.1項「内部セキュリティ」

- 第2.24.2項「外部セキュリティ」

2.24.1 内部セキュリティ

次の変数は、内部セキュリティに関連しています。

AllowAllRedirectUrls
AuthorDelete
DefaultAccounts
ExclusiveCheckout
GetCopyAccess
HtmlDataInputFilterLevel
SelfRegisteredAccounts
SelfRegisteredRoles
ShowOnlyKnownAccounts
UseAccounts
UserFilteredSubjects

2.24.2 外部セキュリティ

次の変数は、外部セキュリティ(WebサーバーおよびNTLMセキュリティ)に関連しています。

ClearMissingAttributes
DomainControllerName
HasExternalUsers
IntradocRealm
IsPrimaryUserBase
LdapAdminDN
LdapAdminPassword
LdapPort
LdapServer
LdapSuffix
NtlmSecurityEnabled
Priority
ProviderClass
ProviderConfig
ProviderConnection
ProviderCredentialsMap
ProviderType
RedirectHostsFilter
SocketHostAddressSecurityFilter
SocketHostNameSecurityFilter
SourcePath
UseAdsi
UseNestedGroups
UseNetscape
UseNtlm
UseSecureLdap
UseSSL
WebServerAuthOnly

2.25 文字列

次の変数は、文字列に関連しています。

StrConfineOverflowChars

2.26 ユーザー

次の変数は、ユーザーに関連しています。

DefaultAccounts
ExclusiveCheckout
SysAdminAddress
UserCacheClusterSupport
UserCacheMaxSizeMatchInitialSize
UserCacheMaxSize
UserCacheTimeout

2.27 Webサーバー

次の変数は、Webサーバーに関連しています。

DomainControllerName
HttpAbsoluteWebRoot
HttpBrowserHttpHostDoesNotHavePort
HttpIgnoreWebServerInternalPortNumber
HttpRelativeWebRoot
HttpServerAddress
IdcAuthExtraRequestParams
IdcHttpHeaderVariables
IntradocRealm
PLUGIN_DEBUG
RedirectHostsFilter
SocketHostAddressSecurityFilter
SocketHostNameSecurityFilter
UseSSL
WebServerAuthOnly

2.28 ワークフロー

次の変数は、ワークフローに関連しています。

DisableESigSSLCheck
EmailNotificationType
IsSavedWfCompanionFile
isRepromptLogin
PrimaryWorkQueueTimeout
UseDatabaseWfInQueue
WorkflowDir
WorkflowIntervalHours

3 構成変数

この章では、Oracle WebCenter Contentの構成変数をアルファベット順にリストし、各変数の詳細について説明します。

AccessListPrivilegesGrantedWhenEmpty

この構成変数は、アクセス制御リストが空の場合に、アクセスが拒否されるのではなく、全員にアクセスが許可されるというコア・コラボレーションのデフォルトの動作を変更します。すべてのアクセス制御リストが空白の場合、管理ロールを付与されているユーザーを除くすべてのユーザーは、権限を拒否されます。

このフラグがFALSEに設定されている場合、適切なアクセス制御リストを指定する場合を除き、コンテンツ・サーバーにアクセスできないか、またはコンテンツ・サーバーにドキュメントをチェックインできない可能性があります。たとえば、AccessListPrivilegesGrantedWhenEmpty=falseが設定されているときに、testroleロールを付与されているユーザーがドキュメントをチェックインしてアクセスする場合、ロール・エンティティのアクセス制御リストで読取り/書込み(RW)権限を持つtestroleを指定する必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

パラメータ

パラメータはありません。0 (FALSE)を設定するだけで、すべてのユーザーに対してアクセスを拒否します。

例

次の例では、アクセス制御リストが空の場合、(管理ロールを付与されているユーザーを除く)すべてのユーザーがアクセスを拒否されます。

AccessListPrivilegesGrantedWhenEmpty=0

AccesslistPrivilegesGrantedWhenEmpty

コンテンツ・サーバーでアクセス制御リスト(ACL)が空の場合、Oracle WebCenter Content: Recordsでリストが空の場合と同じ動作を行うことを指定します。

- FALSEに設定されている場合、Recordsの空のACLは、ACLが定義されていない場合と同様に動作します。

- TRUEに設定されている場合、標準のWebCenter ContentでACLが定義されていない場合は管理権限を持つユーザーのみがコンテンツにアクセスできます。

デフォルトはFALSEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

AccesslistPrivilegesGrantedWhenEmpty=false

AdditionalIndexBuildParams

すべてのインデクサの実行にビルド・パラメータを追加します。

- 索引を作成する際、数回に1回のバルクロードの後ではなく、すべてのバルクロードの後に、強制的に最適化を実行するために使用できます。たとえば、コレクションの完全なマージが行われていない場合、コレクションが複数のファイルに分散する可能性があり、検索効率が低下し、多数のファイル・ハンドルを使用します。

- デフォルトは空の文字列です。

使用方法

- 第2.16項「索引の作成」

パラメータ

- 各ビルド・パラメータには、接頭辞としてハイフンを付けます。たとえば、-repairとなります。

- ビルド・パラメータに独自のサブパラメータが存在する場合、最初のサブパラメータにはハイフンを付けません。たとえば、-optimize maxmergeとなります。

- ビルド・パラメータに複数のサブパラメータが存在する場合、2番目以降の各サブパラメータには接頭辞としてハイフンを付けます。たとえば、-optimize maxmerge -squeezeとなります。

パラメータ

説明

-repair

コレクションを修復します。

-servlev

サービス・レベルをオーバーライドして、コレクションの機能を有効にします。次のパラメータを1つ以上使用します。
search: 検索および取得を有効にします。

optimize: コレクションの最適化を有効にします。

assist: 単語リストの作成を有効にします。

housekeep: 不要なファイルのハウスキーピングを有効にします。

insert: ドキュメントの追加および更新を有効にします。

delete: ドキュメントの削除を有効にします。

backup: バックアップを有効にします。

purge: バックグラウンドでのパージを有効にします。

repair: コレクションの修復を有効にします。

index: insert -deleteと同じです。

dataprep: search -optimize -assist -housekeep -indexと同じです。

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AdditionalIndexBuildParams=-repair

AdditionalIndexBuildParams=-optimize maxclean

AdditionalIndexBuildParams=-optimize maxmerge -squeeze

AdditionalSubscriptionCollatedFieldList

サブスクリプションに表示される追加のフィールドのリストを定義します。

デフォルトのフィールドは、SubscriptionCollatedFieldListに定義されています。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

AdditionalSubscriptionCollatedFieldList=dOriginalName

関連項目

- SubscriptionCollatedFieldList

AllowAllRedirectUrls

RedirectHostsFilterで定義されている機能をリセットし、その変数が定義される前と同じようにコンテンツ・サーバーが動作するようにします。この変数をTRUEに設定すると、RedirectHostsFilterで指定されているURLではなく、任意のURLにユーザーをリダイレクトできます。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AllowAllRedirectUrls=true

関連項目

- RedirectHostsFilter

AllowAlternateMetaFile

ユーザーが代替ファイルとしてメタデータ専用のコンテンツを発行できるようにします。

- メタデータ専用ファイルの作成機能を有効にします。この場合、コントリビュータは代替ファイルを指定しません。かわりに、テンプレートおよびコンテンツ・アイテムのメタデータを使用して代替ファイルが作成されます。

- config.cfgファイルでTRUEに設定されている場合、チェックイン・ページにチェック・ボックスが追加されます。このチェック・ボックスを選択すると、createAlternateMetaFile設定が有効になり、代替ファイルを実際に作成することをシステムに指示します。

- デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AllowAlternateMetaFile=true

関連項目

- createAlternateMetaFile

- AllowPrimaryMetaFile

AllowConcurrentUpdate

索引の再構築中に既存コレクションに新規ドキュメントを追加することを許可します。

これは、再構築する新しい索引タイプ(たとえばDATABASE.FULLTEXT)が既存または古い索引タイプ(たとえばOracleTextSearch)と異なる場合はサポートされません。

使用方法

- 第2.16項「索引の作成」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

AllowConcurrentUpdate=TRUE

AllowForceDelete

他のコンテンツ・アイテムが参照または使用しているコンテンツ・アイテムを削除するために使用します。

デフォルトの設定は、AllowForceDelete=FALSEです。この場合、コンテンツ・サーバー・インスタンスは、リンクとして参照されているコンテンツ・アイテムの削除リクエストを拒否するように構成されます。

AllowForceDelete=trueに設定されている場合、コンテンツ・サーバーはリンクとして参照されているコンテンツ・アイテムを削除できます。他のコンテンツ・アイテムが参照しているコンテンツ・アイテムを削除すると、そのリンクは無効化されます。値をtrueに設定していない場合、参照されているコンテンツ・アイテムの削除リクエストは失敗します。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AllowForceDelete=TRUE

関連項目

- リンク・マネージャの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

AllowMatchesInDateCheck

TRUEに設定されている場合、前のリビジョン日に一致する日付が有効となるように日付検証コードが変更されます。

- この変数を設定すると、アーカイブのインポートおよびバッチ・ロード・プロセスで、作成日またはリリース日が一致するコンテンツ・アイテムのリビジョンをインポートできます。

- アーカイバの標準の日付検証では、通常は、ドキュメントの前のリビジョンと一致するか、またはその1分以内であるリビジョンのインポートは許可されません。

使用方法

- 第2.1項「アーカイバ」

場所

IntradocDir/config/config.cfg

例

AllowMatchesInDateCheck=TRUE

AllowPrimaryMetaFile

ユーザーがプライマリ・ファイルとしてメタデータ専用のコンテンツを発行できるようにします。

- メタデータ専用ファイルの作成機能を有効にします。この場合、コントリビュータはプライマリ・ファイルを指定しません。かわりに、テンプレートおよびコンテンツ・アイテムのメタデータを使用してプライマリ・ファイルが作成されます。

- config.cfgファイルでTRUEに設定されている場合、チェックイン・ページにチェック・ボックスが追加されます。このチェック・ボックスを選択すると、createPrimaryMetaFile設定が有効になり、プライマリ・ファイルを実際に作成することをシステムに指示します。

- デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AllowPrimaryMetaFile=true

関連項目

- AllowAlternateMetaFile

- createPrimaryMetaFile

AllowRetentionPeriodWithoutCutoff

非レコード・コンテンツ・アイテムのトリガーの保存期間を指定します。

- TRUEに設定されている場合、非レコード・コンテンツ・アイテムのトリガーの保存期間が有効になります。

- FALSEに設定されている場合、保存期間は無効になります。

デフォルトはTRUEです。

この変数を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

AllowRetentionPeriodWithoutCutoff=false

AllowSamePrimaryAlternateExtensions

プライマリ・ファイルと代替ファイルに同じファイル拡張子を使用することを許可します。

- TRUEに設定されている場合、プライマリ・ファイルと代替ファイルに同じファイル拡張子を使用できます。

- FALSEに設定されている場合、プライマリ・ファイルと代替ファイルに同じファイル拡張子を使用できません。

- デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

AllowSamePrimaryAlternateExtensions=true

AllowSecondaryConversion

ネイティブ変換ステップが失敗した場合、Inbound Refineryでバックアップ変換ステップを使用するかどうかを定義します。

- TRUEに設定されている場合、変換に失敗するとバックアップ変換ステップが使用されます。

- FALSEに設定されている場合、変換に失敗してもバックアップ変換ステップは使用されません。

デフォルトはTRUEです。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「ローカルInbound Refineryの構成」画面、「一般」タブ、セカンダリ変換ステップを許可する

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

AllowSecondaryConversion=false

関連項目

- SecondaryConversionStepName

AllowSkippedHyperlinktoCauseIncomplete

ハイパーリンクをPDFに変換できない場合、この変換はincompleteとしてマークされます。

- TRUEに設定されている場合、リンクを変換できないと、この変換はincompleteとしてマークされます。

- FALSEに設定されている場合、変換できないハイパーリンクはスキップされ、この変換はconvertedとしてマークされます。

デフォルトはTRUEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとして:

AllowSkippedHyperlinktoCauseIncomplete=false

AppendToAllowedUploadServices

カスタムまたは標準のファイル・アップロード・サービス・リストにサービスを追加します。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.3項「クライアント」

場所

IntradocDir/config/config.cfg

例

構成エントリとして:

AppendToAllowedUploadServices=<ServiceName1>,<ServiceName2>,<ServiceName3>

関連項目

- ForcePermissionCheckforAllowedUploadServices

AppletChunkSize

チャンク化機能の転送チャンク・サイズを設定します(バイト単位)。

- サイズがAppletChunkThresholdを超えるファイルは、このサイズのチャンクで転送されます。

- デフォルトは1MBです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

AppletChunkSize=10000

関連項目

- AppletChunkThreshold

- ChunkedRequestTrace

- DisableHttpUploadChunking

AppletChunkThreshold

チャンク化機能の最小ファイル・サイズを設定します(バイト単位)。

- このサイズより小さいファイルには、チャンク化機能は使用されません。

- デフォルトは1MBです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

AppletChunkThreshold=500000

関連項目

- AppletChunkThreshold

- ChunkedRequestTrace

- DisableHttpUploadChunking

ArchiverDoLocks

ファイル・システム・レベルで、アーカイブ・ファイルに対するロック・アルゴリズムをアクティブ化します。

- 複数のコンテンツ・サーバー・インスタンスで1つのインスタンスを共有して、自動化されたインポートまたは転送を実行する場合、この変数をTRUEに設定します。

- ロード・バランシング構成で、1つのインスタンスのみが自動化されたインポートまたは転送を実行する場合、この変数を設定する必要はありません。

- デフォルトの設定はありません。

使用方法

- 第2.1項「アーカイバ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

ArchiverDoLocks=true

関連項目

- ArchiverTouchMonitorInterval

- ArchiverTraceLockMaintenance

- ArchiverTraceLocks

ArchiverTouchMonitorInterval

競合するコンテンツ・サーバー・インスタンスが、タイムスタンプが変化しないアーカイブ・ロック・ファイルを期限切れとして処理するまでの待機時間を定義します。また、コンテンツ・サーバー・インスタンスは、この期間中に、維持しているロックに対してtouchを2回実行します。

- アーカイブ・ロックは、適切なディレクトリにロック・ファイルを配置すると作成されます。ロックが持続するには、ファイルのタイムスタンプが定期的に変化する必要があります。変化しない場合、競合するコンテンツ・サーバー・インスタンスがそのロックを期限切れのロックとして処理します。

- この設定の値が小さいほど、ロックがコンテンツ・サーバー・インスタンス間で移動する頻度が増えます。値が大きいほど、ネットワーク・ドライブでアクティビティが増えることによって(touchリクエストが数秒間遅延する可能性がある)、コンテンツ・サーバー・インスタンスがロックは期限が切れたと誤って報告する可能性が高くなります。ロックの期限切れが誤りである場合、処理の重複を生じる可能性があります(ただし、コンテンツ・サーバー・インスタンスの状態への長期的な影響はありません)。

- デフォルトは12000ミリ秒(12秒)です。

使用方法

- 第2.1項「アーカイバ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

ArchiverTouchMonitorInterval=15000

関連項目

- ArchiverDoLocks

- ArchiverTraceLockMaintenance

- ArchiverTraceLocks

ArchiverTraceLockMaintenance

タイムスタンプのメンテナンスのために、未処理のアーカイブ・ロックおよび他のサーバーによって維持されているロックのタイムスタンプの変化の検出に関するトレース情報をコンソールにダンプします。

- アーカイブ・ロックは、適切なディレクトリにロック・ファイルを配置すると作成されます。ロックが持続するには、ファイルのタイムスタンプが定期的に変化する必要があります。変化しない場合、競合するコンテンツ・サーバー・インスタンスがそのロックを期限切れのロックとして処理します。

- デフォルトの設定はありません。

注意:
この変数は、Content Server 7.0のリリースの時点で廃止されています。現在この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.1項「アーカイバ」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

ArchiverTraceLockMaintenance=true

関連項目

- ArchiverDoLocks

- ArchiverTouchMonitorInterval

- ArchiverTraceLocks

ArchiverTraceLocks

アーカイブのロックの取得および解放の際に、トレース情報をコンソールにダンプします。

デフォルトの設定はありません。

注意:
この変数は、Content Server 7.0のリリースの時点で廃止されています。現在この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.1項「アーカイバ」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

ArchiverTraceLocks=true

関連項目

- ArchiverDoLocks

- ArchiverTouchMonitorInterval

- ArchiverTraceLockMaintenance

AuthorDelete

コンテンツ・アイテムの作成者が、セキュリティ・グループの削除権限を持っていなくても自分のリビジョンを削除できるようにします。

- TRUEに設定されていて、コンテンツ・サーバーがフォルダを使用するように構成されている場合(FrameworkFoldersコンポーネントにより有効化されます)、読取り権限を持っているかぎり、作成者は自分のリビジョンを削除できます。読取り権限を持っていない場合、コンテンツ・アイテムのセキュリティ・グループの削除権限が必要です。

- TRUEに設定されていて、コンテンツ・サーバーがコントリビューション・フォルダを使用するように構成されている場合(Folders_gコンポーネントにより有効化されます)、作成者は、コンテンツ・アイテムのセキュリティ・グループの削除権限がなくても、自分のリビジョンを削除できます。

- デフォルトは空の文字列です。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

- 「システム・プロパティ」、「コンテンツ・セキュリティ」タブ、「作成者にリビジョンの削除を許可する」

- 「管理」、「管理サーバー」、「コンテンツ・セキュリティ」メニュー・オプション、「作成者にリビジョンの削除を許可する」

- IntradocDir/config/config.cfg

例

構成エントリとして:

AuthorDelete=true

Idoc Scriptとして:

<$if AuthorDelete$>
<$AuthorDelete$>
<$else$>
false
<$endif$>

AutoNumberPrefix

自動番号付けされたすべてのコンテンツIDに追加される接頭辞を定義します。

- 自動番号付け接頭辞を返します(構成設定の値を返します)。

- 文字列を返します。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

- 「システム・プロパティ」、「オプション」タブ、「自動的に名前の前に付ける接頭辞」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「自動採番接頭辞」

- IntradocDir/config/config.cfg

例

構成設定として、自動番号付け接頭辞を定義します。

AutoNumberPrefix=HR

Idoc Scriptとして、構成設定の値を返します。

<$AutoNumberPrefix$>

関連項目

- IsAutoNumber

AutoNumberWidth

コンテンツID番号に6桁より大きい桁数を使用することを許可し、最大1億(8桁)のコンテンツ・アイテムをサポートします。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

- IntradocDir/config/config.cfg

例

構成設定の使用例:

AutoNumberWidth=8

BatchLoaderPath

デフォルトのバッチ・ロード・テキスト・ファイルへのパスを定義します。

文字列としてファイル・パスを返します。

使用方法

- 第2.2項「バッチ・ローダー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

- Windows構成エントリとしての使用例:

BatchLoaderPath=c:/domain/BatchLoader/batchfile.txt

- Solaris/UNIX構成エントリとしての使用例:

BatchLoaderPath=/u1/intradoc3/batLd/batchfile

- Idoc Scriptとして、文字列としてファイル・パスを返します。

<$BatchLoaderPath$>

BatchLoaderUserName

バッチ・ローダー・ユーティリティの認可ユーザー名を定義します。ユーザー名は管理ロールに属している必要があります。

- デフォルトはsysadminです。

- バッチ・ローダーのユーザー名を文字列として返します。

使用方法

- 第2.2項「バッチ・ローダー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

BatchLoaderUserName=sysadmin

BinDir

コンテンツ・サーバーを起動する実行可能ファイル(IdcServer.exeなど)のパスを定義します。

使用方法

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

BinDir=c:/domain/bin/

CachedResultRowCount

検索キャッシュのサイズを設定します。

- 検索キャッシュに検索エンジンの最近の問合せをキャッシュすることによって、パフォーマンスを向上できます。サイズを増やすと、検索時間は短縮されますが、メモリー使用量が増えます。

- デフォルトは40,000行です。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

CachedResultRowCount=30000

ChunkedRequestTrace

コンテンツ・サーバーの「サーバー出力の表示」ページに、チャンク化ファイル転送リクエストを出力します。

- TRUEに設定されている場合、「サーバー出力の表示」ページにチャンク化リクエストが出力されます。

- FALSEに設定されている場合、チャンク化リクエストは出力されません。

- この設定でデータを出力するには、DisableHttpUploadChunkingを使用してチャンク化機能を有効にする必要があります。

- デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.11項「デバッグ」

場所

- 「管理」、「システム監査情報」、「サーバー出力の表示」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

ChunkedRequestTrace=true

関連項目

- AppletChunkSize

- AppletChunkThreshold

- DisableHttpUploadChunking

CleanUp

バッチ・ロードされるファイルをファイル・システムから削除するかどうかを決定します。

- TRUEに設定されている場合、バッチ・ロードされたファイルが正常にチェックインまたは更新された場合は、各ファイルをハード・ドライブから削除します。

- デフォルトはFALSEです。

使用方法

- 第2.2項「バッチ・ローダー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

CleanUp=true

ClearMissingAttributes

JpsUserプロバイダによってLDAPサービスからOracle WebCenter Contentにマッピングされているカスタム・フィールドを消去します。マッピングしているカスタム・フィールドの一部の値を削除する場合に便利です。この変数を有効にしてtrueに設定する場合を除き、Oracle WebCenter Contentは、欠落している属性を無視して、前の値を使用し続けます。

デフォルトはFALSEです。

使用方法

- 第2.24.2項「外部セキュリティ」

- 第2.7項「コンテンツ・サーバー」

場所

- IntradocDir/data/providers/jpsuserprovider/provider.hda

例

構成エントリとしての使用例:次の行をファイル内の@end行より前に追加してください。ファイルの最後は次のようになります。

SourcePath=jpsuser
ProviderClass=idc.provider.jps.JpsUserProvider
ClearMissingAttributes=true
@end

coaoShowLinkExtensions

指定したパターンにリストされているファイル拡張子値の場合のみ、「Checkout and Openコンポーネント」の「編集」アクション・メニューが表示されるように制限します。このアクション・メニューは、ファイル拡張子がパターンに一致する場合に表示されます。

デフォルト値は、*doc*|*xls*|*ppt*|*vsd*です。これは、「チェックアウトして開く」アクションは、デフォルトではMicrosoft Word、Excel、PowerPointおよびVisioのファイルでのみ使用可能であることを意味します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/components/CheckoutAndOpenInNative/checkoutandopennnnsative_environment.cfg

例

構成エントリとしての使用例:

coaoShowLinkExtensions=*doc*|*xls*|*ppt*|*vsd*

CollectionDeleteEnabled

ユーザーがコントリビューション・フォルダおよびコンテンツ・アイテムを削除できるように「削除」アイコンを表示するかどうかを指定します。

- TRUEに設定されている場合、「削除」アイコンは表示され、ユーザーは「検索」ページからコントリビューション・フォルダおよびコンテンツ・アイテムを削除できます。

- FALSEに設定されている場合、「削除」アイコンは非表示になります。

- この変数がユーザーによって明示的に指定されていない場合のデフォルト値はTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionDeleteEnabled=true

CollectionHiddenMeta

フォルダまたはコンテンツ・アイテムの表示と非表示をユーザーが指定できるようにします。

- この設定により、「検索」ページに「表示/非表示」アイコンが追加されます。

- この設定により、「フォルダ構成」ページに「ブラウザで閲覧するときに非表示ファイルを表示」チェック・ボックスが追加されます。

- これは、コントリビューション・フォルダ・インストーラ・プログラムによって、インストール時に指定されたオプションに従って、自動的に設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/data/components/Folders_g/install.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionInfoEnabled

「アクション」メニューの「フォルダ情報」オプションおよび「コンテンツ情報」オプションの表示/非表示を指定します。

- TRUEに設定されている場合、「アクション」メニューに「フォルダ情報」オプションおよび「コンテンツ情報」オプションが表示されるので、ユーザーはフォルダおよびコンテンツ・アイテムの情報を表示することを選択できます。

- FALSEに設定されている場合、「アクション」メニューの「フォルダ情報」オプションおよび「コンテンツ情報」オプションは非表示になります。

- この変数がユーザーによって明示的に指定されていない場合のデフォルト値はTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionInfoEnabled=false

CollectionInhibitUpdateMeta

メタデータ伝播機能の禁止フィールドを定義します。この変数により、コントリビュータは、コントリビューション・フォルダからそのサブフォルダおよびコンテンツ・アイテムにメタデータ値をコピーできるようになります。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionLinkEnabled

「アクション」メニューの「ショートカットの作成」オプションの表示/非表示を指定します。

- TRUEに設定されている場合、「アクション」メニューに「ショートカットの作成」オプションが表示されるので、ユーザーはコントリビューション・フォルダへのショートカットを作成することを選択できます。

- FALSEに設定されている場合、「アクション」メニューの「ショートカットの作成」オプションは非表示になります。

- この変数がユーザーによって明示的に指定されていない場合のデフォルト値はTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionLinkEnabled=false

CollectionLocation

アーカイブ・コレクションの場所を定義します。アーカイブ・ディレクトリをデフォルトとは異なる場所に変更する場合、新しい場所を指定する必要があります。

デフォルトはDomainHome/ucm/cs/archives/です。

使用方法

- 第2.1項「アーカイバ」

- 第2.12項「ディレクトリとパス」

場所

- IntradocDir/config/config.cfg

- DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

CollectionLocation=c:/domain/new/archives/

CollectionMeta

各コントリビューション・フォルダの一意のコレクションIDの保存に使用するメタデータ・フィールドを指定します。

- この設定が構成ファイルで指定されていない場合、デフォルト値はxCollectionIDです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionMoveEnabled

検索ページに「移動」アイコンを表示するかどうかを指定します。

- TRUEに設定されている場合、「移動」アイコンが表示されるので、ユーザーはコントリビューション・フォルダおよびコンテンツ・アイテムを他のコントリビューション・フォルダに移動できます。

- FALSEに設定されている場合、「移動」アイコンは非表示になります。

- この変数がユーザーによって明示的に指定されていない場合のデフォルト値はTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionMoveEnabled=true

CollectionReadOnlyMarkedFolders

システムレベルのコントリビューション・フォルダ(コントリビューション・サーバーのフォルダやごみ箱など)を変更(すなわち読取り専用ステータスに設定)できるかどうかを指定します。

- TRUEに設定されている場合、システムレベルのコントリビューション・フォルダを変更できません。

- FALSEに設定されている場合、変更できます。

- この変数は、デフォルトではTRUEに設定されます。

- この変数がFALSEに設定されている場合、システムレベルのコントリビューション・フォルダに、権限のある担当者のみ変更できるように、適切なセキュリティ・グループを割り当てる必要があります。システムレベルのコントリビューション・フォルダを変更するのは、特にそうする理由がある場合のみにする必要があります。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionReadOnlyMarkedFolders=true

CollectionReadOnlyMeta

コントリビューション・フォルダおよびその内容を読取り専用にするかどうかを、ユーザーが指定できるようにします。

- 読取り専用は、インスタンスが実行される動作環境のルールの制約を受けます。

- これにより、検索ページに「読取り専用」/「編集可能」アイコンが追加されます。

- この設定は、現在のコントリビューション・フォルダ・レベルにのみ適用されます。サブフォルダは、親からステータスを継承しません。

- この変数は、フォルダ・インストール・プログラムによって、インストール時に指定されたオプションに従って、自動的に設定されます。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/data/components/Folders_g/install.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionReleasedOnly

改訂されたドキュメントを、作成者およびコンテンツ・アイテムに対する読取り権限を持つユーザーが表示できるかどうかを指定します。

- FALSEに設定されている場合、作成者およびコンテンツ・アイテムに対する読取り権限を持つすべてのユーザーが最新バージョンを表示できます。コンテンツ・アイテムを表示できるかどうかは、リリース状態ではなく、アイテムのバージョンに基づいて決まります。
作成者および読取りアクセス権があるユーザーは、改訂されたアイテムを、それが変換、索引作成およびリリースの前か後かに関係なく、表示できます。改訂されたコンテンツ・アイテムが変換または索引作成に失敗した場合も、作成者および読取りアクセス権があるユーザーはそれを表示できます。新しいリビジョンのリリース日が将来の日付に設定されている場合も、作成者および読取りアクセス権がある他のすべてのユーザーは、改訂されたコンテンツ・アイテムを表示できます。

- TRUEに設定されている場合、リリースされていないアイテムに作成者以外のユーザーがアクセスした場合、コンテンツ・アイテムをまったく表示できません。コンテンツ・アイテムを表示できるかどうかは、アイテムのバージョンではなく、リリース状態に基づいて決まります。
コンテンツ・アイテムの新しいリビジョンがコントリビューション・フォルダにチェックインされた場合、作成者のみがこの新しいリビジョンを表示できます。この新しいリビジョンの変換、索引作成およびリリースが完了すると、そのコンテンツ・アイテムの読取りアクセス権がある他のユーザーが新しいリビジョンを表示できます。したがって、コンテンツ・アイテムがリリースされるまで、作成者以外のユーザーには何も表示されません。新しいリビジョンのリリース日が将来の日付に設定されている場合、他のユーザーはその日になるまで、改訂されたコンテンツ・アイテムを表示できません。

- この変数は、デフォルトではFALSEに設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionReleasedOnly=false

CollectionSecurityReadOnly

ユーザーが読取り権限のみを持つコンテンツ・アイテムを表示できるかどうかを指定します。

- TRUEに設定されている場合、ユーザーは読取り権限のみを持つコンテンツ・アイテムを表示できます。

- FALSEに設定されている場合、ユーザーはコンテンツ・アイテムを表示するために、少なくとも書込み権限を持つ必要があります。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

構成エントリとしての使用例:

CollectionSecurityReadOnly=false

CollectionTrashDeleteDate

ごみ箱機能の日付メタデータ・フィールドを定義します。

- 設定されている場合、ごみ箱機能の日付メタデータ・フィールドが定義され、ごみ箱フォルダに移動されているアイテムのメタデータとして、削除日時を記録できるようになります。

- この変数は、インストール時にごみ箱機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionTrashDeleteLocation

ごみ箱機能の親コントリビューション・フォルダを指定する整数メタデータ・フィールドを定義します。

- 設定されている場合、ごみ箱フォルダに移動されているアイテムのメタデータとして、元の親コントリビューション・フォルダを記録できるようになります。

- 設定されている場合、ユーザーはごみ箱フォルダから削除済アイテムを復元できます。

- 設定されている場合、ごみ箱フォルダで削除日時が表示されます。

- この変数は、インストール時にごみ箱機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionTrashDeleteOldName

削除の際にファイル名を追跡するためのごみ箱機能のメタデータ・フィールドを定義します。

- 設定されている場合、ごみ箱フォルダで名前が競合するために名前が変更されているファイルを、元のファイル名で復元できます。

- これは、ごみ箱機能のファイル名メタデータ・フィールドを定義します。これにより、ごみ箱フォルダに移動されているアイテムのメタデータとして、元のファイル名を記録できるようになります。

- この変数は、インストール時にごみ箱機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionTrashDeleter

削除の際にユーザーを追跡するためのごみ箱機能のメタデータ・フィールドを定義します。

- 設定されている場合、ごみ箱フォルダに移動されているアイテムのメタデータとしてユーザーのログイン情報を記録するためのごみ箱機能のメタデータ・フィールドを定義します。

- 設定されている場合、ユーザーは、自分がごみ箱フォルダに移動したアイテムのみを表示するか、すべてのユーザーがごみ箱フォルダに移動したすべてのアイテムを表示するかを選択できます。

- この変数は、インストール時にごみ箱機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

関連項目

この機能は、手動で有効にできます。詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

CollectionWebDAVServer

Windowsエクスプローラで表示の切替えを有効にします。

- WebDAV URLに設定されている場合、ユーザーは、コンテンツ・サーバーのページからWindowsエクスプローラのWebDAVコントリビューション・フォルダに表示を切り替えることができます。

- この機能を使用するには、コンテンツ・サーバー・インスタンスにWebDAV機能がインストールされている必要があります。

- Microsoft Internet Explorer 5.0以降では、仮想検索コントリビューション・フォルダにWebコントリビューション・フォルダ・アイコン(このアイコンは他のどのブラウザにも表示されません)が追加されます。

- この変数は、インストール時にWebDAV機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

- WebDAV機能が、フォルダ・インストール・プログラムによって設定されているのではなく、環境変数の設定によって有効化されている場合、コンテンツ・サーバー・インスタンスのWebDAVルートにこの設定を設定する必要があります。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

CollectionWebDAVServer=http://domain/_dav/cs/idcplg/webdav

ColumnMapFile

列マッピングのHTMリソース・ファイルを指定します。

- 列マッピング・ファイルは、データベース列名をすべて大文字(Oracleで必要)にマッピングするために使用されます。

- 参照されているパスが存在しない場合、デフォルト・パスはIntradocDir/shared/config/resources/です。

- コンテンツ・サーバーで提供される標準の列マッピング・ファイルは、upper_clmns_map.htmです。

- デフォルト値はありません。

使用方法

- 第2.9項「データベース」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ColumnMapFile=upper_clmns_map.htm

ConfigDir

config/ディレクトリへのパスを定義します。

デフォルトはIntradocDir/config/です。

使用方法

- 第2.9項「データベース」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成設定の使用例:

ConfigDir=c:/domain/config/

ConversionCacheExpirationPeriodInDays

Dynamic Converterコンテンツがキャッシュに残存する最小日数を定義します。

- Dynamic Converterにより変換されたコンテンツは、(最終アクセス日に基づいて)この日数が経過するまで、キャッシュから削除されません。次回のクリーンアップ・スキャンの実行時期によっては、コンテンツがこの日数より長くキャッシュに残存する可能性があります。「DatedCacheIntervalDays」を参照してください。

- この設定は、コンテンツ・サーバーに存在しないファイルか、強制変換または事前変換では生成されていないファイルにのみ適用されます。キャッシュのクリーンアップ・ルールの詳細は、「MaxConversionCacheSizeInMegs」を参照してください。

- デフォルトは7です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ConversionCacheExpirationPeriodInDays=14

関連項目

- DatedCacheIntervalDays

- MaxConversionCacheSizeInMegs

CookieAuthTimeoutInDays

ExtranetLookコンポーネントとともに使用されます。この変数は、Webリクエストを監視してリクエストが認証されているかどうかを判断するCookieLoginPluginとともに使用されます。ブラウザのCookieに基づいて認証をサポートできます。

- CookieAuthTimeoutInDaysが正の数値に設定されている場合、その日数の期間中はCookieはタイムアウトしません。ユーザーには、Cookieをクリアするログアウト・オプションが必要です。

- ゼロ(0)以下に設定されている場合、ブラウザ・セッションが無効になるまでCookieは有効です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

CookieAuthTimeoutInDays=2

関連項目

- CookieProxyPassword

- IsWebServerPagesOnly

CookieProxyPassword

ExtranetLookコンポーネントとともに使用されます。この変数は、ユーザーがCookie認証を使用してWebサイトにログインする際に、パスワードの暗号化に使用されます。Webリクエストを監視してリクエストが認証されているかどうかを判断するCookieLoginPluginとともに使用されます。ブラウザのCookieに基づいて認証をサポートできます。これは、任意の値に設定できます。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

CookieProxyPassword=x2x

関連項目

- CookieAuthTimeoutInDays

- IsWebServerPagesOnly

createAlternateMetaFile

ユーザーが代替ファイルとしてメタデータ専用のコンテンツを発行できるようにします。

- メタデータ専用の代替ファイルを作成することを、システムに指示します。この場合、コントリビュータは代替ファイルを指定しません。かわりに、テンプレートおよびコンテンツ・アイテムのメタデータを使用して代替ファイルが作成されます。

- AllowAlternateMetaFileがTRUEに設定されている場合、チェックイン・ページにチェック・ボックスが追加されます。このチェック・ボックスが選択されている場合、createAlternateMetaFile変数が有効になります。

- バッチ・ローダーで使用する場合、バッチ・ロード・ファイルでcreateAlternateMetaFileがTRUEに設定されている必要があります。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

createAlternateMetaFile=true

関連項目

- AllowAlternateMetaFile

- createPrimaryMetaFile

createPrimaryMetaFile

ユーザーがプライマリ・ファイルとしてメタデータ専用のコンテンツを発行できるようにします。

- メタデータ専用のプライマリ・ファイルを作成することを、システムに指示します。この場合、コントリビュータはプライマリ・ファイルを指定しません。かわりに、テンプレートおよびコンテンツ・アイテムのメタデータを使用してプライマリ・ファイルが作成されます。

- AllowPrimaryMetaFileがTRUEに設定されている場合、チェックイン・ページにチェック・ボックスが追加されます。このチェック・ボックスが選択されている場合、createPrimaryMetaFile変数が有効になります。

- バッチ・ローダーで使用する場合、バッチ・ロード・ファイルでcreatePrimaryMetaFileがTRUEに設定されている必要があります。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

createPrimaryMetaFile=true

関連項目

- AllowPrimaryMetaFile

- createPrimaryMetaFile

DatabasePreserveCase

データベースから取得した文字の大/小文字を保持するかどうかを定義します。

- TRUEに設定されている場合、文字の大/小文字は保持されます。

- Oracleおよび大/小文字が区別される他の任意のデータベースでは、この設定はTRUEである必要があります。

- デフォルトはTRUEです。

使用方法

- 第2.9項「データベース」

場所

- 「システム・プロパティ」、「データベース」タブ、「データベース内で大文字と小文字の区別を保持する」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DatabasePreserveCase=false

DatabaseWildcards

データベース問合せで、複数文字を表すために使用されるワイルドカード文字を定義します。

- JDBCデータベースの場合、デフォルトは%です。

- Microsoft Accessの場合、デフォルトは*です。

使用方法

- 第2.9項「データベース」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DatabaseWildcards=%

DatedCacheIntervalDays

キャッシュされているDynamic Converterコンテンツを削除するスキャンの実行間隔の日数を定義します。

- コンテンツ・サーバーはこの間隔でスキャンして、キャッシュされている古いコンテンツを検索し、削除します。

- デフォルトは7です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DatedCacheIntervalDays=30

関連項目

- ConversionCacheExpirationPeriodInDays

- MaxConversionCacheSizeInMegs

DataDir

data/ディレクトリへのパスを定義します。

デフォルトはIntradocDir/data/です。

使用方法

- 第2.12項「ディレクトリとパス」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

DataDir=c:/domain/data/

DateOutputFormat

インデクサの日付出力フォーマットを設定します。

デフォルト値はありません。

使用方法

- 第2.10項「日付および時間」

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DateOutputFormat=M/d/yyyy hh:mm:ss a

DCMaxFileSize

Dynamic Converterが処理するファイルの最大サイズ(バイト数)を定義します。

- ソース・ファイルのサイズが指定されている値よりも大きい場合、変換は実行されません。

- デフォルトは20000000 (20MB)です。

- Dynamic Converterバージョン5.0以降で使用されます。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DCMaxFileSize=10000000

DCTimeOut

Dynamic Converter変換プロセスのタイムアウト値を設定します(分単位)。

- ドキュメントからHTMLへの動的変換の待機時間を定義します(分単位)。

- デフォルトは3分です。

- Dynamic Converterバージョン5.0以降で使用されます。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DCTimeOut=5

DCViewFormat

Dynamic Converterによって変換されるソース・ファイルのレンディションを定義します。

- native: ネイティブ・ファイルが変換されます。これがデフォルトです。

- webviewable: Web表示可能ファイルが変換されます。

- alternate: 代替ファイルが変換されます。

Dynamic Converterバージョン5.0以降で使用されます。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DCViewFormat=webviewable

DebugStdConversion

コンテンツ・サーバーによって発行される変換/ステップの定義をオーバーライドする構成設定です。

使用方法

- 第2.11項「デバッグ」

パラメータ

この変数は引数として新しい定義へのパスを受け取ります。

場所

IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

DebugStdConversion=/temp/idcconversions

DefaultAccounts

匿名ユーザーのデフォルトのアカウントを定義します。

- アカウントのカンマ区切りリストを使用する必要があります。

- アカウント別の権限を、アカウント名の後にカッコに入れて指定する必要があります。

- #noneエントリは、アカウントが割り当てられていないコンテンツ・アイテムに権限を付与します。#allエントリでは、すべてのアカウントに権限が与えられます。

- デフォルトは#none(RWDA)です。

- 文字列としてアカウントのリストを返します。

使用方法

- 第2.24.1項「内部セキュリティ」

- 第2.26項「ユーザー」

場所

IntradocDir/config/config.cfg

例

構成設定として、デフォルトのアカウント情報を定義します。

DefaultAccounts=BOS(R),SEA(RW),MSP/Gen(RWD)

Idoc Scriptとして、文字列としてアカウント情報を返します。

<$DefaultAccounts$>

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の外部ユーザー・アカウントに関する項

- SelfRegisteredAccounts

DefaultFilterInputFormat

変換フィルタ(Dynamic ConverterやText Indexer Filterコンポーネントなど)のデフォルトの入力キャラクタ・セットを定義します。

- 変換製品は、システムの文字エンコーディングを使用して、変換フィルタへの入力のエンコーディングを決定します。通常はこれで十分ですが、この値をオーバーライドする必要がある場合があります。

- エンコーディング値の完全なリストは、IdcHomeDir/resources/ディレクトリにあるstd_encoding.htmファイルのlcIsoEncodingの値を参照してください。

- デフォルトはCp1252です。

使用方法

- 第2.18項「ローカライズ」

- 第2.8.1項「Inbound Refinery」

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

次は日本語テキストの構成エントリとしての使用例です。

DefaultFilterInputFormat=shift_jis

次は韓国語テキストの構成エントリとしての使用例です。

DefaultFilterInputFormat=euc-kr

関連項目

- DefaultFilterOutputFormat

DefaultFilterOutputFormat

変換フィルタ(Dynamic ConverterやText Indexer Filterコンポーネントなど)のデフォルトの出力キャラクタ・セットを定義します。

- 変換製品は、システムの文字エンコーディングを使用して、変換フィルタへの出力のエンコーディングを決定します。通常はこれで十分ですが、この値をオーバーライドする必要がある場合があります。

- エンコーディング値の完全なリストは、IdcHomeDir/resources/ディレクトリにあるstd_encoding.htmファイルのlcIsoEncodingの値を参照してください。

- デフォルトはCp1252です。

使用方法

- 第2.18項「ローカライズ」

- 第2.8.1項「Inbound Refinery」

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

次は日本語テキストの構成エントリとしての使用例です。

DefaultFilterOutputFormat=shift_jis

次は韓国語テキストの構成エントリとしての使用例です。

DefaultFilterOutputFormat=euc-kr

関連項目

- DefaultFilterOutputFormat

DefaultGraphicTimeout

デフォルトのサムネイル・タイムアウトを定義します。

- サムネイル・タイムアウト値を返します。

- この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、サムネイル変換の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は3です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound Refineryがサムネイル変換プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は60秒です。

#min

Inbound Refineryがサムネイル変換プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は5秒です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「共有Inbound Refineryの構成」画面、「タイムアウト値」タブ、グラフィックのデフォルト・タイムアウト

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

DefaultGraphicTimeout#factor=3

DefaultHtmlConversion

Dynamic Converter変換のデフォルト・テンプレートを定義します。

- この値は、デフォルトとして指定するチェックイン済のテンプレート・ファイルのコンテンツIDである必要があります。

- デフォルト値はありません。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DefaultHtmlConversion=PLAIN

DefaultHtmlRefreshTimeoutInSeconds

「処理中コンテンツ」ページ、「チェックアウト・コンテンツ」ページおよび「ワークフロー割当て」ページのリフレッシュ時間を定義します(秒単位)。

この変数に加えて、htmlRefreshTimeoutをURLまたはサービスのDataBinderで設定できます。これは、ページごとに異なるリフレッシュ時間の設定に使用できます。これが必要な場合、config.cfgファイルにDefaultHtmlRefreshTimeoutInSecondsを設定するかわりに、URLまたはデータ・バインダにhtmlRefreshTimeoutを設定します。

htmlRefreshUrlは、ページのリフレッシュ後にロードするページのURLに設定できます。デフォルトは現在のページです。この変数は、ページのURLまたはDataBinderに設定できます。

DefaultHtmlRefreshTimeoutInSecondsのデフォルト値は60です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DefaultHtmlRefreshTimeoutInSeconds=120

DefaultNativeTimeout

デフォルトのネイティブ・ファイル・タイムアウトを定義します。

- ネイティブ・ファイル・タイムアウト値を返します。

- この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、ネイティブからPostScriptへの変換の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は3です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound RefineryがネイティブからPostScriptへの変換プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は10秒です。

#min

Inbound RefineryがネイティブからPostScriptへの変換プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は2秒です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「共有Inbound Refineryの構成」画面、「タイムアウト値」タブ、ネイティブからPostScriptへの変換のデフォルト・タイムアウト

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

DefaultNativeTimeout#factor=3

DefaultPasswordEncoding

ユーザー・パスワードの格納に使用するエンコーディングのタイプを定義します。

- デフォルトでは、Secure Hash Algorithm update 1 (SHA1)が使用されます。

- オープン・テキストのパスワードを使用する場合、推奨値はOpenTextです。

- 他の空でない値が割り当てられている場合、エンコーディングは実行されません。

- デフォルト値はSHA1-CBです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DefaultPasswordEncoding=OpenText

DefaultPostscriptTimeout

デフォルトのPostScriptタイムアウトを定義します。

- デフォルトのPostScriptタイムアウト値を返します。

- この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、PostScriptからPDFへの変換の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は4です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound RefineryがPostScriptからPDFへの変換プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は2秒です。

#min

Inbound RefineryがPostScriptからPDFへの変換プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は20秒です。

使用方法

- 第2.8.2.1項「一般変数」

場所

- 「共有Inbound Refineryの構成」画面、「タイムアウト値」タブ、PostScriptからPDFへの変換のデフォルト・タイムアウト

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

DefaultPostscriptTimeout#factor=4

DirectoryLockingLogPath

ディレクトリが一時的にロックされている間のロギングを有効にして、ログ・ファイルのパスを定義します。

- ディレクトリが一時的にロックされている間に発生するエラーは、このログ・ファイルに報告されます。

- この設定に値がない場合、ロギングは無効です。

- デフォルト値はありません。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DirectoryLockingLogPath=C:/temp/locking.log

DisableContentProfiles

コンテンツ・プロファイル機能を無効にするために使用します。ただし、作成済のプロファイルは削除されません。プロファイルは、引き続きユーザー・インタフェースから使用できます。

この構成変数を使用して、コンテンツ・プロファイルまたは別のコンポーネントが特定の動作の原因かどうかを確認できます。

デバッグが完了したら、この変数をconfig.cfgファイルから削除してコンテンツ・サーバー・インスタンスを再起動し、コンテンツ・プロファイルを再び使用します。

使用方法

- 第2.6項「コンテンツ・プロファイル」

場所

IntradocDir/config/config.cfg

例

DisableContentProfiles=true

DisableDBLongIntegerField

MSDEソフトウェアの古いバージョンでは、4バイト整数を使用できました。新しいバージョンでは、8バイト以上の整数を使用します。この変数は、コンテンツ・サーバーが引き続き4バイト整数を使用できるようにします。

MSDEを使用するContent Serverバージョン6.2を新しいリリースにアップグレードする場合、dRevRank列が追加されるので、アップグレードされたインスタンスは起動しません。Content Serverバージョン6.2は、MSDEの新しいバージョンではなく、古いバージョンを使用します。この変数をTRUEに設定して追加すると、システムが起動します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableDBLongIntegerField=true

DisableESigSSLCheck

ワークフローで電子シグネチャを使用する場合、そのSSL要件を無効にします。無効にしない場合、ワークフローで電子シグネチャを使用するには、SSLを実装する必要があります。

使用方法

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableESigSSLCheck=true

DisableForcedConversions

Dynamic Converterでの強制変換および事前変換が無効かどうかを定義します。

- TRUEに設定されている場合、動的に変換されたレンディションをユーザーが参照する場合にのみDynamic Converterによってファイルが変換されます。チェックイン時には、変換(強制および事前)は行われません。

- この変数は、この設定がTRUEに設定された後にチェックインされるすべての新しいファイルに適用されます。DisableKeepingForcedConversions設定が有効な場合を除き、既存の強制変換および事前変換は引き続き使用されます。

- この変数は、次の状況で役立つ場合があります。

- 変換に使用するサーバーのキャッシュ容量または処理能力が制限されている場合

- 大部分のファイルはWebページとして表示されることがほとんどなく、動的に変換する必要があるファイルの数が比較的少ない場合

- オンザフライの変換の遅延時間が許容される場合

- デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableForcedConversions=true

関連項目

- DisableKeepingForcedConversions

- ForcedConversionRules

DisableGzipCompression

HTMLページおよびログ・ファイルのgzip圧縮を無効にします。クライアント・ブラウザが圧縮されているHTMLをサポートする場合のみ、ページが圧縮されます。圧縮は、ページ・サイズを平均で80%削減し、任意のHTTP 1.1互換ブラウザでサポートされています。

- TRUEに設定されている場合、ページは、クライアントWebブラウザに送信される前に、圧縮されません。

- デフォルトはFALSEです。

使用方法

- 第2.15項「HTMLプレビュー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableGzipCompression=true

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「HTTP_ACCEPT_ENCODING」

DisableHttpUploadChunking

アップロードのチャンク化機能(アップロード・アプレットまたはHTTPプロバイダによって使用される)を無効にします。

- TRUEに設定されている場合、チャンク化機能は無効です。

- FALSEに設定されている場合、チャンク化機能は有効です。

- デフォルトはTRUEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

DisableHttpUploadChunking=false

関連項目

- AppletChunkSize

- AppletChunkThreshold

- ChunkedRequestTrace

DisableKeepingForcedConversions

Dynamic Converterが更新のために変換済ファイルを強制変換として処理するかどうかを定義します。

- TRUEに設定されている場合、強制変換または事前変換によって変換されたファイルは、Dynamic Converterによって、強制変換とはみなされません。これは、Dynamic Converterが通常はファイルの再変換ではなく既存の変換を使用する場合でも、既存の変換が強制変換とみなされないので、ファイルが再変換されることを意味します。

- デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableKeepingForcedConversions=true

関連項目

- DisableForcedConversions

DisableOptimizedLatestReleaseQuerying

Dynamic Converterが、再変換の必要なファイルを決定する際、キャッシュされているタイムスタンプまたはコンテンツ・サーバーのデータベース情報のどちらを使用するかを定義します。

- TRUEに設定されている場合、Dynamic Converterは、キャッシュされているタイムスタンプではなく、コンテンツ・サーバーのデータベースを問い合わせて、再変換が必要なファイルを決定します。

- この設定を有効にすると、6.2より前のDynamic Converterの動作に戻ります。関連のある問題をトラブルシューティングする必要がある場合に、この設定を使用できます。

- デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableOptimizedLatestReleaseQuerying=true

DisableSharedCacheChecking

ロードされるすべてのリソースのタイムスタンプ・チェックを無効にします。

- TRUEに設定されている場合、コンポーネントで定義されているリソース・ファイルは、コンテンツ・サーバー・インスタンスが再起動された場合のみリフレッシュされます。

- HCSTページおよびHCSPページのタイムスタンプ・チェックは、この設定では停止されません。

- 主にコンテンツ・サーバーのファイル・システムがネットワーク共有に存在する場合に、この設定を使用してファイル・システムのアクティビティを制限できます。この設定は、ファイル・チェックおよびタイムスタンプのオーバーヘッドによってパフォーマンスが著しく低下する可能性がある本番環境で、特に重要です。開発環境では、この設定は省略可能です。

- 詳細は、クラスタリングのドキュメントを参照してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DisableSharedCacheChecking=true

DistillerPath

PDF ConverterがファイルをPDFに変換する際に使用する実行可能ファイルへのパスを設定します。

- 文字列としてパスを返します。

- PDF Converterのインストール時にAdobe Acrobat Distillerが検出されない場合のデフォルトは、Jaws PDF Libraryへのパスです。

- PDF Converterのインストール時にAdobe Acrobat Distillerが検出された場合のデフォルトは、Distiller実行可能ファイルへのパスです。

使用方法

- 第2.8.2.1項「一般変数」

場所

- 「共有Inbound Refineryの構成」画面、「パス」タブ、Adobe Distiller実行可能ファイルのパス

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

DistillerPath=C:/Program Files/IdcRefinery/shared/jaws_ps/ps2pdf.exe

DoDocNameOrder

リポジトリ・マネージャ内のコンテンツ・アイテムをdDocNameでソートします。リポジトリ・マネージャが起動すると、データベースに対してデフォルトの問合せが実行されます。問合せ結果は、デフォルトでは、アイテムのdDocNameでソートされます。dDocNameでソートすると、予測可能な順序になりますが、問合せ結果が長くなる可能性があります。

- TRUEに設定されている場合、コンテンツ・アイテムはdDocNameでソートされます。

- FALSEに設定されている場合、コンテンツ・アイテムはソートされません。

- デフォルトはTRUEです。

JDBC Query Traceを有効にすると、情報をコンソール・ログに記録して、問合せでorder by句が使用されていないことを確認できます。JDBC Query Traceを有効にするには、「システム監査情報」ページの「アクティブなコンソール出力トレースの編集**」セクションでオプションとしてsystemdatabaseを選択します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DoDocNameOrder=false

dodSkipCatFolderRequirement

チェックインのカテゴリまたはコントリビューション・フォルダを指定せずにアイテムをチェックインできることを指定します。DoD構成を使用している場合、DoD規制への非準拠を引き起こします。

- TRUEに設定されている場合、カテゴリまたはコントリビューション・フォルダを指定してアイテムをチェックインする必要があります。

- FALSEに設定されている場合、カテゴリまたはコントリビューション・フォルダを指定せずにアイテムをチェックインできます。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

dodSkipCatFolderRequirement=false

DomainControllerName

NTLMコールに使用するドメイン・コントローラを定義します。

- 値が設定されていない場合、APIコールにより、通信先のドメイン・コントローラを検出します。

- デフォルトは空の文字列です。

使用方法

- 第2.24.2項「外部セキュリティ」

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DomainControllerName=PDC servername

DoMetaInternetSearch

メタデータ・フィールドをインターネットで検索する構文を有効にします。

- TRUEに設定されている場合、インターネットでのメタデータの検索は有効です。

- FALSEに設定されている場合、インターネットでのメタデータの検索は無効です。

デフォルトはFALSEです。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

DoMetaInternetSearch=true

DownloadApplet

複数ファイルのダウンロード・アプレットを有効にします。

- TRUEに設定されている場合、ダウンロード・アプレットは有効であり、検索結果ページから複数のファイルをダウンロードできます。

- FALSEに設定されている場合、ダウンロード・アプレットは無効です。

- デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.3項「クライアント」

場所

- 「システム・プロパティ」、「オプション」タブ、「ダウンロード・アプレットを有効にする」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「ダウンロード・アプレットを有効にする」

- IntradocDir/config/config.cfg

例

構成設定として、ダウンロード・アプレットを有効化します。

DownloadApplet=true

スクリプトとして、ダウンロード・アプレットの条件を評価します。

<$DownloadApplet$>

関連項目

- MultiUpload

- UploadApplet

DtmPort

DtmServer (HTMLプレビューに必要)がコンテンツ・パブリッシャのクライアントからの接続をリスニングするポート番号を定義します。

デフォルトは4441です。

使用方法

- 第2.15項「HTMLプレビュー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DtmPort=4442

DynamicConverterHtmlFlavor

Dynamic Converterで使用されるHTMLフレーバを定義します。

- 設定可能な値は次のとおりです。

- Internet Explorer 4.0

- Netscape 4.0

- HTML 3.0

- HTML 4.0

- デフォルトはnullです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

DynamicConverterHtmlFlavor=HTML 4.0

EmailNotificationType

ワークフローとサブスクリプションが異なるコンテンツ・サーバー・ユーザー・インタフェースに含まれる場合に、通知電子メール内のリンクがポイントする先を指定します。

設定可能な値は次のとおりです。

- NativeWebUI (ネイティブ11gユーザー・インタフェース)

- ContentUI (ネイティブ11gインタフェースより新しい、ADFベースのユーザー・インタフェース)

- ContentUI、NativeWebUI (ネイティブ11gユーザー・インタフェースとADFベースのインタフェース)

この変数は自動的に設定されません。設定時に値を指定しないと、デフォルトでNativeWebUIが設定されます。

使用方法

- 第2.5項「コンテンツ・アイテム」

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

EmailNotificationType=ContentUI,NativeWebUI

EnableDocumentHighlight

PDF、テキスト、HTMLの各ファイルでのフルテキスト検索条件の強調表示を有効化します。

- TRUEに設定されている場合、検索条件の強調表示が有効化されます。

- FALSEに設定されている場合、検索条件の強調表示は無効になります。

- コンテンツ・サーバーのインストール後のデフォルトはFALSEです。

- PDF Converterのインストール後のデフォルトはTRUEです。

使用方法

- 第2.23項「検索」

場所

- 「システム・プロパティ」、「オプション」タブ、「検索キーワードの強調表示を有効にする」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「検索キーワードの強調表示を有効にする」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

EnableDocumentHighlight=false

スクリプトとして、構成設定の値を返します。

<$EnableDocumentHighlight$>

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「UseHtmlOrTextHighlightInfo」

EnableEnvironmentPackager

環境パッケージャ・デバッグ機能を有効にします。

- この機能により、管理者は、admin、configおよびbinの各ディレクトリのすべてのファイルを、environment.txtという名前のテキスト・ファイルとともにZIPアーカイブにパッケージ化できます。このテキスト・ファイルには、Java仮想マシンおよびサーバーのオペレーティング・システムに関する追加の情報が含まれます。ZIPファイルserver_environment.zipは、コンテンツ・サーバー・インスタンスのルート・ディレクトリに置かれます。

- TRUEに設定されている場合、環境パッケージャ機能は有効です。

- FALSEに設定されている場合、環境パッケージャ機能は有効です。

- デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

EnableEnvironmentPackager=true

EnableErrorFile

バッチ・ローダー・エラー・ファイルを生成します。

- バッチ・ロード中にエラーが発生した場合、エラー・ファイルが生成され、問題のあるレコードが追加されます。

- TRUEに設定されている場合、エラー・ファイルが生成されます。

- デフォルト値はありません。

使用方法

- 第2.2項「バッチ・ローダー」

- 第2.11項「デバッグ」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

EnableErrorFile=true

EnableExpirationNotifier

コンテンツ・アイテムの期限切れの通知(NOE)を有効にします。これにより、近いうちに期限切れになるドキュメントの作成者および管理者に、電子メールによる通知が送信されます。

- NOEを有効にして再起動すると、ScheduledEventsのDomainHome/ucm/cs/config/activestate.hdaファイルにエントリが追加されます。

- NOEの実行タイミングを制御するインクルードは、set_doevent_for_notification_of_expirationです。このインクルードでは、後述するNotifyTimeパラメータが使用されます。

- 次に示すパラメータのうち、NotificationQueryを30 (デフォルトの7ではなく)、NotificationIntervalInDaysを7に設定することで、1か月以内に期限切れになる対象に関する電子メールを週に1回送信できます。

- 予定イベントを定義する表は、IdcHomeDir/resources/core/tables/std_resources.htmファイルに存在します。表の名前はIdcScheduledSystemEventsで、行の名前はNotificationOfExpirationです。

- NOEのデバッグ情報を取得するには、config.cfgファイルに次の変数を設定してコンテンツ・サーバー・インスタンスを再起動します。ロギング先はサーバー出力です。

TraceSectionsList=system,scheduledevents
TraceIsVerbose=true

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

パラメータ

次のパラメータを取ります。

パラメータ

説明

NotificationQuery

通知の対象となる期限切れドキュメントを見つけるために実行する問合せを指定します。デフォルトは次のとおりです。

dOutDate > <$dateCurrent()$> <AND> dOutDate < <$dateCurrent(7)$>

NotificationMaximum

問合せから返されるドキュメントの最大数を指定します。デフォルトは1000です。

NotifyExtras

通知電子メールを受信する管理ユーザーを指定します。空白が設定されている場合、他のユーザーには通知は送信されません。

NotifyTime

通知を送信する時刻。デフォルトは00:01です。24時間表記で指定します。

NotificationFieldNames

通知に含めるフィールド名を指定します。デフォルトは、dDocAuthor, dOutDate, dDocTitle, dDocName, dDocType, dID, dInDate, dRevLabel, dSecurityGroupです。

NOEUsePlainTextEmail

プレーン・テキストの電子メールを使用して通知できます。デフォルトはfalseです。電子メール・テンプレートの名前は、QUERY_NOTIFICATIONです。NOEUsePlainTextEmail=trueの場合、emailFormat=textです。

NotificationIntervalInDays

間隔日数を指定します。デフォルトは1です。

例

構成エントリとしての使用例:

EnableExpirationNotifier=true

EnableRebuildForcesReconversion

検索索引を再構築する際、Dynamic Converterの事前変換および強制変換を再評価するかどうかを定義します。

- TRUEに設定されている場合、索引の再構築の際に索引が作成されたコンテンツ・アイテムは、Dynamic Converterによる変換で、強制変換および事前変換の変換ルールに基づいて再評価されます。

- この設定を使用すると、新しい変換ルールを作成した後で索引を再構築する際に、ファイルを動的に変換できます。

- デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

EnableRebuildForcesReconversion=true

関連項目

- ForcedConversionRules

EnableSchemaPublish

スキーマ・パブリッシャを有効または無効にします。

- TRUEに設定されている場合、パブリッシュは有効です。

- FALSEに設定されている場合、パブリッシュは無効です。

- デフォルトはTRUEです。

注意:
FALSEに設定されている場合、構成マネージャの管理アプレットでスキームの再パブリッシュ・オプションが使用されていても、パブリッシュは無効です。この値をFALSEに設定することは、通常は選択したノードでのみスキーマ・パブリッシャを有効にする必要があるクラスタで使用されます。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

EnableSchemaPublish=false

ExclusiveCheckout

別のユーザーにより作成されたコンテンツを、ユーザーがチェックアウトできるかどうかを判別します。

- TRUEに設定した場合、作成者、またはセキュリティ・グループの管理者権限を持つユーザーのみがコンテンツ・アイテムをチェックアウトできます。

- FALSEに設定した場合、セキュリティ・グループの書込み権限を持つユーザーが、別のユーザーにより作成されたコンテンツをチェックアウトできます。

- デフォルトはFALSEです。

使用方法

- 第2.24.1項「内部セキュリティ」

- 第2.26項「ユーザー」

場所

- 「システム・プロパティ」、「コンテンツ・セキュリティ」タブ、「元のコントリビュータにのみチェックアウトを許可する」

- 「管理」、「管理サーバー」、「コンテンツ・セキュリティ」メニュー・オプション、「元のコントリビュータにのみチェックアウトを許可する」

- IntradocDir/config/config.cfg

例

構成設定として、元のコントリビュータのみがコンテンツ・アイテムをチェックアウトできます。

ExclusiveCheckout=true

Idoc Scriptとして、構成設定の値を返します。

<$ExclusiveCheckout$>

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「isUserOverrideSet」

ExpireRevisionOnly

指定された有効期限に期限切れになるのが、コンテンツ・アイテムのすべてのリビジョンなのか、特定のリビジョンのみなのかを決定します。

注意:
この変数は、Content Serverバージョン6.2以降に適用されます。バージョン6.2より古いバージョンでは、指定された有効期限に期限切れになるのは、特定のリビジョンのみでした。バージョン6.2以降のデフォルト動作では、現在のリビジョンが期限切れになった場合、そのコンテンツ・アイテムのすべてのリビジョンが期限切れになります。この変数がTRUEに設定されている場合、システムは6.2以前の動作に戻ります。

- TRUEに設定されている場合、現在のリビジョンのみが期限切れになり、期限切れになっていない最新のリビジョンが現在のリビジョンになります。

- FALSEに設定されている場合、現在のリビジョンが期限切れになると、すべてのリビジョンが期限切れになります。

- デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ExpireRevisionOnly=true

FileEncoding

使用するファイル・エンコーディングを指定します。

コンテンツ・サーバーが、オペレーティング・システムのネイティブ言語以外の言語を使用するように構成されている場合(たとえば、英語のシステムで、英語と日本語のロケールを使用する場合)、コンテンツ・サーバーおよびInbound Refineryの両方でこの変数をUTF8に設定する必要があります。

使用方法

- 第2.18項「ローカライズ」

- 第2.7項「コンテンツ・サーバー」

- 第2.8.1項「Inbound Refinery」

場所

- コンテンツ・サーバー: DomainHome/ucm/cs/bin/intradoc.cfg

- Inbound Refinery: IntradocDir/data/configuration/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

FileEncoding=UTF8

FldEnforceCaseInsensitiveNameUniqueness

フォルダ名とファイル名の一意性チェックでの大/小文字の区別を解除し、パス解決での大/小文字の区別を解除します。

- この変数は、変数FldEnforceFolderFileNameUniquenessとともに使用されます。

- デフォルト設定は、TRUEです。

- Oracle WebCenter Contentがアップグレードされ、既存のフォルダ構造がこの変数および変数FldEnforceFolderFileNameUniquenessによって適用される一意性制約を満たさない場合、これら2つの変数をFALSEに設定する必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

FldEnforceCaseInsensitiveNameUniqueness=true

FldEnforceFolderFileNameUniqueness

フォルダに子ドキュメントと同じ名前の子フォルダを作成できないようにします。同じ名前かどうかを判断する際、大/小文字は区別しません。子フォルダと子ドキュメントは、所有者リンクとソフト・リンクの両方を参照します。

- この変数は、変数FldEnforceCaseInsensitiveNameUniquenessとともに使用されます。

- デフォルト設定は、TRUEです。

- Oracle WebCenter Contentがアップグレードされ、既存のフォルダ構造がこの変数および変数FldEnforceCaseInsensitiveNameUniquenessによって適用される一意性制約を満たさない場合、これら2つの変数をFALSEに設定する必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

FldEnforceFolderFileNameUniqueness=true

ForcedConversionRules

ファイルのチェックインに対して強制変換を適用するDynamic Converterルールを定義します。

- これはカンマ区切りリストです。

- コンテンツ・アイテムがチェックイン時に指定された変換ルールのいずれかと一致する場合、ファイルはそのルールに従って変換されます。各ファイルは、複数のレンディションに変換できます。

- デフォルトはありません。

注意:
強制変換プロセスでは、同じDynamic Converterテンプレートを2回適用することはありません。たとえば、ForcedConversionRules=RuleA,RuleBを設定していて、RuleAとRuleBが異なるレイアウトで同じテンプレートを指定した場合、RuleBに準じた変換は行われません。(この場合のベスト・プラクティスは、レイアウトをマージし、Idoc Scriptを使用して適切なレイアウト要素を動的に選択することです。)

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForcedConversionRules=Rule1,Rule2,Rule3

関連項目

- DisableForcedConversions

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「incDynamicConversionByRule」

- rule:IsFragmentOnly

ForceDistinctRevLabels

同一コンテンツ・アイテムにリビジョンを追加する場合に同じリビジョン・ラベルを使用できるかどうかを定義します。

- この設定を変更した場合、新しいコンテンツにのみ適用されます。

- TRUEに設定されている場合、同一コンテンツの2つのリビジョンに同じリビジョン・ラベルは使用できません。

- デフォルト設定は、FALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForceDistinctRevLabels=true

ForceDocTypeChoice

チェックイン・ページの「タイプ」オプション・リストのデフォルトとして、空白のオプションを追加します。これにより、ユーザーは、いずれかのタイプを選択する必要があります。

- ページで表示オプションとして使用されます。

- TRUEに設定されている場合、チェックイン・ページの「タイプ」オプション・リストに空白のオプションが表示されます。

- デフォルト設定は、FALSEです。

使用方法

- 第2.13項「フィールド表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForceDocTypeChoice=true

ForceJdbcSync

同時にデータベースにアクセスする問合せを1つに制限します。

この設定は、通常、デバッグ目的で、または問題のあるJDBCドライバで、使用されます。

システムを使用しているアクティビティのほとんどが読取り専用タイプである場合、これをFALSEに設定することで、データベースへのスループットが向上します。

TRUEに設定されている場合、同時に1つの問合せがデータベースにアクセスできます。

FALSEに設定されている場合、同時に複数の問合せがデータベースにアクセスできます。

デフォルト設定は、FALSEです。(バージョン4.5以前のデフォルトはTRUEでした。)

使用方法

- 第2.9項「データベース」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForceJdbcSync=true

ForcePermissionCheckforAllowedUploadServices

ファイルのアップロード・サービス時にユーザー権限の検証を実施します。

TRUEに設定されている場合、ユーザー権限はファイルのアップロード時に必ず検証されます。

FALSEに設定されている場合、ユーザー権限はファイルのアップロード時に検証されません。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.3項「クライアント」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForcePermissionCheckforAllowedUploadServices=true

関連項目

AppendToAllowedUploadServices

ForceSecurityGroupChoice

チェックイン・ページの「セキュリティ・グループ」オプション・リストのデフォルトとして、空白のオプションを追加します。これにより、ユーザーは、いずれかのセキュリティ・グループを選択する必要があります。

ページで表示オプションとして使用されます。

TRUEに設定されている場合、チェックイン・ページの「セキュリティ・グループ」オプション・リストに空白のオプションが表示されます。

デフォルト設定は、FALSEです。

使用方法

- 第2.13項「フィールド表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ForceSecurityGroupChoice=true

FormInheritMetaDataFieldList

PDFフォームから後続のリビジョンに継承されるカスタム・メタデータ・フィールドを定義します。

これはカンマ区切りリストです。

標準メタデータ・フィールド(「タイプ」、「セキュリティ・グループ」、「アカウント」など)は、デフォルトで継承されます。

カスタム・メタデータ・フィールドは、小文字のxで始まります(例: xComments)。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

FormInheritMetaDataFieldList=xDepartment,xRegion

FrameMakerCyclesAllowed

Inbound Refineryが、FrameMakerは無応答であると判断するまでに許容する最大サイクル数(1サイクルは30秒)。

Inbound Refineryは、consfile.txtファイルでFrameMakerのアクティビティを監視します。

デフォルトは1です。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

FrameMakerCyclesAllowed=1

FrameMakerTimeout

FrameMaker変換のタイムアウトを定義します。

FrameMakerのタイムアウト値を返します。

この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、FrameMaker変換の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は1です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound RefineryがFrameMaker変換プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は10秒です。

#min

Inbound RefineryがFrameMaker変換プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は1秒です。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

- 「共有Inbound Refineryの構成」画面、「タイムアウト値」タブ、FrameMakerからPostScriptへの変換のデフォルト・タイムアウト

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

FrameMakerTimeout#factor=2

GetCopyAccess

コンテンツ・アイテムのコピーの取得に必要なユーザーの権限を決定します。

TRUEに設定した場合、ユーザーは読取り権限のみを持っているコンテンツ・アイテムのコピーを取得できます。

FALSEに設定した場合、ユーザーは、コピーを取得できるようにするために、コンテンツ・アイテムの書込み権限を持っている必要があります。

デフォルトはFALSEです。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

- 「システム・プロパティ」、「コンテンツ・セキュリティ」タブ、「読取り権限を持つユーザーである場合にコピーを許可する」

- 「管理」、「管理サーバー」、「コンテンツ・セキュリティ」メニュー・オプション、「読取り権限を持つユーザーである場合にコピーを許可する」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

GetCopyAccess=true

Idoc Scriptとして、構成設定の値を返します。

<$GetCopyAccess$>

HasExternalUsers

外部ユーザー・データベースが存在することをコンテンツ・サーバーに指示します。

TRUEに設定されている場合、システムは外部ユーザーを認識します。カスタム・コンポーネントが外部ユーザー統合(LDAPなど)をサポートするように作成されている場合は、これをTRUEに設定する必要があります。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

HasExternalUsers=true

Idoc Scriptとして、構成設定の値を返します。

<$HasExternalUsers$>

関連項目

- NtlmSecurityEnabled

HasSiteStudio

リンク・マネージャ機能とともに使用されます。

Site Studioがインストールされている場合、この変数を使用して、パターン・エンジン用のフレンドリURLを解析するためのSite Studio固有のリンク・パターンを有効にできます。TRUEに設定されている場合、Site Studio固有のリンク・パターンは有効です。

デフォルト値はFALSEであり、この場合、Site Studio固有のリンク・パターンは無効です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

HasSiteStudio=TRUE

関連項目

- リンク・マネージャの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

HideVitalReview

この変数により、Oracle WebCenter Content: Recordsの「検索」ページおよび「チェックイン」ページの「レビュー対象」の関連フィールドが非表示になります。

- TRUEに設定されている場合、「レビュー対象」のフィールドは非表示になります。

- FALSEに設定されている場合、「レビュー対象」のフィールドは表示されます。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

HideVitalReview=false

HighlightBegin

Dynamic Converterによって変換されるファイルのテキスト強調表示スタイルの開始HTMLタグを設定します。

デフォルトは<strong>です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

HighlightBegin=<b><font color=blue>

関連項目

- HighlightEnd

HighlightEnd

Dynamic Converterによって変換されるファイルのテキスト強調表示スタイルの終了HTMLタグを設定します。

デフォルトは</strong>です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

HighlightEnd=</font></b>

関連項目

- HighlightBegin

HtmlDataInputFilterLevel

encodeHtml機能とともに使用される構成エントリです。このエントリは、特定レベルのエンコーディングを適用して、システムへのすべての入力で不正なHTML構成をフィルタ処理します。

encodeHtml ruleパラメータで値unsafeを使用している場合にシステムが受信するすべての入力データは、既知の安全ではないスクリプト・タグにのみ適用されます。この機能を変更するには、HtmlDataInputFilterLevel構成変数を使用して、実行されたフィルタリングを変更します。

使用方法

- 第2.24項「セキュリティ」

パラメータ

このエントリは、フィルタ・レベルをパラメータとして取ります。設定できる値は次のとおりです。

- none: フィルタリングは実行されません。

- unsafe: 不正なHTML構成から保護します。

- exceptsafe: 既知の安全な構成のみフィルタを通過できます。

場所

IntradocDir/config/config.cfg

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「encodeHtml」

- Oracle Fusion Middleware Oracle WebCenter Contentの管理

HTMLEditorPath

コンポーネント・ウィザードからコンポーネント・ファイルを編集するために使用する実行可能ファイルへのパスを定義します。

このパスは、コンポーネント・ウィザードで定義されます。

FrontPageなどのグラフィカルなHTMLエディタではなく、ワードパッドなどのテキスト・エディタを指定する必要があります。グラフィカル・エディタではHTMLタグの挿入または変更が可能であり、Idocスクリプト・タグがコンテンツ・サーバーによって認識されない文字列に変換される可能性があります。

デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

場所

- IntradocDir/config/config.cfg

- DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

HTMLEditorPath=C:/Program Files/Windows NT/Accessories/wordpad.exe

HttpAbsoluteCgiRoot

コンテンツ・サーバーのCGIパスを完全なURLとして定義します。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

コンテンツ・サーバー・インスタンスの場合の例を次に示します。

HttpAbsoluteCgiRoot=http://my_computer/idcplg/idc_cgi_isapi-instance.dll

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「HttpAbsoluteCgiPath」

HttpAbsoluteWebRoot

Webサーバー・ルート・ディレクトリを完全なURLとして定義します。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

コンテンツ・サーバーの場合の例を次に示します。

HttpAbsoluteWebRoot=http://my_computer/domain/

関連項目

- HttpRelativeWebRoot

HttpBrowserHttpHostDoesNotHavePort

TRUEに設定されている場合、コンテンツ・サーバーの管理サーバーとアプレットのために計算されたHTTPアドレスにポート番号がないため、ポート番号を探す必要があることが、コンテンツ・サーバーに通知されます。デフォルト動作を変更する必要がある場合のみ、この設定が必要になります。

HttpIgnoreWebServerInternalPortNumberもTRUEに設定されている場合、コンテンツ・サーバーはHttpServerAddress設定を参照して、ポート番号を決定します。それ以外の場合、コンテンツ・サーバーはWebサーバーから提供されるサーバー・ポート番号を使用します。

使用方法

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

HttpBrowserHttpHostDoesNotHavePort=true

関連項目

- HttpIgnoreWebServerInternalPortNumber

HttpIgnoreWebServerInternalPortNumber

TRUEに設定されている場合、コンテンツ・サーバーの管理サーバーとアプレットのために計算されたHTTPアドレスに、Webサーバーから提供されたサーバー・ポート値を使用しません。

これにより、ロード・バランシング・サーバーで、内部Webサーバーが実際にリクエストへの応答の送信に使用しているのとは異なるポート番号が使用されるというロード・バランシング構成の問題を防ぐことができます。

使用方法

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

HttpIgnoreWebServerInternalPortNumber=true

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「HttpBrowserFullCgiPath」

HttpRelativeCgiRoot

コンテンツ・サーバーのCGIパスを相対URLとして定義します。

使用方法

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

コンテンツ・サーバーの場合の例を次に示します。

HttpRelativeCgiRoot=/idcplg/idc_cgi_isapi-instance.dll

関連項目

- HttpAbsoluteCgiRoot

HttpRelativeWebRoot

Webサーバー・ルート・ディレクトリを相対URLとして定義します。

- http://www.example.com/domain/のような完全なルートではなく、/domain/のような相対ルートを使用します。

- 文字列として相対Webルート・ディレクトリを返します。

- デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.27項「Webサーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「HTTP相対Webルート」

- コンテンツ・サーバー: IntradocDir/config/config.cfg

例

構成設定として、相対Webルートを定義します。

HttpRelativeWebRoot=/domain/

Idoc Scriptとして、文字列として相対Webルートを返します。

<$HttpRelativeWebRoot$>

関連項目

- HttpAbsoluteWebRoot

HttpServerAddress

Webサーバー・アドレスを部分URLとして定義します。

http://www.example.com/のような完全なアドレスではなく、exampleのような部分URLを使用します。

文字列としてWebサーバー・アドレスを返します。

デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.27項「Webサーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「HTTPサーバー・アドレス」

- コンテンツ・サーバー: IntradocDir/config/config.cfg

例

構成設定として、Webサーバー・アドレスを定義します。

HttpServerAddress=example

Idoc Scriptとして、文字列としてWebサーバー・アドレスを返します。

<$HttpServerAddress$>

関連項目

- IdcCommandServerHost

- IntradocServerHostName

IDC_Name

コンテンツ・サーバー・インスタンスの一意の名前を定義します。

注意:
重複するIDC_Name設定を使用することは、データ破損の原因になります。同じIDC_Name設定を共有する2つのインスタンス間では、アーカイバ・ユーティリティによるデータの移動またはコピーは実行できません。これを行うと、ターゲット・システムのデータが破損します。各インスタンスに一意のIDC_Name設定を使用します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IDC_Name=OracleMSP

関連項目

- InstanceDescription

- InstanceMenuLabel

IdcAnalyzeLogDir

Content Serverアナライザ・ユーティリティが、出力ファイルを書込み、ファイル・システム分析プロセスの実行中に検出した追加ファイルを転送する場所を指定します。

部分ディレクトリ・パスまたは完全ディレクトリ・パスを指定できます。

- 部分ディレクトリ・パス(analyzer_logs/など)が指定されている場合、このサブディレクトリはDomainHome/ucm/cs/bin/ディレクトリに作成されます。

- 完全ディレクトリ・パス(c:/analyzer_logs/など)が指定されている場合、これがログ・ディレクトリになります。

ログ・ファイル名は、LogName設定で指定されます。

デフォルトはDomainHome/ucm/cs/bin/logs/です。

使用方法

- 第2.11項「デバッグ」

- 第2.12項「ディレクトリとパス」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成設定の使用例:

IdcAnalyzeLogDir=f:/domain/analyzer_logs/

関連項目

- LogName

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「SafeDir」

- TempDir

IdcAuthExtraRequestParams

Webサーバーのプラグインの値をローカル・データから取得し、リクエストのヘッダーに入れて送信するように指定します。

たとえば、Webサーバー・フィルタのプラグインを使用してユーザーの属性を取得し、それをローカル値に入れる場合、IdcAuthExtraRequestParamsの中に属性名を指定すると、データをコンテンツ・サーバー・インスタンスに渡すこともできます。

この設定は、Idoc Scriptを使用して余分なHTTPヘッダー値にアクセスする場合にも使用できます。これらの変数は、データ・バインダ環境変数セットに組み込まれます。

- IdcAuthExtraRequestParamsリスト内の名前は、大/小文字に関係なくヘッダー名と一致している必要があります(大/小文字を区別しない一致)。

- Idoc Script変数として使用している場合、IdcAuthExtraRequestParams内の名前は正確に一致している必要があります(大/小文字を区別する一致)。

デフォルト値はありません。

IdcCommandの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

使用方法

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

次の設定では、ヘッダーにあるHTTP_REFERERのローカル値を送信するようにIIS Webサーバーのプラグインに指示します(IISが自動的にHTTP_接頭辞を追加します)。

IdcAuthExtraRequestParams=referer

IdcCommandFile

IdcCommandを使用して実行するコマンドが含まれるファイルを指定します。

デフォルトの設定はありません。

IdcCommandの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

IdcCommandFile=c:/ucm/idc/add_user.txt

IdcCommandLog

IdcCommand実行のログ・ファイルへのパスを指定します。

ログ・ファイルには、コマンドの実行時刻およびコマンドの成功または失敗のステータスが含まれます。

デフォルトの設定はありません。

IdcCommandの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

IdcCommandLog=c:/idc/idccommand.log

IdcCommandServerHost

IdcCommandの接続先のコンテンツ・サーバー・インスタンスのWebサーバー・アドレスを指定します。

デフォルトは、IdcCommandの接続先のコンテンツ・サーバー・インスタンスのHttpServerAddressです。

IdcCommandの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IdcCommandServerHost=instance_name.example.com

関連項目

- HttpServerAddress

IdcCommandUser

IdcCommandを使用したコマンドの実行を許可されるユーザーを指定します。

デフォルトの設定はありません。

IdcCommandの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

IdcCommandUser=sysadmin

IdcHttpHeaderVariables

HTTPヘッダー・レスポンスに含めるデータ・パラメータを定義します。

これはカンマ区切りリストです。

名前と値のペアのエンコーディング・フォーマットは、コンテンツ・サーバーHTTPヘッダー・エンコーディングを適用した後の一般的なhda形式です。

値はUTF-8でエンコードされ、特殊文字は%xxでエンコードされます。

この設定は、クライアントからのリクエストを監査する必要があるWebサーバー・プラグイン用に特別に設計されています。プラグインは、レスポンスのHTTPヘッダーは確認できますが、コンテンツの本文は確認できません。リクエストのパラメータの一部をHTTPヘッダー・レスポンス内にプッシュすることにより、プラグインは、アクセスされたドキュメントおよびそれに対して実行されたアクションを監査できます。

コンテンツ・サーバー・インスタンスがHTTPベースのクライアントにレスポンスを送信する際に生成するHTTPヘッダーの名前は、IdcVariablesです。

使用方法

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

IdcHttpHeaderVariables=IdcService,dDocNameである場合、UTF-8エンコーディングを適用する前のヘッダー値は、次のようになります。

@Properties LocalData
IdcService=GET_DOC_PAGE
dDocName=TestDoc
blDateFormat=M/d{/yy}{ h:mm[:ss]{ a}}!mAM,PM!tAmerica/New_York
blFieldTypes=
@end

UTF-8エンコーディングでは、改行文字が%0A文字に変更されることを除いて、前述の文字はすべてそのまま残ります。blDateFormatは、コンテンツ・サーバー・インスタンスのシステム日付フォーマットです。

IdcHomeDir

Oracle WebCenter Contentサーバー・メディアの場所を定義します。このサーバー・メディアは、コンテンツ・サーバー、Inbound RefineryおよびRecordsのどのメディアも実行できます。

Oracle WebCenter Contentがデプロイされた後は、管理者はこの場所を変更できません。これは、メディアの現在の場所に基づいて固定される場所です。

使用方法

- 第2.12項「ディレクトリとパス」

場所

DomainHome/ucm/idc

例

構成設定としての使用例:

IdcHomeDir=MW_HOME/user_projects/domains/base_domain/ucm/idc

IdcLocale

現在のユーザーのロケールを追跡するためにクライアントのHTTP Cookie内に格納される値を設定します。

使用方法

- 第2.18項「ローカライズ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IdcLocale=Deutsch

IdcNativeDir

Oracle WebCenter Contentのランタイム・メディア・ホームのリソース・データ・サブディレクトリへのパスを定義します。

ローカル・コピーおよびロード・バランシングの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentエンタープライズ・デプロイメント・ガイド』を参照してください。

使用方法

- 第2.12項「ディレクトリとパス」

場所

- IdcNativeDir/resources/

例

構成エントリとしての使用例:

$IdcNativeDir=/ucm/cs/resources/

IdcResourcesDir

Oracle WebCenter Contentのランタイム・メディア・ホームのリソース・データ・サブディレクトリへのパスを定義します。

ローカル・コピーおよびロード・バランシングの詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentエンタープライズ・デプロイメント・ガイド』を参照してください。

使用方法

- 第2.12項「ディレクトリとパス」

場所

- IdcHomeDir/resources/

例

構成エントリとしての使用例:

$IdcHomeDir=/ucm/resources/

IdcServerBindAddress

クラスタ環境で、コンテンツ・サーバー・インスタンスを特定のIPアドレスにバインドするために使用します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

リクエストをリスニングするコンテンツ・サーバーのconfig.cfgファイルに設定します。

IntradocDir/config/config.cfg

例

構成変数としての使用例:

IdcServerBindAddress=IPaddress

IdcServerSocketQueueDepth

TCP/IPソケット・キューの深さを指定します。

この設定を使用して、特にクラスタ環境で、コンテンツ・サーバーのパフォーマンスを調整できます。この値を減らすと、コンテンツ・サーバーのスループットが制限される可能性があります。

デフォルトは200です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IdcServerSocketQueueDepth=256

IdcServerThreadQueryTimeout

チェックアウト時間を指定します。この構成は、すべてのユーザー・スレッド向けに定義され、すべてのユーザー・サービスに適用できます。

多くの場合、大きいファイルをチェックインする際、発生するI/Oの量が原因でタイムアウトが発生します。大きいファイルの書込み中にデータベース・ロックが保持されることにより、後続のチェックインがブロックされます。この構成設定を使用すると、チェックアウト時間を延ばすことができます。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

設定を表す単位は秒です。タイムアウトを5分に設定するには、次のように設定します。

IdcServerThreadQueryTimeout=300

IndexableRenditions

プライマリ、代替またはWeb表示可能なレンディションを除く、索引を作成するレンディションの単一文字コードのカンマ区切りリストです。索引を作成できるレンディションは1つのみ(XMLレンディションなど)なので、通常は1つの文字のみが使用されます。

これは、IsAllowIndexRenditionsとともに使用されます。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

関連項目

- IsAllowIndexRenditions

IndexerAutoWorkInterval

インデクサの自動更新サイクルが変更をチェックする間隔を秒単位で定義します。

デフォルトは300 (5分)です。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerAutoWorkInterval=600

IndexerLargeFileSize

インデクサがそのバルクロード(バッチ)・ファイルに格納するファイルのサイズ(MB)を決定します。

この設定より大きいファイルは、別のバルクロードで索引が作成されます。この設定より小さいファイルは、1つのバッチ内で他のファイルと一緒に索引が作成されます。

デフォルトは1MBです。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerLargeFileSize=2

IndexerRebuildStagingManualCopy

索引の再構築で、別の場所にコレクションを作成できるようにします。

この変数は、通常、非常に大量のコレクションを再構築する場合に使用します。再構築が終了したら、結果を手動で元のコレクションにマージできます。

TRUEに設定されている場合、再構築される索引は、IndexerRebuildStagingPath値で設定される場所に作成されます。

FALSEに設定されている場合、再構築される索引は、次のアクティブな索引ディレクトリに作成されます。

デフォルトはFALSEです。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerRebuildStagingManualCopy=true

関連項目

- IndexerRebuildStagingPath

IndexerRebuildStagingPath

再構築されたインデクサが作成されるパスを定義します。

この変数は、通常、非常に大量のコレクションを再構築する場合に使用します。再構築が終了したら、結果を手動で元のコレクションにマージできます。

デフォルト値はありません。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerRebuildStagingPath=c:/buildX/

関連項目

- IndexerRebuildStagingManualCopy

IndexerTouchMonitorInterval

コンテンツ・サーバーが、タイムスタンプが変化しないインデクサ・ロック・ファイルを期限切れとして処理するまでの待機時間を定義します。また、システムは、この期間中に、維持しているロックに対してtouchを2回実行します。

インデクサ・ロックは、適切なディレクトリにロック・ファイルを配置すると作成されます。ロックが持続するには、ファイルのタイムスタンプが定期的に変化する必要があります。変化しない場合、コンテンツ・サーバーがそのロックを期限切れのロックとして処理します。

この設定の値が小さいほど、ロックが索引作成サイクル間で移動する頻度が増えます。値が大きいほど、アクティビティが増えることによって(touchリクエストが数秒間遅延する可能性がある)、コンテンツ・サーバーがロックは期限が切れたと誤って報告する可能性が高くなります。ロックの期限切れが誤りである場合、処理の重複を生じる可能性があります(ただし、コンテンツ・サーバーの状態への長期的な影響はありません)。

デフォルトは12000ミリ秒(12秒)です。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

IndexerTouchMonitorInterval=15000

関連項目

- IndexerTraceCycleListChanges

- IndexerTraceLockFileChanges

IndexerTraceCycleListChanges

コンテンツ・サーバーによって維持されるアクティブな索引作成サイクルのリストへの変更について、コンソールにトレース情報をダンプします。

索引作成サイクルの特定の時点で排他的ロックが必要になるので、索引作成サイクルは、他のサイクルが非アクティブになるのを待機する必要がある場合があります。この設定を有効にすると、インデクサのパフォーマンスの監査に役立ちます。

TRUEに設定されている場合、索引作成サイクル・リストへの変更は、コンソールに出力されます。

FALSEに設定されている場合、索引作成サイクル・リストへの変更は出力されません。

デフォルトはFALSEです。

注意:
この変数は、Content Serverバージョン7.0の時点で廃止されています。現在この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.11項「デバッグ」

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerTraceCycleListChanges=true

関連項目

- IndexerTouchMonitorInterval

- IndexerTraceLockFileChanges

IndexerTraceLockFileChanges

コンテンツ・サーバーによるインデクサ・ロックおよび中断ファイルへの変更について、コンソールにトレース情報をダンプします。

TRUEに設定されている場合、ファイルへの変更は、コンテンツ・サーバーのコンソールに出力されます。

FALSEに設定されている場合、ファイルへの変更は出力されません。

デフォルトはFALSEです。

注意:
この変数は、Content Serverバージョン7.0の時点で廃止されています。現在この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.11項「デバッグ」

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerTraceLockFileChanges=true

関連項目

- IndexerTouchMonitorInterval

- IndexerTraceCycleListChanges

IndexerTraceStartStop

TRUEに設定されている場合、索引サイクルの開始と停止をトレースします。

デフォルトはFALSEです。

注意:
この変数は、Content Serverバージョン7.0の時点で廃止されています。現在この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.11項「デバッグ」

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IndexerTraceStartStop=true

関連項目

- IndexerTouchMonitorInterval

- IndexerTraceCycleListChanges

InitialColID

最初のコレクションIDを初期化するカウンタを定義します。

これにより、サーバーのコントリビューション・フォルダ識別子の初期値が定義されます(100万単位)。

この変数は、インストール時にWebDAV機能が有効化されている場合に、フォルダ・インストール・プログラムによって自動的に設定されます。

デフォルトは0です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

InitialColID=0

InstanceDescription

インスタンスの説明を定義します。

インスタンスの説明はコンテンツ・サーバー・インスタンスで使用されます。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- 「システム・プロパティ」、「サーバー」タブ、「インスタンスの説明」

- IntradocDir/config/config.cfg

例

構成エントリとして:

InstanceDescription=Master_on_Server1

Idoc Scriptとして、文字列としてサーバー・インスタンスの説明を返します。

<$InstanceDescription$>

関連項目

- IDC_Name

- InstanceMenuLabel

InstanceMenuLabel

Windowsの「スタート」メニューで使用される、インスタンスのラベルを定義します。

デフォルト値はありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

「システム・プロパティ」、「サーバー」タブ、「インスタンス・メニュー・ラベル」

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

InstanceMenuLabel=Master_on_Server1

関連項目

- IDC_Name

- InstanceDescription

IntradocDir

コンテンツ・サーバー・インスタンスに固有の構成およびデータが存在するディレクトリ。

デフォルト値はありません。値は、指定される構成(cs (コンテンツ・サーバーの場合)、ibr (Inbound Refineryの場合)またはurm (Recordsの場合))に応じて異なります。

ロード・バランシング・クラスタを管理している場合、このディレクトリをネットワーク共有上に移動することをお薦めします。

使用方法

- 第2.12項「ディレクトリとパス」

場所

- コンテンツ・サーバー: DomainHome/ucm/cs/bin/intradoc.cfg

- Inbound Refinery: DomainHome/ucm/ibr/bin/intradoc.cfg

- Records: DomainHome/ucm/urm/bin/intradoc.cfg

例

構成エントリとしての使用例:

IntradocDir=c:/ucm/cs1

IntradocRealm

コンテンツ・サーバー・インスタンスまたはWebサーバー・プラグインがBasic認証にチャレンジするときに使用するレルムを定義します。

ブラウザでは、ログイン・ダイアログに表示されるレルムは通常、リソースと呼ばれます。

NTLMではレルムは使用されません。認証は常にMicrosoftネットワーク全体に対して行われます。

デフォルトはIDC Securityです。

使用方法

- 第2.24.2項「外部セキュリティ」

- 第2.27項「Webサーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IntradocRealm=main

関連項目

- NtlmSecurityEnabled

IntradocServerHostName

コンテンツ・サーバー・インスタンスへのソケット接続をオープンするときに使用するホスト名を定義します。

この設定は、Webサーバーからのコールをコンテンツ・サーバーへのリクエストに変換するCGIコードによって使用されます。

デフォルト値はlocalhostです。

サービスをリモート・コールするには、IntradocServerHostNameがIPまたはDNSに設定されている必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IntradocServerHostName=IP

関連項目

- HttpServerAddress

IntradocServerPort

Webサーバーのフィルタまたは他のアプリケーションがコンテンツ・サーバー・インスタンスとの通信に使用する必要があるポートを定義します。

この設定は、Webサーバーへのコールをコンテンツ・サーバー・インスタンスへのリクエストに変換するCGIコードに対して、コンテンツ・サーバーとの通信にはこのポートを使用するように指示します。CGIコードは、コンテンツ・サーバー・インスタンスの停止と開始が行われた後、Webサーバーの停止と開始が行われると、自動的にこの値を取得します。

CGIコードは、IISではiis_idc_cgi.dll ISAPI拡張機能によって実装されます。

デフォルトは4444です。

サービスをリモート・コールするには、サーバー・ポートが定義されている必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IntradocServerPort=5550

IsAllowIndexRenditions

TRUEに設定されている場合、ドキュメントの追加のレンディションを許可します。これは、索引付け可能なボールト・レンディションもWeb表示可能なレンディションも存在しない場合にのみ使用されます。

許可されるレンディション・タイプは、IndexableRenditionsにリストされます。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

関連項目

- IndexableRenditions

IsAutoArchiver

コンテンツ・アイテムの自動的なインポートまたは転送を有効にします。

TRUEに設定されている場合、コンテンツ・サーバーは、自動的にアーカイブをインポートおよび転送します。

FALSEに設定されている場合、コンテンツ・サーバーが自動的にアーカイブをインポートおよび転送することはありません。

NoAutomation設定は、この設定より優先されます。

デフォルトはTRUEです。

使用方法

- 第2.1項「アーカイバ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsAutoArchiver=false

関連項目

- NoAutomation

IsAutoNumber

コンテンツIDの自動採番を有効にします。

TRUEに設定されている場合、新しいコンテンツ・アイテムのチェックイン時に、自動的にコンテンツID (dDocName)が割り当てられます。

FALSEに設定されている場合、ユーザーが新しいコンテンツ・アイテムにコンテンツIDを指定する必要があります。

デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

- 「システム・プロパティ」、「オプション」タブ、「チェックイン時にコンテンツIDを自動割当てする」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「チェックイン時にコンテンツIDを自動割当てする」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsAutoNumber=true

関連項目

- AutoNumberPrefix

IsAutoQueue

Inbound Refineryによる変換後のコンテンツ・アイテムの処理を有効にします。

TRUEに設定されている場合、コンテンツ・アイテムは、Inbound Refineryによって変換された後に、コンテンツ・サーバーによって処理されます。

FALSEに設定されている場合、コンテンツ・アイテムは、Inbound Refineryによって変換された後に、コンテンツ・サーバーによって処理されません。

NoAutomation設定は、この設定より優先されます。

デフォルトはTRUEです。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsAutoQueue=false

関連項目

- NoAutomation

IsAutoSearch

自動的な索引作成およびアーカイブ・エクスポートを有効にします。

TRUEに設定されている場合、コンテンツ・サーバーは、自動的にコンテンツ・アイテムの索引を作成するか、または自動的にアーカイブにドキュメントをエクスポートします。

FALSEに設定されている場合、コンテンツ・サーバーが自動的にコンテンツ・アイテムの索引を作成したり、自動的にアーカイブにドキュメントをエクスポートしたりすることはありません。

NoAutomation設定は、この設定より優先されます。

デフォルトはTRUEです。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsAutoSearch=true

関連項目

- NoAutomation

IsContentRefineryPresent

Inbound Refineryがインストールされているかどうかを指定します。

この値は、Oracle WebCenter Contentの初期インストール中はFALSEに設定されています。

この値は、Inbound Refineryのインストール中はTRUEに設定されています。

デフォルトはFALSEです。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsContentRefineryPresent=true

IsDpSubmitErrorFatal

コンテンツ・プロファイルとともに使用されます。TRUEに設定されている場合、グローバル・ルール違反が発生したときに、コンテンツ・サーバーが致命的エラーを発行できます。

使用方法

- 第2.6項「コンテンツ・プロファイル」

場所

IntradocDir/config/config.cfg

例

IsDpSubmitErrorFatal=true

関連項目

- Oracle Fusion Middleware Oracle WebCenter Contentの管理

IsDynamicConverterEnabled

Dynamic Converterを有効にします。

この値は、Oracle WebCenter Contentの初期インストール中はFALSEに設定されています。

この値は、Dynamic Converterのインストール中はTRUEに設定されています。

デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

- 「システム・プロパティ」、「オプション」タブ、「Dynamic Converterを有効にする」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「Dynamic Converterを有効にする」

- IntradocDir/config/config.cfg

例

構成設定として、Dynamic Converter機能を有効にします。

IsDynamicConverterEnabled=true

Idoc Scriptとして、Dynamic Converterの機能が有効になっているかどうかの評価に使用します。

<$if IsDynamicConverterEnabled and isTrue(IsDynamicConverterEnabled)$>
<tr>
<td align="center" width="75">
<a href="<$HttpCgiPath$>?IdcService=GET_TEMPLATE_CONVERSIONS">
<img src="<$HttpImagesRoot$><$admin_conversion_image$>" border="0"
width="<$adminImageWidth$>" height="<$adminImageHeight$>"></a>
</td>
<td width="10">&nbsp;
</td>
<td width="245"><span class=largeTableEntry>
<a href="<$HttpCgiPath$>?IdcService=GET_TEMPLATE_CONVERSIONS">
<$lc("wwTemplateConversions")$></span></a>
</td>
</tr>
<$endif$>

IsFormsPresent

PDF Formsソフトウェアがインストールされているかどうかを指定します。

この値は、初期インストール中はFALSEに設定されています。

この値は、PDF Formsのインストール中はTRUEに設定されています。

注意:
この変数は非推奨になっています。かわりに、IsContentRefineryPresentを使用してください。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsFormsPresent=false

関連項目

- IsContentRefineryPresent

IsJava

コンテンツ・サーバーWebページのローカル・データを表示します。

この変数は、ページのフラグとして、またはサービス・コールのパラメータとして設定できます。

使用方法

- 第2.11項「デバッグ」

出力

TRUEに設定されている場合、DataBinderにあるローカル・データを返します。

例

コンテンツ・サーバーWebページのコードにインクルードされた場合、ページのローカル・データが表示されます。

<$IsJava=1$>

コンテンツ・サーバーのURLにインクルードされた場合、「新規チェックイン」ページのローカル・データが表示されます。

http://myinstance.com/idcplg/idc_cgi_isapi-instance.dll?IdcService=CHECKIN_NEW_FORM&IsJava=1

IsJdbcLockTrace

データベース・ロック・アクティビティについて、コンソールにトレース情報をダンプします。

SQL ServerおよびOracleのデータベースでのみ使用されます。

Solarisでは、IntradocDir/etc/log/ディレクトリのログ・ファイルにも出力されます。

デフォルトは空の文字列です。

注意:
この変数は、Content Server 7.0のリリースの時点で廃止されています。この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.9項「データベース」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsJdbcLockTrace=true

関連項目

- IsJdbcQueryTrace

IsJdbcQueryTrace

データベース問合せアクティビティについて、コンソールにトレース情報をダンプします。

SQL ServerおよびOracleのデータベースでのみ使用されます。

Solarisでは、IntradocDir/etc/log/ディレクトリのログ・ファイルにも出力されます。

デフォルトは空の文字列です。

注意:
この変数は、Content Server 7.0のリリースの時点で廃止されています。この機能は、「システム監査情報」ページにあります。

使用方法

- 第2.9項「データベース」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsJdbcQueryTrace=true

関連項目

- IsJdbcLockTrace

IsJspServerEnabled

Java Server Page機能を有効にします。

Java Server Pageのサポートにより、開発者は、標準のコンテンツ・サーバー・コンポーネント・アーキテクチャではなく、Java Server Pageを通じて、コンテンツ・サーバーのコンテンツ、ResultSet、パーソナライズおよびセキュリティの定義、事前定義変数および構成設定にアクセスし、それらを変更できます。コンテンツ・サーバーに実行可能コンテンツとして存在するJava Server Pageから、コンテンツ・サーバーのサービスおよびIdocスクリプト機能を実行することもできます。

デフォルトはFALSEです。

使用方法

- 第2.17項「JSP」

場所

- 「システム・プロパティ」、「サーバー」タブ、「Java Server Page (JSP) の実行」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「Java Server Page (JSP)の有効化」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

IsJspServerEnabled=true

関連項目

- JspEnabledGroups

IsOverrideFormat

ユーザーがチェックイン時に別の変換フォーマットを選択できるようにします。

TRUEに設定した場合、チェックイン・ページの「プライマリ・ファイル」および「代替ファイル」に対して「フォーマット」オプション・リストが表示されます。

デフォルトはFALSEです。

使用方法

- 第2.13項「フィールド表示」

場所

- 「システム・プロパティ」、「オプション」タブ、「チェックイン時にフォーマットのオーバーライドを許可」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「チェックイン時のフォーマットのオーバーライドを許可する」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

IsOverrideFormat=true

Idoc Scriptとして、フォーマットのオーバーライド関数の値を返します。

<$IsOverrideFormat$>

IsPageDebug

すべてのインクルードのトレースを有効にして、Idoc Scriptのeval関数をコールします。

eval関数のコンテンツと動的に割り当てられたすべてのインクルードも、トレースの一部として表示されます。トレースは、includeコールまたはevalコールのネストされたレベルごとに1つの+文字ずつインデントされます。トレースでは、すべてのエラー・メッセージ(ネストされた場所情報を含まない)と、Idoc Scriptのすべてのtrace関数コールの出力も表示されます。

注意:
この設定は、Internet Explorerバージョン6ではサポートされていません。

使用方法

- 第2.11項「デバッグ」

出力

トレースの結果は、Webページの一番下に表示されるデバッグ・トレースからアクセス可能なデバッグ・メニュー・ツールバー・オプションを介して表示できます。

デバッグ・トレースをクリックしてデバッグ・メニュー・ツールバーを表示し、次のオプションのいずれかをクリックします。

要素

説明

すべて非表示

開いているデバッグ・ポップアップをすべて非表示にします。

Idocスクリプト・トレース

コールされるすべてのインクルードのツリー構造ビューを表示します。

リクエスト・バインダ

ローカル・データおよびResultSetに関する情報を表示します。見出しをクリックして、詳細情報のビューを展開します。

レスポンス・バインダ

ローカル・データおよびResultSetに関する情報を表示します。見出しをクリックして、詳細情報のビューを展開します。

最終ページ・バインダ

ローカル・データおよびResultSetに関する情報を表示します。見出しをクリックして、詳細情報のビューを展開します。

JavaScriptログ

デフォルト設定値Verboseが指定されているロガー・コンソール・ウィンドウを表示します。チェックボックスを選択して、次の各オプション、「情報」、「警告」、「エラー」、「時間」、「ウィンドウ」、「トレース」、「グローバル」、「スキーマ」、「JavaScript」、「LogReader」を表示します。「一時停止」または「クリア」をクリックして、ロガー・コンソールに表示される情報の速度と量を制御します。

例

コンテンツ・サーバーのconfig.cfgファイルで構成設定として使用されるため、サーバー全体に適用されます。

IsPageDebug=1

Webブラウザのアドレス・フィールドで、ページのURLの末尾に追加する場合:

&IsPageDebug=1

テンプレート・ページまたはIdoc Scriptインクルードで使用される場合:

<$IsPageDebug=1$>

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「eval」

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「setResourceInclude」

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「trace」

isPhysicallySplitDir

vault/ディレクトリとweblayout/ディレクトリが異なるファイル・システムに存在することを、コンテンツ・サーバー・インスタンスに示します。

TRUEに設定されている場合、各ディレクトリが異なるファイル・システムに存在することを、サーバーに示します。

デフォルトはFALSEです。

使用方法

- 第2.12項「ディレクトリとパス」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

isPhysicallySplitDir=true

関連項目

- WeblayoutDir

IsPrimaryUserBase

LDAPプロバイダが、外部ユーザーが定義されているプライマリLDAPサーバーかどうかを指定します。

TRUEに設定されている場合、プロバイダは、コンテンツ・サーバー・インスタンスにこれまでログインしたことのない新しいLDAPユーザーの認証に使用されます。

FALSEに設定されている場合、プロバイダは、このプロバイダからの資格証明を使用してこれまでにログインしたことのあるLDAPユーザーの認証にのみ使用されます。

デフォルトはTRUEです。

注意:
この設定は、コンテンツ・サーバーのバージョン7.0以降では廃止されています。LDAPプロバイダをチェックする順序の設定の詳細は、「Priority」を参照してください。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「プライマリ・ユーザー・ベース」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

IsPrimaryUserBase=false

isRepromptLogin

このワークフロー構成エントリは、ワークフロー・ステップに付加される接尾辞であり、新しい認証チャレンジを強制します。

TRUEに設定されている場合、この構成変数は、ワークフローの特定のステップでログインを強制します。これは、そのステップのデジタル署名として機能します。

この変数は、ワークフローの複数のステップに追加できます。

使用方法

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

次の例では、VPApprovalという名前のレビュー・ステップで、ワークフローを先に進めるために、デジタル署名が必要です。ワークフローを開始する前に、isRepromoptLogin構成エントリを次のように設定します。

VPApproval:isRepromptLogin=true

関連項目

- Oracle Fusion Middleware Oracle WebCenter Contentによる開発

IsSavedWfCompanionFile

コンテンツがワークフローに入ったときに作成されるコンパニオン・ファイルのコピーを保存します。通常、コンパニオン・ファイルは、コンテンツが承認されてワークフローを終了したときに削除されます。

この変数を使用するには、例に示すように変数をconfig.cfgファイルに挿入し、コンテンツ・サーバー・インスタンスを再起動します。ファイルは、IntradocDir/data/workflow/saved/ディレクトリに保存されます。

使用方法

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成変数としての使用例:

IsSaveWfCompanionFiles=true

isValidateFile

Uploadアプレットのパラメータとして使用されます。この変数は、アップロードするファイルが存在することを検証します。使用するには、std_page.htmリソース・ファイル内のstd_multiupload_applet_definitionインクルードに定義されているアプレットの定義を上書きするコンポーネントを作成する必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

例

構成エントリとしての使用例:

isValidateFile=true

IsWebServerPagesOnly

ExtranetLookコンポーネントとともに使用されます。この変数は、Cookieベースの認証を使用するかどうかを決定します。ExtranetLook機能の使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentの管理』を参照してください。

IsWebServerPagesOnlyがTRUEに設定されている場合、Basic認証が使用され、Cookieベースのログオン/ログオフ機能は無効です。カスタマイズされているバージョンのWebサーバー・フィルタが使用されます。

FALSEに設定されている場合、Cookieベースの認証が使用されます。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- IntradocDir/config/config.cfg

例

IsWebServerPagesOnly=FALSE

関連項目

- CookieAuthTimeoutInDays

- CookieProxyPassword

JdbcConnectionString

ホスト名、ポート番号およびインスタンス名を指定して、Java Database Connectivity (JDBC)接続(SQL Serverデータ・ソース名)を定義します。

この設定は、システムをデータベースに接続できないようなネットワーク・エラーが発生していない場合、コンテンツ・サーバーのインストール中に自動的に構成されます。データベースが変更された場合、またはインストール中にシステムがデータベースを検出できなかった場合、この設定を手動で変更する必要があります。

Microsoft AccessまたはMSDEのランタイム・バージョンを使用する場合、設定するデータベース構成オプションはありません。

デフォルトは、JdbcConnectionString=JDBC:ODBC:SQLForInstance_nameです。

使用方法

- 第2.9項「データベース」

場所

- 「システム・プロパティ」、「データベース」タブ、「JDBC接続文字列」

- IntradocDir/config/config.cfg

例

JDBC接続パスを定義します。

JdbcConnectionString=jdbc:oracle:thin:@hostname:port_number:instance_name

関連項目

- JdbcDriver

JdbcDriver

Java Database Connectivity (JDBC)のデバイス・ドライバ名を定義します。

この設定は、システムをデータベースに接続できないようなネットワーク・エラーが発生していない場合、コンテンツ・サーバーのインストール中に自動的に構成されます。データベースが変更された場合、またはインストール中にシステムがデータベースを検出できなかった場合、この設定を手動で変更する必要があります。

Microsoft AccessまたはMSDEのランタイム・バージョンを使用する場合、設定するデータベース構成オプションはありません。

デフォルト値はありません。

使用方法

- 第2.9項「データベース」

場所

- 「システム・プロパティ」、「データベース」タブ、JDBCドライバ・オプション/JDBCドライバ名

- IntradocDir/config/config.cfg

例

JDBCデバイス・ドライバを定義します。

JdbcDriver=oracle.jdbc.driver.OracleDriver

関連項目

- JdbcConnectionString

JdbcPassword

SQL Serverデータベースのパスワードを定義します。

デフォルト値はありません。

使用方法

- 第2.9項「データベース」

場所

- 「システム・プロパティ」、「データベース」タブ、「JDBCユーザー・パスワード」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JdbcPassword=password

関連項目

- JdbcUser

- JdbcPasswordEncoding

JdbcPasswordEncoding

SQL Serverデータベースのパスワードを格納する場合に使用するエンコーディングのタイプを定義します。

パスワードの暗号化を無効にするには、この値をClearTextに設定します。

デフォルトはIntradocです。

他の空でない値が割り当てられている場合、エンコーディングは実行されません。

使用方法

- 第2.9項「データベース」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JdbcPasswordEncoding=ClearText

JdbcUser

SQL Serverデータベースのユーザー名を定義します。

デフォルトはsaです。

使用方法

- 第2.9項「データベース」

場所

- 「システム・プロパティ」、「データベース」タブ、「JDBCユーザー名」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JdbcUser=sa

関連項目

- JdbcPassword

JspAdminQuery

Webアプリケーション・ファイルとして使用できるようにするファイルを定義します。

この設定は、通常、Oracle JavaBeanをデプロイする際にWebアプリケーション・アーカイバ(.warファイル)を検索する問合せを定義するために使用されます。

使用方法

- 第2.17項「JSP」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JspAdminQuery=dExtension <matches> war

関連項目

- IsJspServerEnabled

JspDefaultIndexPage

Webアプリケーションのデフォルト・ページを定義します。

これは検索順序を定義するカンマ区切りのファイル名のリストです。最初のファイルが存在しない場合は、2番目のファイルがデフォルトのページになり、以下同様です。

デフォルトはindex.html,index.htm,index.jspです。

使用方法

- 第2.17項「JSP」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JspDefaultIndexPage=index.html,index.htm,index.jsp

関連項目

- IsJspServerEnabled

JspEnabledGroups

Java Server Pageの機能に対して有効にするセキュリティ・グループを定義します。

Java Server Pageは通常、ホスティング・システムのすべてのリソースに対して完全な権限を持っているため、特定の権限を持つコントリビュータのみを許可するセキュリティ・グループにJava Server Pageを制限することが重要になる可能性があります。

使用方法

- 第2.17項「JSP」

場所

- 「システム・プロパティ」、「サーバー」タブ、「JSPを有効にするグループ」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「JSPを有効にするグループ」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

JspEnabledGroups=jsp,group1

関連項目

- IsJspServerEnabled

JvmCommandLine

Java仮想マシン・コマンドラインの実行可能ファイルの場所を定義します。

デフォルト値はありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.8.1項「Inbound Refinery」

場所

- コンテンツ・サーバー: DomainHome/ucm/cs/bin/intradoc.cfg

- Inbound Refinery: DomainHome/ucm/ibr/bin/intradoc.cfg

例

構成エントリとしての使用例:

JvmCommandLine="c:/jdk1.3.1/bin/java.exe" -classpath $CLASSPATH $STARTUPCLASS

LatestReleasedTimestampTimeout

変換済のコンテンツ・アイテムのタイムスタンプをチェックする最小間隔(ミリ秒単位)を定義します。

キャッシュされている特定のWeb表示可能ファイルの場合、Dynamic Converterは、この設定に指定されている時間が経過した後にのみタイムスタンプを再確認します。

キャッシュされているコンテンツ・アイテムのタイムスタンプが変化している場合、Dynamic Converterはファイルを再変換します。

デフォルトは1500ミリ秒(1.5秒)です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LatestReleasedTimestampTimeout=60000

LdapAdminDN

LDAPサーバーの読取り権限を持つユーザー名を指定します。

この設定が定義されていない場合、プロバイダは匿名でLDAPサーバーに接続します。

LDAPプロバイダがActive Directoryと通信している場合、ユーザー名とパスワードが必要となり、DOMAIN\usernameのフォーマットで表される有効なドメイン・ユーザーである必要があります。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「LDAP管理者DN」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

LdapAdminDN=ldap_admin

関連項目

- LdapAdminPassword

LdapAdminPassword

LDAPサーバーに対する読取り権限を持つユーザー名を指定するLdspAdminDN設定のパスワードを指定します。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「LDAP管理者パスワード」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

LdapAdminPassword=idc2

関連項目

- LdapAdminDN

LdapPort

LDAPサーバーがリスニングするポート番号を定義します。

SSLを使用する場合以外は、デフォルトは389です。

SSLを使用している場合(「UseSecureLdap」を参照)、この値を636に設定します。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「LDAPポート」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

LdapPort=636

関連項目

- UseSecureLdap

LdapServer

LDAPサーバーのホスト名。

プロバイダがアクティブ・ディレクトリと通信している場合は、プライマリ・ドメイン・コントローラのホスト名にする必要があります。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「LDAPサーバー」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

LDAPServer=iplanet_dir

LdapSuffix

すべてのLDAP操作に使用するルート接尾辞(ネーミング・コンテキスト)を指定します(o=example.com、dc=example,dc=comなど)。

LDAPグループからコンテキスト・サーバーのロールおよびアカウントへのすべてのマッピングはこのルートから始まります。

カンマの前後にスペースを入れないでください。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「LDAP接尾辞」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

LdapSuffix=dc=example,dc=com

LkDisableOnRebuild

リンク・マネージャ機能とともに使用されます。

この変数は、索引の再構築サイクル中のリンクの抽出を制御します。

TRUEに設定されている場合、リンク・マネージャは、索引の再構築サイクル中にリンクを抽出できなくなります。FALSEに設定されている場合、リンク・マネージャは、索引の再構築サイクル中にリンクを抽出します。

デフォルトはFALSEです。

リンク・マネージャによる作業はすべて索引作成サイクル時に実行されるため、ドキュメントの索引作成およびコレクションの再構築に必要な時間が増加します。ただし、これにかかる時間は、その時間の大部分がコレクションへのドキュメントの索引作成に費やされるので、目立たない可能性があります。必要な時間は、関連するドキュメントのタイプとサイズによって決まります。つまり、ファイルの変換が必要な場合は、テキストベース(HTML)のファイルより時間がかかります。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkDisableOnRebuild=TRUE

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkDisableReferenceInfo

リンク・マネージャ機能とともに使用されます。

この変数は、「コンテンツ情報」ページの「リソース」セクションを有効または無効にします。TRUEに設定されている場合、コンテンツ・サーバーは、「参照」セクションを表示しないように構成されます。その場合、リンク・マネージャはプレゼンテーションのリンク参照を計算しません。

FALSEに設定されている場合、コンテンツ・サーバーは「コンテンツ情報」ページに「表示」/「非表示」のトグル・スイッチを表示します。トグル・スイッチをクリックすることにより、リンク参照が表示または非表示になります。

デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkDisableReferenceInfo=TRUE

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkDisallowConversionFormats

リンク・マネージャ機能とともに使用されます。

この変数は、リンク抽出処理の前にリンク・マネージャが変換しないファイル・フォーマットのリストを提供します。デフォルトでは空です。

一部のファイル・フォーマット(Wordなど)は、リンクを抽出できるようになる前にHtmlExportで変換する必要があります。ただし、テキストベースのファイル・フォーマット(HTML)内のリンクは、リンク・マネージャで抽出でき、HtmlExportで変換する必要はありません。

たとえば、実際にはテキストベースであるPHPファイル(または他のカスタム・フォーマットのファイル)があるとします。このようなファイルでは、リンク・マネージャでのリンク抽出処理の前に、HtmlExportによる変換が不要な場合があります。この構成変数には、このようなフォーマットをリストできます。

使用方法

- 第2.5項「コンテンツ・アイテム」

パラメータ

パラメータはフォーマットのみです。

場所

IntradocDir/config/config.cfg

例

次の例では、完全なMIMEタイプ・フォーマットを指定することにより、除外するタイプのリストに含まれる変化形が制限されます。たとえば、application/mswordをリストに含めると、application/vnd.mswordや他の変化形は除外されません。この場合は、除外する各特定MIMEタイプのバリエーションをリストに含める必要があります。

LkDisallowConversionFormats=application/msword,audio/wav,video/avi

次の例では、リストに含まれる各MIMEタイプのすべての変化形が除外されます。MIMEタイプの短縮フォーマットを使用すると、柔軟性を高めることができるためさらに有益です。

LkDisallowConversionFormats=msword,wav,avi

重要:
リンク・マネージャでは、ファイル・フォーマットにhcs、htm、image、text、xml、jspおよびaspのいずれかの文字列が含まれているファイルの変換にHtmlExportを使用しません。これらのファイルは、リンク・マネージャによって処理され、変換の必要はありません。システムの現在のファイル・フォーマットおよび拡張マッピングを確認するには、構成マネージャで「ファイル・フォーマット」ウィンドウを使用します。

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkIsSecureSearch

リンク・マネージャ機能とともに使用されます。

この変数は、リンク検索時の非管理ユーザーに対するセキュリティ制限チェックを管理するために使用されます。

TRUEに設定されている場合、管理されたリンク検索を実装している場合は非管理ユーザーに対するセキュリティ・チェックを実行するように、リンク・マネージャが構成されます。これがデフォルトの設定です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkIsSecureSearch=TRUE

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkReExtractOnRebuild

リンク・マネージャ機能とともに使用されます。

この変数は、索引作成済ドキュメントを再構築する際のリンクの抽出を制御します。TRUEに設定されている場合、再構築中にシステムにドキュメントを索引付ける際にドキュメントからリンクを抽出するように、リンク・マネージャが構成されます。これがデフォルトの設定です。

FALSEに設定されている場合、リンク・マネージャは、再構築中にシステムにドキュメントを索引付けする際にドキュメントからリンクを抽出できません。

リンク・マネージャによる作業はすべて索引作成サイクル時に実行されるため、ドキュメントの索引作成およびコレクションの再構築に必要な時間が増加します。ただし、これにかかる時間は、全体の時間の大部分がドキュメントのコレクションへの索引作成に費やされるため、重要ではない可能性があります。それでも、必要な時間は、関連するドキュメントのタイプとサイズによって決まります。つまり、ファイルの変換が必要な場合は、テキストベース(HTML)のファイルより時間がかかります。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkReExtractOnRebuild=FALSE

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkRefreshBatchSize

リフレッシュ・プロセス中にSite Studioに発行するリンクの数を制御するために使用されます。デフォルトでは、バッチ・サイズの値は100に設定されています。

この構成変数の値によって、リフレッシュ・プロセス中の中止リクエストに対する反応を速く(または遅く)できます。LkRefreshErrorsAllowedの計算は、各バッチ・プロセスの実行中ではなく、実行後に完了します。したがって、LkRefreshBatchSizeの値が小さいほど、許容エラー数を超えるまでの時間が短くなり、リフレッシュ・アクティビティがすぐに終了する可能性が高くなります。

Site Studioを使用している場合は、LkRefreshErrorPercentとLkRefreshErrorThresholdの設定を組み合せて使用するよりも、LkRefreshBatchSizeを使用するほうが、リフレッシュ中止オプションを細かく制御できます。たとえば、パーセント値を5に設定し、しきい値を20に設定した場合は、最初のエラー発生後にリフレッシュ・アクティビティが中止すると予測します。しかし、リンク・マネージャは、中止する前に、実際に複数のエラーを処理する可能性があります。

これは、リフレッシュ・アクティビティ時に、Site Studioリンク(Site Studioの処理が必要なリンク)として認識されたリンクがすべてグループ化され、1つのバッチとしてSite Studioに送信されるためです。結果的に、リフレッシュはより効率的ですが、中止リクエストは、Site Studioで中止および合計エラー数が認識されないため、この時点では応答がありません。

ただし、Site Studioでは、現在のバッチで発生したエラー数は認識されます。このため、リンク・マネージャの中止計算はすべての状況で行うことはできず、エラー構成値(パーセントおよびしきい値)は、中止する必要がある時期をリンク・マネージャに提示するのみです。しかし、LkRefreshBatchSizeを使用することによって、Site Studioリンク・バッチを含むリフレッシュ・アクティビティの実行中の中止リクエストに対する反応をより正確に制御できます。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkRefreshBatchSize=200

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

LkRefreshErrorPercent

リンク・マネージャ機能とともに使用されます。

この変数は、リフレッシュ・アクティビティを中止する必要があるかどうかを計算するために、LkRefreshErrorThresholdとともに使用されます。リフレッシュ・アクティビティでしきい値を超える数のリンクが処理されると、リンク・マネージャではエラーの割合が計算されます。エラー数がパーセント値を超えると、リフレッシュ・アクティビティは中止されます。

デフォルトでは、パーセント値は10に設定されています。

注意:
LkRefreshErrorsAllowedの値を設定することを選択する場合、しきい値とパーセント値の組合せより優先される可能性があります。たとえば、その値が、リンク/エラーに対して計算されたしきい値/パーセント値より小さい場合、処理されたリンク数がしきい値を超えていなくても、リフレッシュ・アクティビティが中止する可能性があります。したがって、LkRefreshErrorsAllowed構成設定、またはLkRefreshErrorThreshold構成設定とLkRefreshErrorPercent構成設定の組合せの、どちらかを使用することをお薦めします。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkRefreshErrorPercent=20

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

- LkRefreshErrorsAllowed

- LkRefreshErrorThreshold

LkRefreshErrorsAllowed

リンク・マネージャ機能とともに使用されます。

この変数は、リフレッシュ・プロセスの絶対エラー数を設定します。設定されている数のエラーが発生すると、リフレッシュ・アクティビティは中止します。デフォルトでは、この構成設定は使用されません。

注意:
LkRefreshErrorsAllowedの値を設定することを選択する場合、しきい値とパーセント値の組合せより優先される可能性があります。たとえば、その値が、リンク/エラーに対して計算されたしきい値/パーセント値より小さい場合、処理されたリンク数がしきい値を超えていなくても、リフレッシュ・アクティビティが中止する可能性があります。したがって、LkRefreshErrorsAllowed構成設定、またはLkRefreshErrorThreshold構成設定とLkRefreshErrorPercent構成設定の組合せの、どちらかを使用することをお薦めします。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkRefreshErrorsAllowed=10

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

- LkRefreshErrorPercent

- LkRefreshErrorThreshold

LkRefreshErrorThreshold

リンク・マネージャ機能とともに使用されます。

この変数は、リフレッシュ・アクティビティを中止する必要があるかどうかを計算するために、LkRefreshErrorPercentとともに使用されます。リフレッシュ・アクティビティでしきい値を超える数のリンクが処理されると、リンク・マネージャではエラーの割合が計算されます。エラー数がパーセント値を超えると、リフレッシュ・アクティビティは中止されます。

デフォルトでは、しきい値は100に設定されています。

注意:
LkRefreshErrorsAllowedの値を設定することを選択する場合、しきい値とパーセント値の組合せより優先される可能性があります。たとえば、その値が、リンク/エラーに対して計算されたしきい値/パーセント値より小さい場合、処理されたリンク数がしきい値を超えていなくても、リフレッシュ・アクティビティが中止する可能性があります。したがって、LkRefreshErrorsAllowed構成設定、またはLkRefreshErrorThreshold構成設定とLkRefreshErrorPercent構成設定の組合せの、どちらかを使用することをお薦めします。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LkRefreshErrorThreshold=200

関連項目

- リンク・マネージャの使用に関する詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentのマネージング』を参照してください。

- LkRefreshErrorsAllowed

- LkRefreshErrorPercent

LmDefaultLayout

使用するデフォルトのレイアウト(「トップ・メニュー」、「トレイ」など)を定義します。

デフォルトのインストール値は「トレイ」です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

LmDefaultLayout=Top Menus

LmDefaultSkin

使用するデフォルトのスキン(Oracle、Oracle2など)を定義します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

LmDefaultSkin=Oracle

LocaleArchiverDateFormat

アーカイバのバッチ・ファイルのサブディレクトリのネーミング・フォーマットを指定します。通常、複数のバージョンのコンテンツ・サーバーを使用してエクスポートおよびインポートする場合に使用されます。

デフォルトはyy-MMM-dd_HH.mm.ss_SSSです。たとえば、03-feb-04_15.04.14_174です。

使用方法

- 第2.1項「アーカイバ」

- 第2.18項「ローカライズ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

LocaleArchiverDateFormat=dd-mm-yy

LogMessagePrefix

ログ・エントリに接頭辞を追加して、エントリを作成しているコンテンツ・サーバー・インスタンスを指定します。

デフォルト値はありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.11項「デバッグ」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

LogMessagePrefix=Master

LogName

Content Serverアナライザ・ユーティリティによって作成されるログ・ファイルのファイル名を指定します。

このログ・ファイルは、IdcAnalyzeLogDir設定で指定されているディレクトリに作成されます。

デフォルトはIdcAnalyze.logです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

LogName=contentserver1_analyze.log

関連項目

- IdcAnalyzeLogDir

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「SafeDir」

- TempDir

MacSupportsSignedApplets

Macintoshクライアントのアップロード・アプレットおよびダウンロード・アプレットを有効にします。

Macintoshクライアントが使用されている場合のみ使用されます。

TRUEに設定されている場合、Macintoshクライアントは、アップロード・アプレットおよびダウンロード・アプレットを使用して、複数のファイルをチェックインおよびチェックアウトできます。

FALSEに設定されている場合、Macintoshクライアントは、アップロード・アプレットおよびダウンロード・アプレットを使用できません。

デフォルトはFALSEです。

使用方法

- 第2.3項「クライアント」

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MacSupportsSignedApplets=true

MailServer

電子メールの処理に使用される電子メール・サーバーを定義します。

電子メールのサポートは、コラボレーション・サーバーでのワークフロー通知、サブスクリプション通知およびプロジェクト通知のために必要です。

デフォルト値はありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「メール・サーバー」

- 「管理」、「管理サーバー」、「インターネットの構成」メニュー・オプション、「メール・サーバー」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MailServer=mail.example.com

関連項目

- SysAdminAddress

- SmtpPort

MajorRevSeq

リビジョン番号のメジャー・シーケンスを定義します。

メジャー・リビジョンのラベル・シーケンスを返します(構成設定の値を返します)。

文字列を返します。

デフォルトは1-99です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

- 「システム・プロパティ」、「オプション」タブ、「メジャー・リビジョンのラベル・シーケンス」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「メジャー・リビジョンのラベル・シーケンス」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

MajorRevSeq=A-Z

スクリプトとして、構成設定の値を返します。

<$MajorRevSeq$>

関連項目

- MinorRevSeq

MaxArchiveErrorsAllowed

アーカイバがインポートまたはエクスポートを停止するエラー数を設定します。デフォルトは50です。

使用方法

- 第2.1項「アーカイバ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxArchiveErrorsAllowed=10

MaxCollectionSize

1度のバッチでインデクサに渡すファイル数を定義します。

有効範囲は1～65535です。

大型の索引コレクションの場合は、値2000をお薦めします。値が小さくなると、索引作成のパフォーマンスが非効率になります。

1度のバッチで処理されるファイル数を返します。

デフォルトは25です。

使用方法

- 第2.16項「索引の作成」

場所

- 「リポジトリ・マネージャ」、「インデクサ」タブ、「構成」、「1度のインデクサ・バッチで処理されるコンテンツ・アイテム数」

- IntradocDir/config/config.cfg

例

構成設定として、バッチ・サイズを定義します。

MaxCollectionSize=25

スクリプトとして、構成ファイルから値を返します。

<$MaxCollectionSize$>

MaxConversionCacheSizeInMegs

Dynamic Converterキャッシュの最大サイズを定義します(MB単位)。

クリーンアップ・スキャンを実行すると(「DatedCacheIntervalDays」を参照)、この設定に基づいて、次のようにキャッシュがクリーンアップされます。

- このサイズよりもDynamic Converterキャッシュが大きい場合、このサイズよりもキャッシュが小さくなるまで、キャッシュされている最も古いファイル(最終アクセス日で決定)が削除されます。

- このサイズよりもDynamic Converterキャッシュが小さい場合、ConversionCacheExpirationPeriodInDaysより古く、変換ルール(強制変換または事前変換)による変換が行われていないファイルが削除されます。

デフォルトは10,240 (10GB)です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxConversionCacheSizeInMegs=5,000

関連項目

- ConversionCacheExpirationPeriodInDays

- DatedCacheIntervalDays

MaxDocIndexErrors

インデクサが索引作成または再構築を停止するエラー数を設定します。

デフォルトは50です。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxDocIndexErrors=50

MaxErrorsAllowed

バッチ・ローダーがバッチ・ロード・ファイルのレコードの処理を停止するエラー数を設定します。

夜間にバッチ・ローダーを実行して大量のコンテンツ・アイテムを処理する場合、デフォルト値を増やします。バッチ・ローダーが処理するコンテンツ・アイテムが少量であることを検出した場合、デフォルト値を減らします。

デフォルトは50です。

整数値を返します。

使用方法

- 第2.2項「バッチ・ローダー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

MaxErrorsAllowed=50

MaxIndexableFileSize

索引を作成するドキュメントの最大ファイル・サイズを設定します。フルテキストの索引作成の場合、この構成変数を使用して変更されている場合を除き、最大サイズのデフォルトは10MBです。

MaxIndexableFileSizeのデフォルトは10485760です。それより大きなドキュメントでフルテキストの索引作成が必要な場合は、MaxIndexableFileSizeの値を増やす必要があります。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

MaxIndexableFileSize=10485760

MaxIntegerAllowed

カスタム整数メタデータ・フィールドで許可される最大値を設定します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

MaxIntegerAllowed=1000000

関連項目

- MinIntegerAllowed

MaxNumRecursiveStepDefinitions

カスタム変換を定義するときに使用できる再帰型の最大レベル数を指定します。

カスタム変換エンジンは別の変換をコールできますが、ループを回避するために、この設定によって、そのようなコールのレベル数を制限します。

デフォルトは6です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

IntradocDir/ucm/ibr/bin/config.cfg

例

構成エントリとしての使用例:

MaxNumRecursiveStepDefinitions=3

MaxQueryRows

リポジトリ・マネージャ、「アクティブ・レポート」のページおよび「処理中コンテンツ」ページの最大表示行数を設定します。

この値を増やすと、レスポンス時間が遅くなります。

デフォルトは200です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxQueryRows=50

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「IsMaxRows」

MaxRequestThreadCount

同時リクエスト・スレッドの最大数を設定します。

デフォルトは100です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxRequestThreadCount=50

MaxResults

コンテンツ・サーバー・ユーザー・インタフェースを使用する検索問合せで返されるコンテンツ・アイテムの最大数を設定します。検索リクエストでResultCountを指定しない場合またはResultCountがMaxResultsより大きい場合、MaxResultsに設定されている数の結果がリクエストされます。

値を指定した場合、プログラムされているデフォルトより優先されます。

デフォルト値はありません。返すことができる結果の最大数は200です。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxResults=200

MaxRowsPerTableArchiveExportBatch

フォルダ構造データをエクスポートする前に、アーカイブする表の行の最大数を設定します。

表の行の最大数には制限がありません。正の数を指定できます。

デフォルトは100000です。

注意:
MaxRowsPerTableArchiveExportBatchが適切に設定されていない場合、次のエラーメッセージが表示されます: csTableArchiveMaxRowExceeded

使用方法

- 第2.1項「アーカイバ」

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxRowsPerTableArchiveExportBatch=50000

MaxSavedSearchResults

ユーザーが保存できる検索の最大数を設定します。値を指定した場合、デフォルト(10)より優先されます。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxSavedSearchResults=25

MaxSearchableSubfolders

コントリビューション・フォルダの階層内で検索される(たとえばGET_SEARCH_RESULTS問合せで検索する場合の)サブフォルダの最大数を指定します。デフォルトでは、検索されるサブフォルダの最大数は500で制限されます。

注意:
この環境変数の値を増やすと、パフォーマンスが大幅に低下したり、SQLで許可されている最大制限(通常は32,000)を超える大きさの問合せが生成される(この場合、問合せは失敗します)可能性があります。このような理由で、この変数が存在し、適切な値に設定されています。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

MaxSearchableSubfolders=500

MaxSearchConnections

同時にオープンされる検索接続の最大数を設定します。

この設定はコンテンツ・サーバーで検索にOracleTextSearchを使用するように構成されている場合にのみ適用されます。コンテンツ・サーバーが、DATABASE.METADATAまたはDATABASE.FULLTEXTを使用するように構成されている場合には適用されません。

たとえば、MaxSearchConnectionsが5に設定され、同時に6つの検索がリクエストされた場合、6番目のリクエストは、最初の5つのリクエストのいずれかが完了するまで、キューに保持されます。

デフォルトは10です。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxSearchConnections=5

MaxSizeResourceFileCacheMillions

リソース・ファイルの最大サイズを、百万ダブルバイト文字単位で設定します。

この値は、読取りおよび解析が行われる前のファイル・サイズを制限します。

ファイル・サイズに2.5を掛けると、メモリー内の実際のサイズのより正確な見積もりが得られます。

デフォルトは10です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxSizeResourceFileCacheMillions=20

MaxStandardDatabaseResults

表示されるユーザーの最大数を設定します。

これは、リストからユーザーを選択できる任意のアプレットで有効です。

デフォルトは500です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MaxStandardDatabaseResults=1000

MemoFieldSize

データベースに作成されるメモ・フィールドのフィールド・サイズを定義します。

選択するサイズがデータベースでサポートされていることを確認します。

デフォルトは255文字です。

使用方法

- 第2.9項「データベース」

- 第2.13項「フィールド表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MemoFieldSize=300

関連項目

- MinMemoFieldSize

MinIndexableFileSize

索引を作成できるドキュメントの最小ファイル・サイズを設定します。フルテキストの索引作成の場合、この構成変数を使用して変更されている場合を除き、最小サイズのデフォルトは5バイトです。

MinIndexableFileSizeのデフォルトは5バイトです。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

MinIntegerAllowed

カスタム整数メタデータ・フィールドで許可される最小値を設定します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

MinIntegerAllowed=0

関連項目

- MaxIntegerAllowed

MinMemoFieldSize

カスタム・メタデータ・フィールドが、ロング・テキスト・フィールドではなく、メモ・フィールドとして定義されるサイズを定義します。

DocMeta表のフィールド・サイズがデータベースで直接編集されている場合、コンテンツ・サーバーはvarcharフィールド・タイプをその長さで分類します。

デフォルトは255文字です。

この設定が定義されている場合、次のフィールド・タイプ・ルールが適用されます。

フィールド・タイプ

評価ルール

テキスト

50より小さい

ロング・テキスト

50以上かつMinMemoFieldSizeより小さい

メモ

MinMemoFieldSize以上

使用方法

- 第2.9項「データベース」

- 第2.13項「フィールド表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

MinMemoFieldSize=300

関連項目

- MemoFieldSize

MinorRevSeq

リビジョン番号のマイナー・シーケンスを定義します。

マイナー・リビジョンのラベル・シーケンスを返します(構成設定の値を返します)。

文字列を返します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- 「システム・プロパティ」、「オプション」タブ、「マイナー・リビジョンのラベル・シーケンス」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「マイナー・リビジョンのラベル・シーケンス」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

MinorRevSeq=a-c

スクリプトとして、構成設定の値を返します。

<$MinorRevSeq$>

関連項目

- MajorRevSeq

MSPubexePath

MS Publisher実行可能ファイルのパスを定義します。

文字列としてパスを返します。

デフォルトは空の文字列です。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

- 「共有Inbound Refineryの構成」画面、「パス」タブ、MS Publisher実行可能ファイルのパス

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

MSPubexePath=c:/Program Files/Microsoft Publisher/mspub.exe

MultiUpload

複数ファイルのアップロード・アプレットを有効にします。

TRUEに設定した場合、アップロード・アプレットが有効になり、複数のファイルを1つのコンテンツ・アイテムとして圧縮してチェックインできるようになります。

FALSEに設定した場合、アップロード・アプレットは無効になります。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.3項「クライアント」

場所

- 「システム・プロパティ」、「オプション」タブ、「アップロード・アプレットを有効にする」

- 「管理」、「管理サーバー」、「一般構成」メニュー・オプション、「アップロード・アプレットを有効にする」

- IntradocDir/config/config.cfg

例

構成設定として、アップロード・アプレットを有効にします。

MultiUpload=true

スクリプトとして、アップロード・アプレットの条件を評価します。

<$MultiUpload$>

関連項目

- DownloadApplet

- UploadApplet

NeverTimeoutForcedConversionsTemplateChange

テンプレートまたはレイアウトが変更された場合、Dynamic Converterがファイルを再変換するかどうかを定義します。

TRUEに設定されている場合、強制変換または事前変換によって変換されたファイルは、テンプレートまたはレイアウトが変更されても再変換されません。

別のテンプレートまたはレイアウトを使用するように変換ルールが変更された場合、通常の評価ロジックが使用されます。

デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

NeverTimeoutForcedConversionsTemplateChange=true

関連項目

- TimeoutChangedTemplateForcedConversionsInMins

- TimeoutMismatchedForcedConversionsInMins

NoAutomation

コンテンツ・サーバーの自動化されているすべてのアクティビティを無効にします。

この設定は、IsAutoArchiver、IsAutoQueueおよびIsAutoSearchの設定より優先されます。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

NoAutomation=true

関連項目

- IsAutoArchiver

- IsAutoQueue

- IsAutoSearch

noInfoColumn

検索結果ページに「情報」列を表示するかどうかを定義します。

TRUEに設定されている場合、標準の検索結果ページに、「コンテンツ情報」ページへのリンクを含む列が表示されます。

FALSEに設定されている場合、標準の検索結果ページに「情報」リンクは表示されません。

デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

- 第2.19.項「ページ表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

noInfoColumn=1

関連項目

- showDocActions

- showSearchResultsCheckoutColumn

- noRevisionsColumn

noRevisionsColumn

検索結果ページに「リビジョン」列を表示するかどうかを定義します。

TRUEに設定されている場合、標準の検索結果ページに、「リビジョン履歴」ページへのリンクを含む列が表示されます。

FALSEに設定されている場合、標準の検索結果ページに「リビジョン履歴」リンクは表示されません。

デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

- 第2.19.項「ページ表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

noRevisionsColumn=1

関連項目

- showDocActions

- showSearchResultsCheckoutColumn

- noInfoColumn

NoSearchConnectionCloseOnDocChange

ドキュメントが変更(挿入、更新または削除)されたときのすべての検索接続の自動終了を無効にします。

注意:
TRUEに設定されている場合、システムの負荷が高いときに、正しい検索結果が得られない可能性があります。

TRUEに設定されている場合、ドキュメントが変更されても、検索接続はオープンしたままです。

デフォルトはFALSEです。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

NoSearchConnectionCloseOnDocChange=true

NotationForRequiredFields

必須メタデータ・フィールドの表示フォーマットを設定します。

設定されている場合、必須フィールドは、メタデータ・フィールドの前に指定されている文字列が付加されて表示されます。

この文字列は、カスケード・スタイル・シートに含まれています。

StyleForRequiredFieldsが定義されている場合、NotationforRequiredFieldsは、StyleForRequiredFieldsで定義されているスタイルでフォーマットされます。

使用方法

- 第2.13項「フィールド表示」

パラメータ

唯一のパラメータは文字列です。

場所

IntradocDir/config/config.cfg

例

必須フィールドの前にアスタリスクを設定する例:

NotationForRequiredFields=*

関連項目

- StyleForRequiredFields

NotificationIntervalInDays

この構成変数は、通知問合せの実行間隔を定義します。通知問合せは、期限切れコンテンツの検索に使用する条件を定義します。

NotificationIntervalInDaysが設定されていない場合、デフォルト値は1日です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

NotificationIntervalInDays=3

関連項目

- EnableExpirationNotifier

- NotificationMaximum

- NotificationQuery

- NotifyExtras

- NotifyTime

NotificationMaximum

この構成変数は、通知問合せから返されるコンテンツ・アイテムの最大数を定義します。通知問合せは、期限切れコンテンツの検索に使用する条件を定義します。

NotificationMaximumが設定されていない場合、デフォルト値は1000です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

NotificationMaximum=500

関連項目

- EnableExpirationNotifier

- NotificationIntervalInDays

- NotificationQuery

- NotifyExtras

- NotifyTime

NotificationQuery

この設定によって、期限切れコンテンツを検索する自動問合せの条件を定義します。

NotificationQueryが設定されていない場合、デフォルト値は、次の7日間で期限が切れるすべてのコンテンツです。

使用方法

- 第2.5項「コンテンツ・アイテム」

パラメータ

使用する問合せがパラメータになります。この問合せには、次のいずれかが使用できます。問合せのサンプルについては、例を参照してください。

- Idoc Scriptから作成されたIdoc Script問合せ。

- URLエンコードによる問合せ。これは、検索を実行したときにWebブラウザのアドレスに表示されるURLを使用します。

- 検索変数を定義するプレーン・テキスト問合せ。

場所

IntradocDir/config/config.cfg

例

Idoc Scriptの例

データベースの索引付けとともに使用した場合、次の問合せでは、7日間のうちに期限が切れるすべてのドキュメントについて電子メールで通知されます。

NotificationQuery=dOutDate < '<$dateCurrent(7)$>'>

URLエンコードによる例

次の問合せでは、2007年8月1日をすぎると期限が切れるすべてのコンテンツが返されます。QueryText部分で始まるブラウザのアドレス行のURLがコピーされます。

NotificationQuery=QueryText=dOutDate+%3C+%608%2F1%2F06%60&SearchProviders= [...}

プレーン・テキスト問合せ

次の問合せでは、2007年8月1日をすぎると期限が切れるすべてのコンテンツが返されます。

NotificationQuery=8/1/07

関連項目

- EnableExpirationNotifier

- NotificationIntervalInDays

- NotificationMaximum

- NotifyExtras

- NotifyTime

NotifyExtras

この構成変数は、期限切れコンテンツのリストを受信する、各コンテンツ・アイテムの作成者以外のユーザーを定義します。通知問合せは、期限切れコンテンツの検索に使用する条件を定義します。

config.cfgファイルでNotifyExtrasが設定されていて、値が定義されていない場合、追加通知は送信されません。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

NotificationExtras=jwilson, nadams

関連項目

- EnableExpirationNotifier

- NotificationIntervalInDays

- NotificationMaximum

- NotificationQuery

- NotifyTime

NotifyTime

この構成変数は、通知問合せを実行する時刻を定義します(24時間表記で指定)。通知問合せは、期限切れコンテンツの検索に使用する条件を定義します。

NotifyTimeが設定されていない場合、デフォルト値は真夜中(00:01)です。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

時刻を午前11時30分に設定する例:

NotifyTime=11:30

時刻を午後1時30分に設定する例:

NotifyTime=13:30

関連項目

- EnableExpirationNotifier

- NotificationIntervalInDays

- NotificationMaximum

- NotificationQuery

- NotifyExtras

NtlmSecurityEnabled

コンテンツ・サーバー・インスタンスのWindowsネットワーク認証を有効にします。

このオプションは、IIS Webサーバーを使用している場合のみ使用可能です。

TRUEに設定されている場合、Windowsネットワーク(NTLM)またはActive Directoryで定義されているユーザーは、自分のネットワーク資格証明を使用して、コンテンツ・サーバー・インスタンスにログインできます。

デフォルトはFALSEです。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「システム・プロパティ」、「インターネット」タブ、「Microsoftセキュリティを使用」

- 「管理」、「管理サーバー」、「インターネットの構成」メニュー・オプション、「Microsoftセキュリティを使用」

- IntradocDir/config/config.cfg

- IntradocDir/data/users/config/filter.hda

例

NTLMセキュリティを有効にする例:

NtlmSecurityEnabled=true

関連項目

- UseNtlm

- UseAdsi

- HasExternalUsers

- IntradocRealm

NumAdditionalRenditions

サムネイル・プログラムによって、コンテンツ・アイテムのレンディションの数を設定するために使用されます。

0に設定されている場合、検索結果ページでサムネイルは作成されません。

1に設定されている場合、検索結果ページでサムネイルは作成されます。

デフォルトは0です。

使用方法

- 第2.5項「コンテンツ・アイテム」

- 第2.8.2.1項「一般変数」

場所

IntradocDir/config/config.cfg

例

useThumbnailsを設定する必要があるかどうかを決定するために使用されている例:

<@dynamichtml searchapi_result_definitions@>
<$if NumAdditionalRenditions and NumAdditionalRenditions > 0$>
<$useThumbnails=1$>
<$endif$>
<@end@>

NumConnections

データベースへのオープン接続の数を設定します。デフォルトは15です。スタンドアロン・アプレットのデフォルトは4です。

この設定は、コンテンツ・サーバー・インスタンスおよび任意のスタンドアロンのアプリケーションとユーティリティに適用されるので、各アプリケーションは指定されている数の接続を使用します。

データベースで一度にオープンできる接続の数が不足している場合、アプリケーションまたはユーティリティを起動しようとすると、エラーが発生します。

この問題を回避するために、次のようにして、コンテンツ・サーバー・インスタンスおよびアプリケーションとユーティリティのそれぞれにNumConnectionsを設定できます。

1. コンテンツ・サーバー・インスタンスのNumConnections設定は、IntradocDir/config/config.cfgファイルではなく、DomainHome/ucm/cs/bin/intradoc.cfgファイルで指定します。

2. DomainHome/ucm/cs/bin/ディレクトリのコピーを作成し、一意の名前(DomainHome/ucm/cs/applet_bin/など)を指定します。

3. 新しいディレクトリにあるintradoc.cfgファイルで、アプリケーションとユーティリティのNumConnectionsの値を設定します(たとえばNumConnections=2)。

4. アプリケーションとユーティリティは新しいディレクトリから実行します(Windowsのスクリプトおよびショートカットを変更します)が、コンテンツ・サーバー・インスタンスは引き続きDomainHome/ucm/cs/bin/ディレクトリから実行します。

必要に応じて、それぞれのアプリケーションとユーティリティに個別にディレクトリを作成して、NumConnectionsを設定できます。

使用方法

- 第2.9項「データベース」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

NumConnections=10

OdbcDateFormat

Content Serverバージョン6.xで使用され、Content Server 7.xアーカイブのインポートに後方互換性を提供します。

Content Server 7.xには、それ以前のバージョンには存在しなかったミリ秒データ・フォーマットが含まれています。6.xのアーカイバが7.xのアーカイブをインポートしようとすると、ミリ秒フィールドが原因でエラーが発生します。

使用方法

- 第2.1項「アーカイバ」

例

このエントリを6.xのconfig.cfgファイルに追加するには:

1. 6.xのconfig.cfgファイルをコピーして別の名前を付けます(バックアップとして保存するため)。

2. テキスト・エディタでconfig.cfgファイルを編集し、次の設定を追加します。

OdbcDateFormat='{ts' "yyyy-MM-dd HH:mm:ss{.SSS}"'}'

3. コンテンツ・サーバー・インスタンスを再起動します。

OpenOfficeListenerPort

OpenOfficeリスナーのソケット・ポートを定義します。

この設定は、次のように、PDF ConverterのOpenOffice接続文字列で使用されます。

uno:socket,host=<OpenOfficeListenerURL>, port=<OpenOfficeListenerPort>;urp;StarOffice.ServiceManager

デフォルトは8100です。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

OpenOfficeListenerPort=8110

関連項目

- OpenOfficeListenerURL

OpenOfficeListenerURL

OpenOfficeリスナーのURL (ソケット・ホスト名)を定義します。

この設定は、次のように、PDF ConverterのOpenOffice接続文字列で使用されます。

uno:socket,host=<OpenOfficeListenerURL>,port=<OpenOfficeListenerPort>;urp; StarOffice.ServiceManager

デフォルトはlocalhostです。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

OpenOfficeListenerURL=/mycomputer/localhost

関連項目

- OpenOfficeListenerPort

OpenOfficePath

OpenOfficeリスナーのパスを定義します。

PDF ConverterがOpenOffice接続に接続できない場合、このパスで定義されているリスナーのオープンを試みます。

デフォルトは空の文字列です。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

OpenOfficePath=C:\Program Files\Open Office.org.1.0.1\program\quickstart.exe

PageMakerExePath

Adobe PageMakerの実行可能ファイルのパスを定義します。

文字列としてパスを返します。

デフォルトは空の文字列です。

使用方法

- 第2.8.2.4項「その他のフォーマット」

場所

- 「共有Inbound Refineryの構成」画面、「パス」タブ、PageMaker実行可能ファイルのパス

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

PageMakerExePath=c:/Program Files/Adobe/PageMaker 6.5/pagemaker.exe

PLUGIN_DEBUG

Webサーバー・プラグイン・フィルタ内部で発生するイベントのロギングを有効にします。

TRUEに設定されている場合、このフラグを認識するプラグイン内部で発生するイベントは、次のログ・ファイルに記録されます。

- Apache: IntradocDir/data/users/authfilter.log

コンテンツ・サーバー・インスタンスでApacheのこの設定を変更する場合、コンテンツ・サーバー・インスタンスのみを再起動する必要があります。

デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

- 第2.27項「Webサーバー」

場所

IntradocDir/data/users/SystemFilters.hda

例

構成エントリとしての使用例:

PLUGIN_DEBUG=true

PostConversionTimeOut

デフォルトの変換後のタイムアウトを定義します。

変換後のタイムアウト値を返します。

この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、変換後処理の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は1です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound Refineryが任意の変換後プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は10秒です。

#min

Inbound Refineryが任意の変換後プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は1秒です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「共有Inbound Refineryの構成」画面、「タイムアウト値」タブ、PDF作成後のタイムアウト

- IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

PostConversionTimeOut#factor=1

PostprocessPDFPath

変換後のPDFファイルの処理に使用される実行可能ファイルへのパスを定義します。

コマンド・ライン・パラメータは、PDFファイル・パスのみです。

Win32実行可能ファイルを指定する必要があります。

このプロセスは、PDFへの変換後、PDFの最適化の前に起動されます。このプロセスは、Inbound Refineryによって処理されるファイルごとに1回起動されるので、ファイルの変換に同期する必要がある可能性がある他のイベントにも使用できます。値が空ではない場合、Inbound Refineryはプロセスの実行を試みます。

デフォルトは空の文字列です。

使用方法

- 第2.8.2.1項「一般変数」

場所

- 「ローカルInbound Refineryの構成」画面、「一般」タブ、「PDF作成後のパス」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

PostprocessPDFPath=c:/domain/IdcRefinery/ConversionProcess/IDCWaterPost.exe

PostscriptPrinterName

ファイルをPostScriptに変換するために使用されるプリンタの名前を指定します。

有効なPostScriptプリンタの名前を指定する必要があります。

デフォルトはIDC PDF Converterです。

使用方法

- 第2.8.2.1項「一般変数」

場所

IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

PostscriptPrinterName=Acrobat Distiller

PowerPointPrintOutput

Microsoft PowerPointコンテンツ・アイテムの変換方法を定義します。

slideに設定されている場合、PDFファイルの各ページに1枚のスライドが含まれます。

notesに設定されている場合、PDFファイルの各ページに1枚のスライドとその注釈が含まれます。

handoutに設定されている場合、PDFファイルの各ページに6枚のスライドが含まれます。

デフォルトはslideです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、PowerPointのフォーマットで変換するオプション

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

PowerPointPrintOutput=notes

関連項目

- ProcessPowerpointHyperlinks

PreconversionPath

変換前のファイルの処理に使用される実行可能ファイルへのパスを定義します。

Win32実行可能ファイルを指定する必要があります。

デフォルトは空の文字列です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「ローカルInbound Refineryの構成」画面、「レガシー 変換」タブ、「事前変換パス」

- DomainHome/urm/ibr/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

PreconversionPath=c:/out/preconversion.bat

PreconversionWaitTime

事前変換タイムアウトを定義します。

事前変換タイムアウト値を返します。

この変数の後に次のいずれかのフラグを指定する必要があります。

フラグ

説明

#factor

この値にファイル・サイズを乗じて、事前変換処理の許容時間を決定します。(計算された時間は、#maxフラグと#minフラグで制限されます。)デフォルト値は1です。ビジーまたは処理の遅いシステムでは、この値を増やします。

#max

Inbound Refineryが事前変換プロセスの完了を待機する最長時間を指定します(秒単位)。デフォルト時間は10秒です。

#min

Inbound Refineryが事前変換プロセスの完了を待機する最短時間を指定します(秒単位)。デフォルト時間は1秒です。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

- 「ローカルInbound Refineryの構成」画面、「レガシー 変換」タブ、「プレコンバータのタイムアウト」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

PreconversionWaitTime#max=60

PreviewOutputExtension

HTMLプレビューで使用される、コンテンツ・パブリッシャから出力されるファイル拡張子を定義します。

デフォルトはHCSPです。

使用方法

- 第2.15項「HTMLプレビュー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

PreviewOutputExtension=jsp

PreviewPath

HTMLプレビューの実行可能ファイルのパスを定義します。

tcpreview.exeファイルは、コンテンツ・パブリッシャのインストール・ディレクトリに格納されています。

使用方法

- 第2.15項「HTMLプレビュー」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

PreviewPath=C:/Program Files/Oracle Content Publisher/tcpreview.exe

PrimaryWorkQueueTimeout

ワークフローおよびサブスクリプションの通知電子メールが送信されるまでの秒数を設定します。

電子メールを遅らせる必要がない場合またはデバッグ中に速やかなレスポンスが必要な場合、小さい数に設定します。小さい数が指定されている場合、大量のリソースが使用される可能性があることに注意してください。

コンテンツ・サーバーの電子メール・メッセージのバッファは20000バイトです。大量のサブスクリプション通知電子メールが短時間でトリガーされた場合(たとえば、40個のコンテンツ・アイテムにそれぞれ40人のサブスクライバが存在する場合)、バッファがオーバーロードになる可能性があり、通知電子メールは送信されません。コンテンツ・サーバー・エラー・メッセージ「ワーク・キュー・エラーです。: ワーク・キューの照合中にエラーが発生しました。(キュー'CollatedWorkQueue'に追加するメッセージが大きすぎます。)」は、バッファがオーバーロードの状態になったことを示しています。

サブスクリプション通知電子メールの合計サイズの制限は1GBです。nユーザーに送信される1つの電子メールに含めることができる、サブスクリプション通知電子メールの合計数は、1GBをサブスクリプション通知電子メールのサイズで除算した数となります。

デフォルトは600 (10分)です。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

PrimaryWorkQueueTimeout=30

PrinterPortPath

Inbound Refineryによって作成されるPostScriptファイルの場所を定義します。

この設定は、Inbound Refineryによって使用されるプリンタのポート設定と一致する必要があります。

デフォルト・ポートはc:/temp/idcoutput.psです。

使用方法

- 第2.8.2.1項「一般変数」

場所

IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

PrinterPortPath=c:/temp/idcrefinery/idcoutput.ps

関連項目

- PostscriptPrinterName

Priority

ユーザー資格証明をチェックするLDAPプロバイダの順序を指定します。

この変数は、ユーザーがこれまでコンテンツ・サーバー・インスタンスにログインしたことがない場合にのみ使用されます。ユーザーがこれまでに資格証明をリクエストしたことがある場合、そのユーザーのソース・パスが格納されているので、このソース・パスによって指定されるLDAPプロバイダが使用されます。

コンテンツ・サーバー・インスタンス内の各LDAPプロバイダには一意の優先度番号が必要です。

デフォルトは1です。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「優先度」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

Priority=2

関連項目

- SourcePath

- IsPrimaryUserBase

ProcessExcelUrlHyperlinks

Microsoft Excelコンテンツ・アイテムのURLハイパーリンク処理を有効にします。

- TRUEに設定されている場合、ExcelファイルのURLハイパーリンクは処理されます。

- FALSEに設定されている場合、ExcelファイルのURLハイパーリンクは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「ExcelのURLリンクを処理」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessExcelUrlHyperlinks=true

ProcessInDesignBookMarks

Adobe InDesignコンテンツ・アイテムの内部ドキュメント・リンクの変換を有効にします。

- TRUEに設定されている場合、Adobe InDesignファイルの内部ドキュメント・リンクは処理されます。

- FALSEに設定されている場合、Adobe InDesignファイルの内部ドキュメント・リンクは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.3項「InDesign」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessInDesignBookmarks=false

関連項目

- ProcessInDesignHyperlinks

- ProcessInDesignInternalPDFThumbnail

- ProcessInDesignLinkUpdate

- ProcessInDesignPDFCompatibility50

ProcessInDesignHyperlinks

Adobe InDesignコンテンツ・アイテムのURLリンクの変換を有効にします。

- TRUEに設定されている場合、Adobe InDesignファイルのURLリンクは処理されます。

- FALSEに設定されている場合、Adobe InDesignファイルのURLリンクは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.3項「InDesign」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessInDesignHyperlinks=false

関連項目

- ProcessInDesignBookMarks

- ProcessInDesignInternalPDFThumbnail

- ProcessInDesignLinkUpdate

- ProcessInDesignPDFCompatibility50

ProcessInDesignInternalPDFThumbnail

Adobe InDesignコンテンツ・アイテムを変換する際、PDFページのサムネイルの作成を有効にします。

- TRUEに設定されている場合、PDFファイルにページのサムネイルが含まれます。

- FALSEに設定されている場合、PDFファイルにページのサムネイルは含まれません。

この設定は、検索結果ページのサムネイルの作成には影響しません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.3項「InDesign」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessInDesignInternalPDFThumbnail=false

関連項目

- ProcessInDesignBookMarks

- ProcessInDesignHyperlinks

- ProcessInDesignLinkUpdate

- ProcessInDesignPDFCompatibility50

ProcessInDesignLinkUpdate

Adobe InDesignコンテンツ・アイテムのすべてのリンクの変換前の更新を有効にします。

- TRUEに設定されている場合、Adobe InDesignファイルのリンクは、変換前に更新されます。リンク・オブジェクトが使用可能ではない場合、変換は失敗します。

- FALSEに設定されている場合、Adobe InDesignファイルのリンクは、変換前に更新されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2項「PDF Converter」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessInDesignLinkUpdate=true

関連項目

- ProcessInDesignBookMarks

- ProcessInDesignHyperlinks

- ProcessInDesignInternalPDFThumbnail

- ProcessInDesignPDFCompatibility50

ProcessInDesignPDFCompatibility50

PDF ConverterによってAdobe InDesignコンテンツ・アイテムから作成されるPDFファイルのバージョンを設定します。

- TRUEに設定されている場合、PDF ConverterはAdobe InDesignファイルからPDFバージョン1.4 (Acrobat 5.0互換)のファイルを作成します。

- FALSEに設定されている場合、PDF ConverterはAdobe InDesignファイルからPDFバージョン1.3 (Acrobat 4.0互換)のファイルを作成します。

デフォルトはFALSEです。

使用方法

- 第2.8.2.3項「InDesign」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessInDesignPDFCompatibility50=true

ProcessPowerpointHyperlinks

Microsoft PowerPointコンテンツ・アイテムのハイパーリンク処理を有効にします。

- TRUEに設定され、さらにPowerPointPrintOutput設定がSLIDEに設定されている場合、PowerPointファイルの次のハイパーリンクが処理されます。

- URLリンク

- 次のスライド

- 前のスライド

- FALSEに設定されている場合、PowerPointファイルのハイパーリンクは処理されません。

PowerPointPrintOutputがNOTESまたはHANDOUTに設定されている場合、PowerPointファイルのハイパーリンクは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「PowerPointのハイパーリンクを処理する」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessPowerpointHyperlinks=true

関連項目

- PowerPointPrintOutput

ProcessVisioInternalHyperlinks

Microsoft Visioコンテンツ・アイテムの内部ハイパーリンクの変換を有効にします。

- TRUEに設定されている場合、Visioファイルの内部ハイパーリンクは処理されます。

- FALSEに設定されている場合、Visioファイルの内部ハイパーリンクは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「内部Visioリンクの処理」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessVisioInternalHyperlinks=true

関連項目

- ProcessVisioUrlHyperlinks

ProcessVisioUrlHyperlinks

Microsoft Visioコンテンツ・アイテムのURLリンクの変換を有効にします。

- TRUEに設定されている場合、VisioファイルのURLリンクは処理されます。

- FALSEに設定されている場合、VisioファイルのURLリンクは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.3項「InDesign」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「Visio URLリンクの処理」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessVisioUrlHyperlinks=true

関連項目

- ProcessVisioInternalHyperlinks

ProcessWordBookMarks

Microsoft Wordコンテンツ・アイテムのページ参照ブックマークの変換を有効にします。

- TRUEに設定されている場合、Microsoft Wordファイルのページ参照ブックマークはPDFブックマークに変換されます。(他のすべてのタイプのブックマークは無視されます。)

- FALSEに設定されている場合、Microsoft Wordファイルのブックマークは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「ドキュメントのブックマークを処理」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordBookMarks=false

関連項目

- ProcessWordHyperlinks

ProcessWordComments

Microsoft Wordコンテンツ・アイテムのコメントをPDFの注釈に変換する処理を有効にします。

- TRUEに設定されている場合、Microsoft WordファイルのコメントはPDFの注釈に変換されます。

- FALSEに設定されている場合、Microsoft Wordファイルのコメントは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「ドキュメントのコメントをPDFの注釈に変換」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordComments=true

関連項目

- ProcessWordHyperlinks

ProcessWordEmailLinks

Microsoft Wordコンテンツ・アイテムの電子メール・ハイパーリンクの変換を有効にします。

- この設定が有効になるには、ProcessWordUrlHyperlinks設定がTRUEである必要があります。

- TRUEに設定されている場合、Microsoft Wordファイルの電子メール・ハイパーリンクは処理されます。

- FALSEに設定されている場合、Microsoft Wordファイルの電子メール・ハイパーリンクは処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、mailtoリンクを処理

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordEmailLinks=true

関連項目

- ProcessWordHyperlinks

- ProcessWordUrlHyperlinks

ProcessWordFootEndNote

Microsoft Wordコンテンツ・アイテムの脚注と文末脚注をハイパーリンクに変換する処理を有効にします。

- TRUEに設定されている場合、Microsoft Wordファイルの脚注と文末脚注はハイパーリンクに変換されます。

- FALSEに設定されている場合、Microsoft Wordファイルの脚注と文末脚注は処理されません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「ドキュメントの脚注およびエンドノートへのリンクを処理」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordFootEndNote=true

関連項目

- ProcessWordHyperlinks

ProcessWordHeadings

Microsoft Wordコンテンツ・アイテムの標準見出しをPDFブックマークに変換する処理を有効にします。

- TRUEに設定されている場合、Microsoft Wordファイルの標準見出しの段落スタイル(見出し1から見出し9、およびこれらの標準スタイルに基づくカスタム・スタイル)はPDFブックマークに変換されます。

- 目次がすでにProcessWordToc設定を使用して処理されている場合、この設定は無視され、見出しはブックマークに変換されません。

- FALSEに設定されている場合、Microsoft Wordファイルの見出しスタイルは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「見出しスタイルをPDFブックマークに変換」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordHeadings=false

関連項目

- ProcessWordHyperlinks

- ProcessWordToc

ProcessWordHyperlinks

Microsoft Wordコンテンツ・アイテムのハイパーリンクの変換を有効にします。

- TRUEに設定されている場合、Microsoft Wordファイルのすべてのタイプのハイパーリンクは処理されます。

- FALSEに設定されている場合、Microsoft Wordファイルのハイパーリンクは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordHyperlinks=true

関連項目

- ProcessWordBookMarks

- ProcessWordComments

- ProcessWordEmailLinks

- ProcessWordFootEndNote

- ProcessWordHeadings

- ProcessWordToc

- ProcessWordUrlHyperlinks

ProcessWordToc

Microsoft Wordコンテンツ・アイテムの目次をPDFブックマークに変換する処理を有効にします。

- TRUEに設定されている場合、Microsoft Wordファイルで自動生成される目次エントリはPDFブックマークに変換されます。

- FALSEに設定されている場合、Microsoft Wordファイルの目次は処理されません。(ただし、目次エントリにハイパーリンクが存在する場合、それらはProcessWordUrlHyperlinks設定に従って処理されます。)

デフォルトはFALSEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、「目次をPDFブックマークに変換」

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordToc=true

関連項目

- ProcessWordHyperlinks

- ProcessWordUrlHyperlinks

- ProcessWordHeadings

ProcessWordUrlHyperlinks

Microsoft Wordコンテンツ・アイテムのURLハイパーリンクの変換を有効にします。

- TRUEに設定されている場合、Microsoft WordファイルのURLハイパーリンクは処理されます。

- FALSEに設定されている場合、Microsoft WordファイルのURLハイパーリンクは処理されません。

デフォルトはTRUEです。

使用方法

- 第2.8.2.2項「Microsoft Office」

場所

- 「ローカルInbound Refineryの構成」画面、「ネイティブ・オプション」タブ、URLリンクを処理

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

ProcessWordUrlHyperlinks=false

関連項目

- ProcessWordHyperlinks

ProviderClass

プロバイダを実装するJavaクラスの名前を指定します。

デフォルトは、プロバイダのタイプに応じて異なります。

プロバイダ・タイプ

デフォルト値

Outgoing

intradoc.provider.SocketOutgoingProvider

Database

intradoc.jdbc.JdbcWorkspace

Incoming

intradoc.provider.SocketIncomingProvider

Preview

intradoc.provider.SocketOutgoingProvider

Ldapuser

intradoc.provider.LdapUserProvider

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

- 各プロバイダの追加/編集ページ、「プロバイダ・クラス」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

ProviderConnection=intradoc.provider.SocketOutgoingProvider

ProviderConfig

プロバイダの追加構成を実行するJavaクラスの名前を指定します。

データベース・プロバイダの場合、接続クラスがすでにプロバイダになっており、この設定が最も役立ちます。

デフォルトはありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

- 各プロバイダの追加/編集ページ、「構成クラス」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

ProviderConfig=intradoc.provider.CustomClass

ProviderConnection

プロバイダ接続を実装するJavaクラスの名前を指定します。

デフォルトは、プロバイダのタイプに応じて異なります。

プロバイダ・タイプ

デフォルト値

Outgoing

intradoc.provider.SocketOutgoingConnection

Database

intradoc.jdbc.JdbcConnection

Incoming

intradoc.provider.SocketIncomingConnection

Preview

intradoc.provider.SocketOutgoingConnection

Ldapuser

intradoc.provider.LdapConnection

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

- 各プロバイダの追加/編集ページ、「接続クラス」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

ProviderConnection=intradoc.provider.SocketOutgoingConnection

ProviderCredentialsMap

JpsUserProviderとともに使用する資格証明マップの名前を指定します。

デフォルトはありません。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

- IntradocDir/data/providers/jpsuserprovider/provider.hda

例

構成エントリとしての使用例:次の行をファイル内の@end行より前に追加してください。ファイルの最後は次のようになります。

SourcePath=jpsuser
ProviderClass=idc.provider.jps.JpsUserProvider
ProviderCredentialsMap=name_of_map
@end

ProviderDir

providers/ディレクトリへのパスを定義します。

デフォルトはDomainHome/ucm/cs/data/providers/です。

使用方法

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

ProviderDir=c:/domain/data/providers

ProviderType

プロバイダのタイプを指定します。

使用可能なプロバイダ・タイプは、次のとおりです。

プロバイダ・タイプ

値

Outgoing

outgoing

Database

database

Incoming

incoming

Preview

preview

Ldapuser

ldapuser

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.24.2項「外部セキュリティ」

場所

IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

ProviderType=ldapuser

pucDefaultTime

ポップアップ・カレンダを使用する場合の日付/時間フィールドへの時間の入力方法を指定します。このオプションが設定されていない場合、時刻のデフォルトは、選択されている日付の午前0時です。

これは文字列値であり、次のように設定できます。

- current: クライアント・コンピュータのクロックと等しい時間に設定します。

- システム・ロケートのフォーマットで表された任意の時刻。値が設定されていない場合、0と解釈されます。AM/PMが指定されていない場合、24時間表記を使用していると解釈されます。たとえば、1:15 PM、01:15 PMおよび13:15は、AMおよびPMを指定するシステム・ロケール内で同一として解釈されます。

使用方法

- 第2.20項「ポップアップ・カレンダ」

場所

IntradocDir/config/config.cfg

例

pucDefaultTime=current

pucEnableOnSearch

TRUEに設定されている場合、検索ページでポップアップ・カレンダを使用可能かどうかを指定します。FALSEに設定されている場合、検索ページでポップアップ・カレンダを無効にします。

デフォルトはTRUEです。

使用方法

- 第2.20項「ポップアップ・カレンダ」

場所

IntradocDir/config/config.cfg

例

pucEnableOnSearch=false

pucHideTimeInDateFields

日付フィールドに、日付のみを表示するか、または日付と時間を表示するかを指定します。

- TRUEに設定されている場合、日付フィールドへの時刻表示を無効にして、pucDefaultTimeの設定に関係なく、選択されている日付の真夜中をチェックイン時刻として解析するように、コンテンツ・サーバー・インスタンスに強制します。

- falseに設定されている場合、日付フィールドに時刻を表示します。

デフォルトはFALSEです。

使用方法

- 第2.20項「ポップアップ・カレンダ」

場所

IntradocDir/config/config.cfg

例

pucHideTimeInDateFields=true

関連項目

- pucDefaultTime

pucUseMonthLocale

ポップアップ・カレンダでの月名の表示方法を決定します。

これは文字列値であり、次のように設定できます。

- short: ユーザー・ロケールに基づいて月名を短縮します。たとえば、JanuaryはJan、FebruaryはFeb、というように短縮されます。

- long: ユーザー・ロケールに基づいて完全な月名が表示されます。

デフォルトはlongです。

使用方法

- 第2.20項「ポップアップ・カレンダ」

例

pucUseMonthLocale=short

関連項目

- pucUseWeekdayLocale

pucUseWeekdayLocale

ポップアップ・カレンダでの曜日の表示方法を決定します。

これは文字列値であり、次のように設定できます。

- 1char: 曜日の先頭の1文字を使用します。この値の先頭文字は、数字の1であり、Lの小文字ではないことに注意してください。

- short: 2文字で曜日を表します。

- medium: 標準的な3文字の曜日を使用します。

- long: ユーザー・ロケールに基づいて完全な曜日が表示されます。

デフォルトはlongです。

使用方法

- 第2.20項「ポップアップ・カレンダ」

例

pucUseWeekdayLocale=short

関連項目

- pucUseMonthLocale

pucXOffset

ページ上のポップアップ・カレンダの水平位置を、デフォルト位置からの相対値で指定します(ピクセル単位)。この値は、整数として設定します。デフォルトは0です。

使用方法

- 第2.20項「ポップアップ・カレンダ」

例

pucXOffset=10

関連項目

- pucYOffset

pucYOffset

ページ上のポップアップ・カレンダの垂直位置を、デフォルト位置からの相対値で指定します(ピクセル単位)。この値は、整数として設定します。デフォルトは0です。

使用方法

- 第2.20項「ポップアップ・カレンダ」

例

pucYOffset=10

関連項目

- pucXOffset

pucZIndex

ポップアップ・カレンダ・レイヤーのZ順序のオブジェクト位置を指定します。数値を増やすと、高いページ・レイヤー位置に配置されます。ページで指定されている他のどのz-indexスタイル属性よりも大きい正値を使用すると、カレンダは他の要素に対して常に最前面に表示されます。

この値は整数として指定します。デフォルトは0です。

使用方法

- 第2.20項「ポップアップ・カレンダ」

例

pucZIndex=10

QueueDir

Inbound Refineryキューの作業ディレクトリへのパスを定義します。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

QueueDir=x:/domain_refinery/

RecordsManagementDenyAuthorFreePassOnRMSecurity

コンテンツ・アイテムがACLで制限されているコントリビューション・フォルダ(RW recordsmanagerエイリアス)に置かれている場合、アイテムを削除できる作成者を除いて、ユーザーにはRWアクセス権のみ付与されます。この構成変数がtrueに設定されている場合、作成者は、アイテムの削除を禁止され、RWアクセス権のみに制限されます。

- TRUEに設定されている場合、作成者は、自分が作成したコンテンツの削除を禁止されます。

- FALSEに設定されている場合、作成者は、自分が作成したコンテンツの削除を許可されます。

デフォルトはFALSEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RecordsManagementDenyAuthorFreePassOnRMSecurity=true

RecordsManagementNumberOverwriteOnDelete

破棄アクションに使用するディスク修正パス数を設定します。

デフォルトは2です。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RecordsManagementNumberOverwriteOnDelete=4

RedirectHostsFilter

許可されるリダイレクト・ホストのフィルタを示すために使用されます。現在のホストは、デフォルトでこのフィルタに追加されます。

複数のアドレスはパイプ文字(|)で区切ります。パイプの両側には空白を入れないでください。

ワイルドカードを使用して、アドレスのグループを示します(*は0個以上の文字、?は1個の文字)。

デフォルトはローカル・ホストのURLです。

使用方法

- 第2.24.2項「外部セキュリティ」

- 第2.27項「Webサーバー」

場所

- 「システム・プロパティ」、「サーバー」タブ、「IPアドレス・フィルタ」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

RedirectHostsFilter=*.google.com|www.cnn.com

RequestAuditAdditionalVerboseFieldsList

リクエスト監査トレースがアクティブ化されている場合、冗長トレースとともに使用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、サービス・リクエストの数およびリクエストの実行にかかった時間を計算します。指定されている間隔のサマリーが報告された後、値はリセットされ、次の間隔の累計と平均が再び計算されます。

この構成変数は、リクエストに関する情報をレポートする際に表示される追加フィールドのカンマ区切りリストです。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditAdditionalVerboseFieldsList=xComment,dDocType

関連項目

- RequestAuditIntervalSeconds1

- RequestAuditIntervalSeconds2

- RequestAuditListDepth1

- RequestAuditListDepth2

- RequestAuditSubClassificationField

RequestAuditIntervalSeconds1

リクエスト監査トレースの短い監査間隔を指定するために使用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、サービス・リクエストの数およびリクエストの実行にかかった時間を計算します。指定されている間隔のサマリーが報告された後、値はリセットされ、次の間隔の累計と平均が再び計算されます。

秒単位で値を指定します。

デフォルト値は120秒(2分)です。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditIntervalSeconds1=240

関連項目

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds2

- RequestAuditListDepth1

- RequestAuditListDepth2

- RequestAuditSubClassificationField

RequestAuditIntervalSeconds2

リクエスト監査トレースの長い監査間隔を指定するために使用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、サービス・リクエストの数およびリクエストの実行にかかった時間を計算します。指定されている間隔のサマリーが報告された後、値はリセットされ、次の間隔の累計と平均が再び計算されます。

秒単位で値を指定します。

デフォルト値は3600秒(1時間)です。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditIntervalSeconds2=7200

関連項目

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds1

- RequestAuditListDepth1

- RequestAuditListDepth2

- RequestAuditSubClassificationField

RequestAuditListDepth1

リクエスト監査トレースに表示するサービス数を指定するために使用されます。

この構成変数は、短い監査期間にのみ適用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、サービス・リクエストの数およびリクエストの実行にかかった時間を計算します。

この変数は、ソートされたリクエストのリストから表示するサービス数を指定するために使用されます。リストは、実行にかかった経過時間の降順にソートされています。

デフォルト値は5です。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditListDepth1=7

関連項目

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds1

- RequestAuditIntervalSeconds2

- RequestAuditListDepth2

- RequestAuditSubClassificationField

RequestAuditListDepth2

リクエスト監査トレースに表示するサービス数を指定するために使用されます。

この構成変数は、長い監査期間にのみ適用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、リクエストの数およびリクエストの実行にかかった時間を計算します。

この変数は、表示するサービス数を指定するために使用されます。リストは、実行にかかった経過時間の降順にソートされています。

デフォルト値は20です。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditListDepth2=25

関連項目

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds1

- RequestAuditIntervalSeconds2

- RequestAuditListDepth1

- RequestAuditSubClassificationField

RequestAuditSubClassificationField

内部フィールド(通常は、リクエスト監査リストで名前を識別できるようにサービス名に付加する値が格納されている、ドキュメントのメタデータ・フィールド)を指定するために使用されます。

リクエスト監査トレースは、「システム監査情報」ページに表示されます。このトレースは、2つの異なる時間間隔に対して計算された2つの異なるサマリーを作成します。トレースは、サービス・リクエストの数およびリクエストの実行にかかった時間を計算します。

サービス名では、複数のリクエスト・タイプを適切に分類できない場合があります。このエントリは、エントリ・タイプの識別に役立ちます。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

RequestAuditSubClassificationField=xDepartment

関連項目

- RequestAuditAdditionalVerboseFieldsList

- RequestAuditIntervalSeconds1

- RequestAuditIntervalSeconds2

- RequestAuditListDepth1

- RequestAuditListDepth2

ResultsTitle

検索結果ページのタイトルを定義します。

Webレイアウト・エディタはこの変数を使用して、検索結果ページに名前を付け、そのページの一番上に見出しを表示します。

使用方法

- 第2.19.項「ページ表示」

- 第2.23項「検索」

出力

文字列としてページのタイトルを返します。

例

HDAエントリとして、検索結果ページに次のように名前が付けられます。

@Properties LocalData
ResultsTitle=Content Items
@end

スクリプトとして、定義された名前を返します。

<$if ResultsTitle$>ResultsTitle=<$url(ResultsTitle)$>

RmaAddDocWhereClauseForScreening

Oracle WebCenter Content: Records管理者ロールを持つユーザーが、スクリーニング・ページまたは「凍結情報」ページで、(ACLにより)自分がアクセス権を持たない凍結されたアイテムをスクリーニングできるようにします。

- FALSEに設定されている場合、凍結されたアイテムをスクリーニングできます。

- TRUEに設定されている場合、凍結されたアイテムをスクリーニングできません。

デフォルトはFALSEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaAddDocWhereClauseForScreening=true

RmaAllowKeepOrDestroyMetadataOption

この変数は、「すべてのリビジョンを削除する」、「登録」、「アーカイブ」、「移動」および「転送」の各処理アクションを使用する場合にメタデータを保持または破棄するオプションを有効にします。

- TRUEに設定されている場合、保持/破棄オプションの使用を有効にします。

- FALSEに設定されている場合、このオプションの使用を無効にします。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaAllowKeepOrDestroyMetadataOption=true

RmaEnableFilePlan

この変数は、ファイル・プランのコントリビューション・フォルダ構造の機能を有効にします。

- FALSEに設定されている場合、電子記録管理のためのモデル要件(MoReq2)ファイル・プランで使用されているコントリビューション・フォルダ構造を無効にします。

- TRUEに設定されている場合、MoReq2ファイル・プランで使用されているコントリビューション・フォルダ構造を有効にします。

デフォルトはFALSEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaEnableFilePlan=true

RmaEnableFixedClones

この変数は、コンテンツ・リビジョンのレコード・クローンの作成を許可する修正済クローン機能を有効にします。

- FALSEに設定されている場合、修正済クローン機能は有効になります。

- TRUEに設定されている場合、修正済クローン機能は無効になります。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaEnableFixedClones=false

RmaEnablePostFilterOnScreening

この変数は、スクリーニング結果に対して追加のセキュリティを有効にします。ユーザーがスクリーニング結果リストのアイテムに対して適切なセキュリティ権限を持っていない場合、そのアイテムは非表示になります。

- TRUEに設定されている場合、スクリーニング結果に対するフィルタリングを有効にします。

- FALSEに設定されている場合、スクリーニング結果に対する追加のセキュリティを無効にします。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaEnablePostFilterOnScreening=false

RmaFilePlanVolumePrefixおよびRmaFilePlanVolumeSuffix

これらの変数は、ボリュームのネーミング規則を定義するために使用されます。通常の規則は、prefix+timestamp+suffixです。この変数を使用して、接頭辞と接尾辞を定義します。どちらも定義されていない場合、デフォルトで接頭辞としてvolume_が使用されます。

- RmaFilePlanVolumePrefix=value: 使用される接頭辞をvalueに設定します。

- RmaFilePlanVolumeSuffix=value: 使用される接尾辞をvalueに設定します。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

RmaFixedClonesTitleSuffix

この変数は、修正済クローンのコンテンツ・アイテムに自動的に付加される接尾辞を設定します。

デフォルト: RmaFixedClonesTitleSuffix=fixed_clone

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

RMAHideExternalFieldsFromCheckInUpdate

この変数を使用して、「チェックイン」ページおよび「更新」ページの外部フィールドを非表示にします。

- TRUEに設定されている場合、「チェックイン」ページおよび「更新」ページの外部フィールドが非表示になります。

- FALSEに設定されている場合、「チェックイン」ページおよび「更新」ページの外部フィールドが表示されます。

デフォルトはTRUEです。

この変数を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RMAHideExternalFieldsFromCheckInUpdate=false

RMAHideExternalFieldsFromSearchInfo

「検索」ページおよび「コンテンツ情報」ページの外部フィールドを非表示にするかどうかを指定します。デフォルトはTRUEです。

- TRUEに設定されている場合、「検索」ページおよび「コンテンツ情報」ページの外部フィールドが非表示になります。

- FALSEに設定されている場合、「検索」ページおよび「コンテンツ情報」ページの外部フィールドが表示されます。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RMAHideExternalFieldsFromSearchInfo=false

RmaNotifyDispReviewerAndCatAuthor

処理ルールによってイベントがトリガーされたときに通知を受信するユーザーを制御します。

- TRUEに設定されている場合、指定されている通知レビューアおよび最初のカテゴリ作成者の両方がイベントの電子メール通知を受信します。

- FALSEに設定されている場合、カテゴリ作成者のみが電子メールを受信します。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaNotifyDispReviewerAndCatAuthor=false

RmaNotifyReviewerAndAlternateReviewer

代替ユーザーがレビュー・アクションを実行し、割り当てられている処理イベントを処理できるかどうかを制御します。

- TRUEに設定されている場合、元のユーザーおよび代替レビューアの両方がアクションに関する電子メール通知を受信します。

- FALSEに設定されている場合、代替レビューアのみが電子メールを受信します。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

RmaNotifyReviewerAndAlternateReviewer=false

rule:IsFragmentOnly

特定の強制変換ルールによってDynamic Converterにフラグメントが作成されることを指定します。

フラグメントとは、別のコンテンツ・アイテムに含まれるコンテンツの一部分です。通常、フラグメントには<HTML>タグや<BODY>タグは含まれておらず、単独で表示されることを目的としていません。

この変数が1に設定されている場合、指定されている強制変換ルールによりファイルがフラグメントに変換されます。

指定されている強制変換ルールは、ForcedConversionRules設定で指定されている必要があります。

デフォルトはありません。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

RuleA強制変換ルールによりファイルがフラグメントに変換されることを指定する例:

RuleA:IsFragmentOnly=1
ForcedConversionRules=RuleA

関連項目

- ForcedConversionRules

SceUseNativeInDataFeeds

SESCrawlerExportコンポーネントは、その内部インデクサからRSSフィードを生成します。SceUseNativeInDataFeedsは、SESCrawlerExportコンポーネントが索引の作成用にWeb表示可能ファイルまたはネイティブ・ファイルを選択できるようにします。

- TRUEに設定されている場合、ネイティブ・ファイルがRSSフィードで索引付けされます。

- FALSEに設定されている場合、Web表示可能ファイルがRSSフィードで索引付けされます。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

ネイティブ・ファイルがRSSフィードで索引付けされることを指定します。

SceUseNativeInDataFeeds=true

SchemaAllowRecursiveFileMove

TRUEに設定されている場合、スキーマをパブリッシュする場所から本番の場所に、UNIXシステム上のファイルを個別に移動する機能を有効にします。これにより、スキーマ・ディレクトリをその本番ディレクトリにスワップできます。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaAllowRecursiveFileMove=true

SchemaBuildDigestFile

TRUEに設定されている場合、パブリッシュされたすべてのファイルのダイジェストが含まれるファイルが作成されます。これがTRUEに設定されている場合、スキーマのパブリッシュに必要な時間が長くなります。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaBuildDigestFile=true

関連項目

- SchemaPublishCheckInterval

SchemaPublishCheckInterval

非サブジェクトドリブンのスキーマ・パブリッシュ・リクエストをチェックする間隔を設定します。

これは、IntradocDir/data/schema/publishlock/publish.datファイルがアクセスされた場合にトリガーされます。

秒単位で値を指定します。

デフォルトは120秒(2分)です。

スキーマ管理されている表のデータを変更し、IntradocDir/data/schema/publishlock/publish.datファイルにアクセスする外部プログラムが存在する場合は、この設定を変更します。

開発サーバーでは、パブリッシュに時間がかからないように小さい値を使用します(たとえばSchemaPublishCheckInterval=2)。

本番サーバーでデフォルト値に小さい数を設定すると、パフォーマンスの問題が発生する可能性があります。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

この間隔に10分を設定する例:

SchemaPublishCheckInterval=600

SchemaPublishInterval

正当な理由のないスキーマ操作(すなわちイベントによって発生する以外の操作)の間隔。

この値は、秒単位で指定します。

デフォルトは14400 (4時間)です。

SchemaPublisherは、通常、この間隔内に少なくとも1回パブリッシュします。

開発サーバーでは、パブリッシュに時間がかからないように小さい値を使用します(たとえばSchemaPublishInterval=30)。

本番サーバーでデフォルト値に小さい数を設定すると、パフォーマンスの問題が発生する可能性があります。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

この間隔に1週間を設定する例:

SchemaPublishInterval=604800

SchemaPublishMaximumInterval

自動スキーマ・パブリッシュ・サイクル間の最長時間。

この値は、秒単位で指定します。

デフォルトは86400 (1日)です。

開発サーバーでは、パブリッシュに時間がかからないように小さい値を設定します(たとえばSchemaPublishMaximumInterval=30)。

本番サーバーでデフォルト値に小さい数を設定すると、パフォーマンスの問題が発生する可能性があります。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

この値に4時間を指定する例:

SchemaPublishMaximumInterval=14400

SchemaPublishMinimumInterval

自動スキーマ・パブリッシュ・サイクル間の最短時間。

この値は、秒単位で指定します。

デフォルトは4秒です。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaPublishMinimumInterval=8

SchemaPublishRenameRetryInitialInterval

名前変更操作を再試行するまでの遅延時間を指定します。

名前変更操作には、schemaディレクトリの名前をschema.oldに変更するか、またはschema.workディレクトリの名前をschemaに変更する操作が含まれます。

再試行に失敗した後は、遅延時間値が2倍になります。

SchemaPublishRenameRetryIterationsに達した場合、パブリッシュ操作は失敗します。

値はミリ秒単位で指定します。

デフォルト値は、100ミリ秒です。

この影響を受けるのは、Windowsシステム上の動作のみです。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaPublishRenameRetryInitialInterval=50

関連項目

- SchemaPublishRenameRetryIterations

SchemaPublishRenameRetryIterations

名前変更操作の再試行回数を指定します。

この影響を受けるのは、Windowsシステム上の操作のみです。

この操作には、schemaディレクトリの名前をschema.oldに変更するか、またはschema.workディレクトリの名前をschemaに変更する操作が含まれます。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaPublishRenameRetryIterations=6

関連項目

- SchemaPublishRenameRetryInitialInterval

SchemaPublishRetryInterval

SchemaPublisherがスキーマのパブリッシュに失敗した後の遅延時間を指定します。

この遅延時間により、SchemaPublisherの開始と失敗が連続することを防ぎます。

再試行に失敗した後、この値は2倍になりますが、SchemaPublishRetryIntervalMaxの値より大きくなることはありません。

パブリッシュが成功した場合、値は初期値にリセットされます。

デフォルト値は3秒です。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaPublishRetryInterval=4

関連項目

- SchemaPublishRetryIntervalMax

SchemaPublishRetryIntervalMax

SchemaPublishRetryIntervalの最長時間を指定します。

この値は、秒単位で指定します。

デフォルト値は300 (5分)です。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaPublishRetryIntervalMax=120

関連項目

- SchemaPublishRetryInterval

SchemaVerifyPublishing

TRUEに設定されている場合、SchemaPublisherが作成するファイルを、最後に名前を変更する前に、ダイジェストを使用して検証します。

SchemaVerifyPublishing=TRUEが設定されている場合、スキーマのパブリッシュにかかる時間が長くなります。

本番サーバーでは、TRUEに設定する必要があります。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaVerifyPublishing=true

関連項目

- SchemaBuildDigestFile

- SchemaPublishCheckInterval

SchemaWin32RenameDelayInterval

名前を変更する前にファイルを閉じる前の遅延サイズを指定します。

この影響を受けるのは、Windowsシステム上の動作のみです。

できるかぎり小さい数値に調整します。

この値はミリ秒単位で指定します。

デフォルト値は、10ミリ秒です。

使用方法

- 第2.22項「スキーマ」

場所

IntradocDir/config/config.cfg

例

SchemaWin32RenameDelayInterval=4

SctAutoTruncateDataStrings

Content Trackerの削減プロセスでデータ文字列を対応する表列に収まるように切り捨てることを指定します。

デフォルトはFALSEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctAutoTruncateDataStrings=true

SctComponentDir

Content Trackerがインストールされているディレクトリへのパスを指定します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctComponentDir=DomainHome/ucm/cs/data/contenttracker/

SctDebugLogEnabled

Content TrackerのJavaコード実行トレースを使用することを指定します。

TRUEに設定されている場合、Content TrackerのJavaコード実行トレースを有効にします。SctDebugLogFilePathとともに使用されます。

デフォルトはFALSEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctDebugLogEnabled=true

関連項目

SctDebugLogFilePath

SctDebugLogFilePath

Content TrackerのJavaコード実行トレースのディレクトリを指定します。SctDebugLogEnabledとともに使用されます。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

DomainHome/ucm/cs/data/contenttracker/log/SCT_DEBUG_TRACE.log

関連項目

SctDebugLogEnabled

SctDebugServiceBinderDumpEnabled

Content Trackerサービス・ハンドラ・フィルタがサービスDataBinderオブジェクトをダンプ・ファイルに書き込むかどうかを制御します。これらのファイルは、拡張されたサービス・ロギング用のフィールド・マップ・セットを開発する際の診断ツールとして使用できます。

- FALSEに設定されている場合、Content Trackerサービス・ハンドラ・フィルタはDataBinderオブジェクトをダンプ・ファイルに書き込めません。

- TRUEに設定されている場合、DataBinderオブジェクトをダンプ・ファイルに書き込むように、Content Trackerサービス・ハンドラ・フィルタを構成します。ダンプ・ファイルを使用して、特定のサービス・イベントが記録されるときに使用可能なデータを参照します。

デフォルトはFALSEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctDebugServiceBinderDumpEnabled=true

SctDoNotArchive

大容量の本番環境で使用する場合にContent Trackerができるかぎり効率よく機能するように、パフォーマンスの最適化を指定します。Content Trackerでは、コンテンツ・アクセス・イベントのデータのみが収集および記録されます。この処理では、検索などのコンテンツ・アクセス・イベント以外での情報収集や、ユーザー・プロファイルの概要の収集および統合は除外されます。

- TRUEに設定されている場合、Content Trackerは、データベース表に最新のデータのみが格納され、期限切れの表行はアーカイブされずに破棄されることを保証します。これは、Content Trackerのすべてのデータベース表に適用されます。
デフォルトでは、SctAccessLog表のみ移入され、期限切れの行はアーカイブされません。ただし、SctTrackContentAccessOnlyとSctDoNotArchiveの両方を無効にすると、すべての表が移入され、期限切れデータがアーカイブされます。

- FALSEに設定されている場合、Content Trackerのデータベース表には、記録されるすべてのデータが格納され、期限切れの表行は破棄されません。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctDoNotArchive=true

SctDoNotPopulateAccessLogColumns

Content TrackerがSctAccessLog表に移入しない列のリストを指定します。この変数は、大容量の本番環境で使用する場合にContent Trackerができるかぎり効率よく機能するためのパフォーマンスの最適化をサポートします。Content Trackerでは、コンテンツ・アクセス・イベントのデータのみが収集および記録されます。この処理では、検索などのコンテンツ・アクセス・イベント以外での情報収集や、ユーザー・プロファイルの概要の収集および統合は除外されます。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctDoNotPopulateAccessLogColumns=SctParentSequence,c_ip,cs_username

SctExternalUserLogEnabled

Content Trackerが外部ユーザー・ログインを監視し、そのロールおよびアカウントの情報をUserSecurityAttributes表に自動的に伝播するかどうかを指定します。これらの認証済ユーザーは、ユーザー・ロールおよびアカウントに基づいて権限を与えられています。

SctExternalUserLogEnabled構成変数が有効か無効かに関係なく、外部ユーザーのコンテンツ・アイテム・アクセス情報はすべて追跡されて記録されます。ただし、この変数が有効な場合、外部で認証されたユーザー名とそれに関連付けられたユーザー・ロールおよびアカウントとの相関関係を明示的に示すレポートに、このデータが含められることが保証されます。具体的には、「ユーザー・ロール別上位アクセス・コンテンツ・アイテム」レポートおよび「ユーザー・ロール別ユーザー」レポートに、外部ユーザーによるすべてのコンテンツ・アイテム・アクセス・アクティビティが含められます。

- FALSEに設定されている場合、外部ユーザー・アカウントおよびロールの情報のUserSecurityAttributes表へのレプリケーションは無効です。

- TRUEに設定されている場合、外部ユーザー・アカウントおよびロールの情報のUserSecurityAttributes表へのレプリケーションは有効です。

デフォルトはTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctExternalUserLogEnabled=true

SctFilterPluginLogDir

フィルタ・プラグインによりContent Trackerのイベント・ログが格納されるディレクトリへのパスを指定します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

DomainHome/ucm/cs/data/contenttracker/data/

SctIgnoreDirectories

リストされているディレクトリ・ノード内に含まれるURLを無視するようにフィルタ・プラグインに指示します。

デフォルトはDomainHome/ucm/cs/resources/;DomainHome/ucm/cs/common/です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctIgnoreFileTypes

リストされているファイル・タイプを持つURLを無視するようにフィルタ・プラグインに指示します。この値は、ファイル・タイプのカンマ区切りリストです。

デフォルトはgif,jps,js,cssです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctIgnoreFileTypes=gif,jps

SctLogDir

Content Trackerが、sctLogなどのRAWイベント・ログを探す1つ以上のディレクトリへのパスを指定します。パスには、セミコロンで区切られた複数の値を指定できます。たとえば、directory1;directory2;...;directorynのように指定します。

デフォルトはDomainHome/ucm/cs/data/contenttracker/data/です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctLogEnabled

サービス・ハンドラ・フィルタおよびWebサーバー・フィルタ・プラグインが、すべてのイベントを追跡し、イベント・ログを作成することを指定します。これは、Content Trackerマスターのオン/オフのスイッチです。

- TRUEに設定されている場合、サービス・ハンドラ・フィルタおよびWebサーバー・フィルタ・プラグインは、すべてのイベントを追跡し、イベント・ログを作成します。

- FALSEに設定されている場合、サービス・ハンドラ・フィルタおよびWebサーバー・フィルタ・プラグインは、すべてのイベントを無視してログを作成しません。

デフォルトはTRUEです。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctLogSecurity

フィルタ・プラグインがIMMEDIATE_RESPONSE_PAGEイベントをsctSecurityLogに記録し、削減プロセスがこのイベント・ログを読み取ることを指定します。

- TRUEに設定されている場合、フィルタ・プラグインがIMMEDIATE_RESPONSE_PAGEイベントをsctSecurityLogに記録し、削減プロセスがこのイベント・ログを読み取ります。

- FALSEに設定されている場合、フィルタ・プラグインはIMMEDIATE_RESPONSE_PAGEイベントをsctSecurityLogに記録せず、削減プロセスがこのイベント・ログを読み取りません。

デフォルトはTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctLogSecurity=true

SctMaxRecentCount

削減済のデータが「最新」状態として保持される最大日数を指定します。「最新」からオーバーフローしたデータは「アーカイブ」状態に移行します。

デフォルトは60です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctMaxRecentCount=3

SctMaxRereadTime

特定のユーザーが特定のコンテンツ・アイテム(PDFファイルなど)を連続して参照したとき、連続する参照が持続する1回のアクセスとみなされる最大間隔(秒単位)を指定します。連続する参照の時間間隔がこの値より大きい場合、別々のアクセスとしてカウントされます。

デフォルトは3600です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctMaxRereadTime=4200

SctReductionAvailableDatesLookback

SctReductionRequireEventLogsとともに使用され、Content Trackerのイベント・ログの使用可能な日付範囲を制限します。単位は日数です。ゼロは無制限を表します。

デフォルトは0です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctReductionAvailableDatesLookback=10

SctReductionLogDir

Content Tracker削減ログが格納されるディレクトリへのパスを指定します。

デフォルトはDomainHome/ucm/cs/data/contenttracker/log/です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctReductionRequireEventLogs

Content Trackerが、イベント・ログと関連して、削減を実行することを指定します。添付解除された構成で使用されます。

- TRUEに設定されている場合、Content Trackerはイベント・ログが見つかった場合のみ削減を実行します。

- FALSEに設定されている場合、Content Trackerはイベント・ログが見つからなくても削減を実行します。

デフォルトはTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctReductionRequireEventLogs=false

SctrEnableSecurityCheck

Content Trackerレポートでセキュア・モードまたは非セキュア・モードのどちらかのセキュリティ・モードを使用することを指定します。セキュリティ・チェック・プリファレンスには、個々のユーザー・ロールおよびアカウント情報を使用して、レポート結果におけるコンテンツ・アイテム情報の表示を制限するためのオプションがあります。このオプションを使用して、ユーザーが生成されるレポートに表示できるコンテンツ・アイテム(およびメタデータ)を制御できます。ユーザーがコンテンツ・サーバー検索で見つけられない情報はContent Trackerレポートでも表示されないようにすることが理想的です。

- TRUEに設定されている場合、生成されるレポートの情報は、ユーザーのロールおよびアカウント権限に基づいてフィルタ処理されます(セキュア・モード)。
コンテンツ・サーバーのインスタンスに対してアクセス制御リスト(ACL)が有効化されている場合、Content Trackerレポートのセキュア・モード・オプションは機能しません。ACLベースのシステムでは、セキュア・モードが無効になっている必要があります。この場合、システム管理者以外のユーザーに、本来はアクセスと表示の権限を付与していないコンテンツ・アイテムの情報が表示される可能性があります。

- FALSEに設定されている場合、生成されるレポートの情報は、コンテンツ・サーバー検索で表示できる情報と同じです。

デフォルトはFALSEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctrEnableSecurityCheck=true

SctScheduledReductionEnable

Content Trackerのデータ削減を実行するコンテンツ・サーバー・インスタンスを選択します。複数JVM構成で使用されます。

- TRUEに設定されている場合、所有しているコンテンツ・サーバー・インスタンスがデータ削減を実行します。

- FALSEに設定されている場合、所有しているコンテンツ・サーバー・インスタンスはデータ削減を実行しません。

デフォルトはTRUEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctScheduledReductionEnable=false

SctSimplifyUserAgents

大容量の本番環境で使用する場合にContent Trackerができるかぎり効率よく機能するように、パフォーマンスの最適化を指定します。Content Trackerでは、コンテンツ・アクセス・イベントのデータのみが収集および記録されます。この処理では、検索などのコンテンツ・アクセス・イベント以外での情報収集や、ユーザー・プロファイルの概要の収集および統合は除外されます。

- TRUEに設定されている場合、Content Trackerは、SctAccessLog表のcs_userAgent列に格納する情報を最小化します。

- FALSEに設定されている場合、Content Trackerは、SctAccessLog表のcs_userAgent列に格納する情報を最小化しません。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctSimplifyUserAgents=true

SctSnapshotEnable

Content Trackerのスナップショット機能を有効にします。

- TRUEに設定されている場合、スナップショット機能は有効です。これは、データ・エンジン・コントロール・センターから設定します。

- FALSEに設定されている場合、スナップショット機能は無効です。

デフォルトはFALSEです。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotLastAccessEnable

Content Trackerの最終アクセス日付のスナップショット機能を有効または無効にします。

- TRUEに設定されている場合、最終アクセス日付のスナップショット機能は有効です。これは、データ・エンジン・コントロール・センターから設定します。

- FALSEに設定されている場合、この機能は無効です。

デフォルトはFALSEです。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotLastAccessField

Content Trackerの最終アクセス日付のメタデータ・フィールド名(xLastAcccessDate)を指定します。

デフォルトは「なし」です。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotLongCountEnable

Content Trackerの長期間のアクセス・カウントのスナップショット機能を有効または無効にします。

- TRUEに設定されている場合、長期間のアクセス・カウントのスナップショット機能は有効です。これは、データ・エンジン・コントロール・センターから設定します。

- FALSEに設定されている場合、この機能は無効です。

デフォルトはFALSEです。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotLongCountField

Content Trackerの長期間のカウントのメタデータ・フィールド名(xAccessesInLast90Days)を指定します。このフィールド名は、データ・エンジン・コントロール・センターから設定します。

デフォルトは「なし」です。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotLongCountInterval

Content Trackerの長期間のカウント(xAccessesInLast90Days)を行う日数を指定します。この値は、データ・エンジン・コントロール・センターから設定します。

デフォルトは「なし」です。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotShortCountEnable

Content Trackerの短期間のアクセス・カウントのスナップショット機能を有効または無効にします。これは、データ・エンジン・コントロール・センターから設定します。

- TRUEに設定されている場合、短期間のアクセス・カウントのスナップショット機能は有効です。

- FALSEに設定されている場合、この機能は無効です。

デフォルトはFALSEです。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotShortCountField

Content Trackerの短期間のカウントのメタデータ・フィールド名(xAccessesInLast10Days)を指定します。データ・エンジン・コントロール・センターから設定します。

デフォルトは「なし」です。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctSnapshotShortCountInterval

Content Trackerの短期間のカウント(xAccessesInLast10Days)を行う日数を指定します。データ・エンジン・コントロール・センターから設定します。

デフォルトは「なし」です。

重要:
この変数は、Content Trackerの管理アプレット(「データ・エンジン・コントロール・センター」)を使用して設定する必要があります。この管理アプレットには、コンテンツ・サーバー・インタフェースからアクセスします。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

SctTrackContentAccessOnly

大容量の本番環境で使用する場合にContent Trackerができるかぎり効率よく機能するように、パフォーマンスの最適化を指定します。Content Trackerでは、コンテンツ・アクセス・イベントのデータのみが収集および記録されます。この処理では、検索などのコンテンツ・アクセス・イベント以外での情報収集や、ユーザー・プロファイルの概要の収集および統合は除外されます。

有効な場合、コンテンツ・アクセス・イベントのみが記録されます。これがデフォルトです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctTrackContentAccessOnly=true

SctUseGMT

記録されるイベント時刻を協定世界時に変換するように、Content Trackerを設定します。

- TRUEに設定されている場合、記録されるイベント時刻は協定世界時に変換されます。

- FALSEに設定されている場合、記録されるイベント時刻には現地時間を使用します。

デフォルトはFALSEです。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- コンポーネントの構成ファイル(IntradocDir/data/components/ContentTracker/config.cfg)を変更します。

- 拡張コンポーネント・マネージャを使用してコンポーネント構成を更新します。

使用方法

- 第2.4項「Content Tracker」

場所

DomainHome/ucm/cs/data/contenttracker/config/sct.cfg

例

構成エントリとしての使用例:

SctUseGMT=true

SearchCacheCleanerInterval

検索キャッシュのクリーンアップの試行間隔を設定します。

デフォルトは120 (2分)です。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

SearchCacheCleanerInterval=60

SearchCacheMaxItemAgeInMinutes

検索キャッシュ内のアイテムの最長保存期間を設定します(分単位)。

デフォルトは240 (4時間)です。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

SearchCacheMaxItemAgeInMinutes=30

SearchDebugLevel

インデクサのログ・ファイルのエントリの詳細レベルを定義します。

ログ・ファイルは/weblayout/groups/secure/logs/にあります。

次に、デバッグ・レベルのリストを示します。

レベル

説明

none

ログを生成しない。これがデフォルトです。

verbose

アクセスされた各ファイルの情報を表示。「索引付け」、「無視」または「失敗」が示され、完全なレポートが生成されます。

debug

機能レベルで追加情報を生成。

trace

各アクティビティが実行されたときの情報を記録。

all

デバッグ情報、トレース情報および冗長情報を含む完全なレポートを生成。

ヒント:
none以外のデバッグ・レベルに設定する場合、ログ・ファイルは、索引作成サイクルごとに生成されます。場合によっては、ログ・ファイルの数を減らすために、定期的にシステム・メンテナンスを実行する必要があります。

使用方法

- 第2.11項「デバッグ」

- 第2.23項「検索」

場所

- 「リポジトリ・マネージャ」、「インデクサ」タブ、「構成」、「インデクサのデバッグ・レベル」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SearchDebugLevel=all

SearchDir

searchディレクトリへのパスを定義します。

デフォルト値はDomainHome/ucm/cs/search/です。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.23項「検索」

場所

DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

SearchDir=f:/search/

SearchIndexerEngineName

この変数は、使用する検索エンジンの名前を指定します。サポートされる値は次のとおりです。

- DATABASE

- DATABASEFULLTEXT

各検索エンジンは、問合せ文字列に独自のフォーマットを使用します。デフォルトでは汎用問合せ構文が使用されますが、データベース検索にはSQL構文を使用する必要があります。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

SearchIndexerEngineName=DATABASE

SearchQueryFormat

サポートされている検索エンジンに関係なく認識される問合せ構文を使用して、検索問合せページを取得します。

動的に使用する場合、URLに次の文字列を追加します。

SearchQueryFormat=Universal

動的に使用する場合、汎用検索構文は、1回の検索セッション中ずっと維持されます。この構文は、問合せページ、結果ページおよびそのナビゲーション・リンクで維持され、さらにページ内検索または問合せ保存などのアクションの実行中も維持されます。これは、ユーザーがメニュー選択項目をクリックして、検索問合せページを再ロードするまで維持されます。

汎用検索問合せページが常に使用されるように、これをconfig.cfgファイルに追加することもできます。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SearchQueryFormat=Universal

関連項目

- UniversalSearchAllowFullText

SearchQueryTrace

この変数は廃止されています。

デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SearchQueryTrace=true

SecondaryConversionStepName

ネイティブステップの変換ステップが失敗した場合、Inbound Refineryが使用するバックアップ変換ステップの名前を定義します。

デフォルトはOIXConverter (Outside In)です。

AllowSecondaryConversionがTRUEに設定されている必要があります。

使用方法

- 第2.8.1項「Inbound Refinery」

場所

IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

SecondaryConversionStepName=OIXConverter

関連項目

- AllowSecondaryConversion

SelfRegisteredAccounts

自己登録ユーザーに指定されるデフォルトのアカウントと権限を定義します。

これはカンマ区切りリストです。

アカウント別の権限を、アカウント名の後にカッコに入れて指定する必要があります。

#noneエントリは、アカウントが割り当てられていないコンテンツ・アイテムに権限を付与します。#allエントリでは、すべてのアカウントに権限が与えられます。

デフォルト値はありません。

文字列としてアカウントのリストを返します。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

SelfRegisteredAccounts=#none(RWDA),USERS/<$NewUser$>,BOS(R)

スクリプトとして、文字列として定義済アカウント情報を返します。

<$SelfRegisteredAccounts$>

関連項目

- SelfRegisteredAccounts

SelfRegisteredRoles

自己登録ユーザーに指定されるデフォルトのロールを定義します。

これはカンマ区切りリストです。

デフォルト値はありません。

文字列としてロールを返します。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成設定の使用例:

SelfRegisteredRoles=guest,salesRole

スクリプトとして、文字列として定義済ロールを返します。

<$SelfRegisteredRoles$>

関連項目

- SelfRegisteredRoles

ServiceStartupTimeout

コンテンツ・サーバー起動のタイムアウト値を設定します。この構成設定は、Microsoft Windowsプラットフォーム上で動作するコンテンツ・サーバー・インスタンスにのみ適用されます。

コンテンツ・サーバーの起動タイムアウト値のデフォルトは120秒(2分)ですが、サービスの起動にそれより長い時間が必要な場合に、サーバーの起動タイムアウト値を変更するために使用されます。

値は秒単位で指定される必要があります。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

次の例は、起動タイムアウト値を240秒(4分)に設定します。

ServiceStartupTimeout=240

ShowContentForStorageBrowse

物理コンテンツ・マネージャ(PCM)のストレージ場所を参照する際、コンテンツ・アイテムが表示されるかどうかを定義します。

- TRUEに設定されている場合、コンテンツ・アイテムの表示が許可されます。ストレージ場所に大量のアイテム(1つの場所当たり100以上)が存在する場合、表示に時間がかかる可能性があります。

- FALSEに設定されている場合、コンテンツ・アイテムはストレージ場所では非表示になります。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

ShowContentForStorageBrowse=false

ShowCreateExternalMenu

このコンテンツ・サーバー構成変数は、Oracle WebCenter Content: Recordsシステムに固有です。この変数がtrueに設定されている場合、インタフェースに次に示す外部ソース作成機能が表示されます。

- 「外部コンテンツ」の「external_source_name」サブメニューの「external_source_nameアイテムの作成」オプション。「外部コンテンツ」メニューは、外部ソースが作成されている場合のみ表示されます。

- 「保存カテゴリ内を検索中」ページの「アクション」メニューの「external_source_nameレコードの作成」オプション(レコード・カテゴリ)または「新規external_source_nameアイテムのチェックイン」オプション(非レコード・カテゴリ)。

- 「レコード・フォルダ内を検索中」ページの「アクション」メニューの「external_source_nameレコードの作成」オプション(レコード・カテゴリのみ)。

- 任意のリンク・ページの「アクション」メニューの「新規'external_source_name'アイテムのリンク」オプション。

falseに設定されている場合、これらの機能は表示されません。

デフォルトはFALSEです。

使用方法

- 第2.21項「Records」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ShowCreateExternalMenu=true

showDocActions

検索結果ページにチェックアウト・リンクを表示するかどうかを定義します。

この変数は、Oracle Desktopなど、ODMAアプリケーションの追加コードの評価にも使用されます。ODMAクライアントからアクセスされないコンテンツ・サーバー・インスタンスのチェックアウト・リンクを表示するには、showSearchResultsCheckoutColumn変数を使用します。

- TRUEに設定されている場合、検索結果ページに、チェックアウト・リンクを含む列が表示されます。

- FALSEに設定されている場合、検索結果ページにチェックアウト・リンクは表示されません。

デフォルトはFALSEです。

使用方法

- 第2.3項「クライアント」

- 第2.5項「コンテンツ・アイテム」

- 第2.19.項「ページ表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

showDocActions=1

関連項目

- showSearchResultsCheckoutColumn

- noInfoColumn

- noRevisionsColumn

ShowEmailMetadataMenu

Oracle WebCenter Content: RecordsインスタンスにEmailMetadataコンポーネントがインストールされ、有効である場合に、管理UIが表示されるかどうかを定義します。

- TRUEに設定されている場合、管理UIの表示が許可されます。

- FALSEに設定されている場合、管理UIは非表示です。

デフォルトはFALSEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

IntradocDir/components/EmailMetadata/emailmetadata_environment.cfg

例

構成エントリとしての使用例:

ShowEmailMetadataMenu=true

ShowHyperlinkBox

PDFファイルのハイパーリンクがボックスで囲まれるかどうかを定義します。

- TRUEに設定されている場合、PDFファイルのハイパーリンクはボックスで囲まれます。

- FALSEに設定されている場合、PDFファイルのハイパーリンクはボックスで囲まれません。

デフォルトはFALSEです。

使用方法

- 第2.8.2.1項「一般変数」

場所

IntradocDir/IdcRefinery/shared/idcrefinery.cfg

例

構成エントリとしての使用例:

ShowHyperlinkBox=true

IsSimpleProfilesEnabled

この変数は、簡易プロファイル機能を有効にします。

- TRUEに設定されている場合、簡易プロファイル機能は有効です。

- FALSEに設定されている場合、簡易プロファイル機能は無効です。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

IsSimpleProfilesEnabled=true

ShowOnlyKnownAccounts

チェックイン・ページおよび検索ページに、事前定義済アカウントのみが表示されるかどうかを定義します。

- TRUEに設定されている場合、チェックイン・ページおよび検索ページの「アカウント」オプション・リストには、事前定義済アカウントのみが表示されます。

- FALSEに設定されている場合、ユーザーが属する任意のユーザー定義アカウントもオプション・リストに表示されます。

デフォルトは空の文字列です。

使用方法

- 第2.24.1項「内部セキュリティ」

- 第2.13項「フィールド表示」

場所

- 「システム・プロパティ」、「コンテンツ・セキュリティ」タブ、「既知のアカウントのみを表示する」

- 「管理」、「管理サーバー」、「コンテンツ・セキュリティ」メニュー・オプション、「既知のアカウントのみを表示する」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ShowOnlyKnownAccounts=true

ShowRevisionsColumn

コンテンツ・サーバーの最近のバージョンでは、「クラシック表示」の使用中は、「検索結果」ページにドキュメントのリビジョン番号は表示されません。この構成変数は、リビジョン番号を表示するために使用されます。

- TRUEに設定されている場合、「クラシック表示」の使用中に、「検索結果」ページにドキュメントのリビジョン番号が表示されます。

- この設定は、クラシック検索モードでのみ機能します。

デフォルトはTRUEです。

使用方法

- 第2.13項「フィールド表示」

場所

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

ShowRevisionsColumn=false

showSearchResultsCheckoutColumn

標準の検索結果ページにチェックアウト・リンクを表示するかどうかを定義します。

- TRUEに設定されている場合、標準の検索結果ページに、チェックアウト・リンクを含む列が表示されます。

- FALSEに設定されている場合、標準の検索結果ページにチェックアウト・リンクは表示されません。

デフォルトはFALSEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

- 第2.19.項「ページ表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

showSearchResultsCheckoutColumn=1

関連項目

- showDocActions

- noInfoColumn

- noRevisionsColumn

SkipMozillaMailToWorkaround

「検索結果」ページおよび「コンテンツ情報」ページからの電子メールをMozillaメール・アプリケーションが正確に処理できるようにする電子メール・ソリューションを無効にするために使用されます。メーラーから正しくフォーマットされた電子メールが送信されない場合、この変数をTRUEに設定します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- IntradocDir/config/config.cfg

例

特殊な電子メール処理を無効にする例:

SkipMozillaMailToWorkaround=true

SmtpPort

Simple Mail Transfer Protocol (SMTP)のポート番号を定義します。

デフォルトは25です。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「SMTPポート」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SmtpPort=25

関連項目

- SysAdminAddress

- MailServer

SocketHostAddressSecurityFilter

コンテンツ・サーバー・インスタンスへのコールを許可されるIPアドレスを定義します。

コンテンツ・サーバー・インスタンスへのリモートIdcCommandXコールを実行できるようにするには、この設定またはSocketHostNameSecurityFilterのどちらかが必要です。(通常は、両方の設定を同時に使用しないでください。)詳細は、『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

複数のアドレスはパイプ文字(|)で区切ります。パイプの両側には空白を入れないでください

ワイルドカードを使用して、アドレスのグループを示します(*は0個以上の文字、?は1個の文字)。

デフォルトはローカル・ホストのIPアドレスです。

使用方法

- 第2.27項「Webサーバー」

- 第2.24.2項「外部セキュリティ」

場所

- 「システム・プロパティ」、「サーバー」タブ、「IPアドレス・フィルタ」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SocketHostAddressSecurityFilter=10.10.3.*|127.0.0.1

関連項目

- SocketHostNameSecurityFilter

SocketHostNameSecurityFilter

コンテンツ・サーバー・インスタンスへのコールを許可されるサーバー名を定義します。

コンテンツ・サーバー・インスタンスへのリモートIdcCommandXコールを実行できるようにするには、この設定またはSocketHostAddressSecurityFilterのどちらかが必要です。(通常は、両方の設定を同時に使用しないでください。)『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』を参照してください。

複数のサーバー名はパイプ文字(|)で区切ります。パイプの両側には空白を入れないでください

使用方法

- 第2.27項「Webサーバー」

- 第2.24.2項「外部セキュリティ」

場所

- 「システム・プロパティ」、「サーバー」タブ、「ホスト名フィルタ」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SocketHostNameSecurityFilter=olympus|localhost|zeus

関連項目

- SocketHostAddressSecurityFilter

SourcePath

LDAPプロバイダを識別する一意の文字列を指定します。ユーザーが最初にプロバイダを通じて証明書をリクエストするときに、この文字列がユーザー情報とともに格納されます。そのため、ユーザーが次に証明書をリクエストするときに、この文字列を使用してユーザーとプロバイダをマッピングすることができるようになります。

LDAPプロバイダの名前をソース・パスとして使用することをお薦めします。

デフォルトはありません。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「ソース・パス」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

SourcePath=LdapProvider1

関連項目

- Priority

StdPageWidth

ページ幅をピクセル単位で設定します。

デフォルトは550です。

使用方法

- 第2.19.項「ページ表示」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

StdPageWidth=1000

ページ幅を文字列として返します。

<$StdPageWidth$>

StrConfineOverflowChars

文字列のパディング文字を定義します。

strConfine Idoc Script関数によってパディング用に使用される文字を定義します。

デフォルトはピリオド(ドット)です。

使用方法

- 第2.25項「文字列」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

StrConfineOverflowChars=.

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「strConfine」

StyleForRequiredFields

必須メタデータ・フィールドの表示フォーマットを設定します。

設定されている場合、必須フィールドは、カスケード・スタイル・シートで定義されているスタイルで表示されます。

スタイルの値には、コンテンツ・サーバーで定義されている任意のフィールド・キャプション・スタイルを設定できます。

使用方法

- 第2.13項「フィールド表示」

パラメータ

指定されているスタイルが、唯一のパラメータです。

場所

IntradocDir/config/config.cfg

例

必須フィールドを赤で表示する例:

StyleForRequiredFields=requiredField

関連項目

- NotationForRequiredFields

SubjectsDir

subjects/ディレクトリへのパスを定義します。

サブジェクトは、コンテンツ・サーバー・サービスによって、オプション・リストの変更や新規ユーザーの追加などのシステム変更が行われた場合に通知されるサブシステムです。

デフォルトはDomainHome/ucm/cs/data/subjects/です。

使用方法

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SubjectsDir=c:/domain_temp/data/subjects

SubscriptionCollatedFieldList

サブスクリプションに表示されるフィールドのリストを定義します。

起動時に定義されるデフォルト・フィールドは、dIDおよびdDocNameです。

AdditionalSubscriptionCollatedFieldListを使用すると、追加フィールドを定義できます。

SubscriptionCollatedFieldListを変更するかわりに、AdditionalSubscriptionCollatedFieldListを使用して照合リストにサブスクリプション・フィールドを追加することをお薦めします。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

関連項目

- AdditionalSubscriptionCollatedFieldList

SubscriptionMethod

サブスクリプションの処理方法を指定します。

可能な値は次のとおりです。

- SubscriptionOriented: コンテンツ・サーバーは、各サブスクリプションを索引が作成されているコンテンツ・アイテムと比較します。
サブスクリプションの数がコンテンツ・アイテムの数よりも比較的小さい場合(たとえば、コンテンツ・アイテムが100,000、サブスクリプションが1000の場合)は、この値を使用する必要があります。

- DocumentOriented: コンテンツ・サーバーは、索引が作成されている各コンテンツ・アイテムをアクティブなサブスクリプションと比較します。
サブスクリプションの数がコンテンツ・アイテムの数よりも比較的大きい場合(たとえば、コンテンツ・アイテムが1000、サブスクリプションが1000の場合)は、この値を使用する必要があります。

デフォルトはSubscriptionOrientedです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SubscriptionMethod=DocumentOriented

SysAdminAddress

システム管理者の電子メール・アドレスを定義します。

これは、ワークフロー通知電子メールおよびコンテンツ・サーバー・インスタンスから送信されるサブスクリプション通知電子メールで使用されるアドレスです。

文字列を返します。

デフォルト値はありません。

使用方法

- 第2.26項「ユーザー」

- 第2.7項「コンテンツ・サーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「管理者の電子メール・アドレス」

- 「管理」、「管理サーバー」、「インターネットの構成」メニュー・オプション、「管理者の電子メール・アドレス」

- IntradocDir/config/config.cfg

例

構成設定の使用例:

SysAdminAddress=admin@example.com

スクリプトとして、構成設定の値を返します。

<$SysAdminAddress$>

関連項目

- MailServer

- SmtpPort

SystemDateFormat

コンテンツ・サーバー・インスタンスの日付/時間フォーマットを設定します。

日付フォーマットには、秒数まで格納するフォーマットおよび秒数を切り捨てて分までの日付を格納するフォーマットの2つのタイプがあります。秒を使用する場合、2037年までの日付のみ格納できます。

SystemLocaleが構成設定として指定されていない場合、SystemDateFormatは、コンテンツ・サーバー構成表のSystemLocale設定ではなく、Java VMのオペレーティング・システムの設定から直接推測されます。SystemLocaleが明示的に定義されている場合、そのロケールのコンテンツ・サーバーの構成表の日付/時間フォーマットが使用されます。

このフォーマットの構文は、標準のJavaクラス・ライブラリで提供される日付フォーマット機能の拡張です。

使用方法

- 第2.10項「日付および時間」

- 第2.18項「ローカライズ」

場所

IntradocDir/config/config.cfg

例

4桁の年フォーマットを使用する米国標準日時を設定する構成エントリとしての使用例:

SystemDateFormat=M/d{/yyyy} {h:mm[:ss] {aa}[zzz]}

関連項目

- SystemLocale

- SystemTimeZone

SystemLocale

コンテンツ・サーバー・インスタンスのシステム・ロケールを設定します。

この設定で、次の内容を制御します。

- コンテンツ・サーバー・インスタンスで使用されるローカライズされた文字列

- Webページの文字エンコーディング

- 日付/時間フォーマット

- タイムゾーン

- フルテキスト索引作成で使用されるパラメータ

これらの機能は、個別の構成エントリによって、またはSystemLocaleの設定を変更することによって、個別に制御できます。

この設定は、「システム・プロパティ」ユーティリティの「サーバー」タブで変更できます。特定のロケールのデフォルトは、「システム・プロパティ」ユーティリティの「ローカライズ」タブで変更できます。

SystemLocaleが構成設定として指定されていない場合、SystemDateFormatは、コンテンツ・サーバー構成表のSystemLocale設定ではなく、Java VMのオペレーティング・システムの設定から直接推測されます。SystemLocaleが明示的に定義されている場合、そのロケールのコンテンツ・サーバーの構成表の日付/時間フォーマットが使用されます。

使用方法

- 第2.18項「ローカライズ」

場所

- 「システム・プロパティ」、「サーバー」タブ、「システム・ロケール」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SystemLocale=Deutsch

関連項目

- SystemDateFormat

- SystemTimeZone

SystemTimeZone

コンテンツ・サーバー・インスタンスのデフォルトのタイムゾーンを設定します。

WC_CONTENT_ORACLE_HOME/shared/config/resources/std_locale.htmファイルのSystemTimeZones表に、指定できるタイムゾーンがリストされています。

デフォルトは、ローカル・コンピュータのオペレーティング・システムに設定されているタイムゾーンです。デフォルトが使用されている場合、この変数は構成ファイルに表示されません。

使用方法

- 第2.10項「日付および時間」

- 第2.18項「ローカライズ」

場所

- 「システム・プロパティ」、「サーバー」タブ、「システム・タイムゾーン」

- IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

SystemTimeZone=Europe/Berlin

関連項目

- SystemDateFormat

- SystemLocale

TempDir

Content Serverアナライザ・ユーティリティが、ファイルを複製およびテストする場所を指定します。

デフォルトは、IdcAnalyzeLogDir設定により指定されているログ・ディレクトリにあるtempサブディレクトリです。

使用方法

- 第2.11項「デバッグ」

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

TempDir=f:/domain/analyzer_logs/temp/

関連項目

- IdcAnalyzeLogDir

TextIndexerFilterValidateFormats

この変数は、読み取れない文字を検証するファイル・タイプのカンマ区切りリストを指定します。この変数を使用すると、指定されたファイル・フォーマットは、読み取れない文字がないかどうかをチェックされ、それらの文字は、索引作成のためにテキスト・ファイルを渡す前に修正されます。

使用方法

- 第2.16項「索引の作成」

場所

DomainHome/ucm/cs/TextIndexerFilter/textindexerfilter_einviornment.cfg

例

TextIndexerFilterValidateFormats=application/pdf

TimeoutChangedTemplateForcedConversionsInMins

テンプレートまたはレイアウトが変更されてからDynamic Converterがファイルを再変換するまでの最短間隔を定義します(分単位)。

- 正の値に設定されている場合、テンプレートまたはレイアウトの変更による強制変換または事前変換の再変換は、この設定で指定されている時間が経過した後にのみ実行されます。

- 別のテンプレートまたはレイアウトを使用するように変換ルールが変更された場合、通常の評価ロジックが使用されます。

- NeverTimeoutForcedConversionsTemplateChangeがTRUEに設定されている場合、この設定は無視されます。

- 0に設定されている場合、TimeoutMismatchedForcedConversionsInMins設定が使用されます。

デフォルトは0です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

TimeoutChangedTemplateForcedConversionsInMins=1

関連項目

- NeverTimeoutForcedConversionsTemplateChange

- TimeoutMismatchedForcedConversionsInMins

TimeoutMismatchedForcedConversionsInMins

ソース・ドキュメント、テンプレートまたはレイアウトが変更されてからDynamic Converterがファイルを再変換するまでの最短間隔を定義します(分単位)。

- 正の値に設定されている場合、ソース・ドキュメント、テンプレートまたはレイアウトの変更による強制変換または事前変換の再変換は、この設定で指定されている時間が経過した後にのみ実行されます。

- 別のテンプレートまたはレイアウトを使用するように変換ルールが変更された場合、通常の評価ロジックが使用されます。

- TimeoutChangedTemplateForcedConversionsInMinsが正の値に設定されている場合、この設定はソース・ドキュメントが変更された場合にのみ適用されます。

- 0に設定されている場合、ソース・ドキュメントの変更による強制変換または事前変換の再変換は行われません。

デフォルトは15分です。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

TimeoutMismatchedForcedConversionsInMins=10

関連項目

- NeverTimeoutForcedConversionsTemplateChange

- TimeoutChangedTemplateForcedConversionsInMins

TimeoutPerOneMegInSec

ファイルの索引コレクションへの索引作成のタイムアウトを設定します。

- 索引が作成されるバルクロード・ファイルのサイズをMB単位で切り上げて、その値にこの設定を掛けることによって、タイムアウト値を決定します(秒単位)。

- ファイルに大量の数値データが含まれる場合、タイムアウトを3000-6000に増やす必要があります。索引作成のクリーンアップ・サイクルは、バルクロードを4、5回実行するたびに行われ、その時間もタイムアウトの対象の時間に加算されますが、数値データの場合は実行時間が長くなる可能性があります。

デフォルトは1MB当たり600秒です。

使用方法

- 第2.16項「索引の作成」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

TimeoutPerOneMegInSec=3000

TraceConversionCacheCleanup

Dynamic Converterのキャッシュ・クリーンアップ・サイクル中にレポートをデバッグ・トレースに出力します。

- TRUEに設定されている場合、削除されたドキュメント、そのドキュメントの変換タイプ(強制かどうか)、およびドキュメントが削除された理由がキャッシュ・サイズの制約かどうかを示すレポートがデバッグ・トレースに含まれます。

- Dynamic Converterのキャッシュ・クリーンアップ・サイクルの詳細は、「ConversionCacheExpirationPeriodInDays」、「DatedCacheIntervalDays」および「MaxConversionCacheSizeInMegs」を参照してください。

デフォルトはFALSEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

TraceConversionCacheCleanup=true

関連項目

- ConversionCacheExpirationPeriodInDays

- DatedCacheIntervalDays

- MaxConversionCacheSizeInMegs

TraceResourceConflict

コマンドラインからコンテンツ・サーバー・インスタンスを起動するとき、コンポーネント・リソースによって2回オーバーライドされる各システム・リソースがコマンドラインに出力されます。

TRUEに設定されている場合、2つ以上のコンポーネント・リソースによってオーバーライドされるシステム・リソースが出力されます。

デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

TraceResourceConflict=true

関連項目

- TraceResourceLoad

- TraceResourceOverride

TraceResourceLoad

コマンドラインからコンテンツ・サーバー・インスタンスを起動するとき、すべてのリソース・ロード・アクティビティがコマンドラインに出力されます。

TRUEに設定されている場合、ロードされるすべてのリソース、リソースのオーバーライド、リソースの競合およびリソースのマージが出力されます。

デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

TraceResourceLoad=true

関連項目

- TraceResourceConflict

- TraceResourceOverride

TraceResourceOverride

コマンドラインからコンテンツ・サーバー・インスタンスを起動するとき、コンポーネント・リソースによってオーバーライドされるシステム・リソースおよび非システム・コンポーネント・リソースがコマンドラインに出力されます。

TRUEに設定されている場合、1つ以上のコンポーネント・リソースによってオーバーライドされるシステム・リソースおよび非システム・リソースが出力されます。

デフォルトはFALSEです。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

TraceResourceOverride=true

関連項目

- TraceResourceConflict

- TraceResourceLoad

UieHideSearchCheckboxes

検索ページのメタデータ・フィールドのチェック・ボックスにより、ページに初期表示されるメタデータ・フィールドの数が制限されますが、これらのチェック・ボックスを表示または非表示にします。

- TRUEに設定されている場合、検索ページにはメタデータ・フィールドのチェック・ボックスは表示されません。

- FALSEに設定されている場合、検索ページにメタデータ・フィールドのチェック・ボックスは表示されます。

デフォルトはTRUEです。

この設定を有効にするには、WebCenter Contentを再起動します。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.21項「Records」

場所

DomainHome/ucm/urm/components/RecordsManagement/records_management_environment.cfg

例

構成エントリとしての使用例:

UieHideSearchCheckboxes=false

UniversalSearchAllowFullText

SearchQueryFormat=Universalが使用されている場合に表示されるフィールドを変更します。UniversalSearchAllowFullTextがFALSEに設定されている場合、「検索」ページには「フルテキスト検索」フィールドは表示されません。

デフォルトはTRUEです。

使用方法

- 第2.5項「コンテンツ・アイテム」

場所

IntradocDir/config/config.cfg

例

UniversalSearchAllowFullText=false

関連項目

- SearchQueryFormat

UploadApplet

複数ファイルのアップロード・アプレットを有効にします。

重要:
この設定は、Uploadアプレットのカスタム・レガシー・バージョン専用です。標準のMultiUpload変数が有効になっているときには、これを有効にしないでください。

TRUEに設定した場合、アップロード・アプレットが有効になり、複数のファイルを1つのコンテンツ・アイテムとして圧縮してチェックインできるようになります。

FALSEに設定した場合、アップロード・アプレットは無効になります。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.3項「クライアント」

場所

IntradocDir/config/config.cfg

例

構成設定として、アップロード・アプレットを有効にします。

UploadApplet=true

スクリプトとして、アップロード・アプレットの条件を評価します。

<$UploadApplet$>

関連項目

- DownloadApplet

- MultiUpload

UseAccounts

アカウントの使用を有効にします。

TRUEに設定されている場合、アカウントは有効です。

デフォルトはFALSEです。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UseAccounts=true

UseAdsi

コンテンツ・サーバー・インスタンスのActive Directory (ADSI)認証を有効にします。

この設定は、NtlmSecurityEnabledがTRUEの場合のみ有効です。

このオプションは、IIS wサーバーを使用している場合のみ使用可能です。

TRUEに設定されている場合、Active Directoryで定義されているユーザーは、自分のネットワーク資格証明を使用して、コンテンツ・サーバー・インスタンスにログインできます。

デフォルト値はありません。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「システム・プロパティ」、「インターネット」タブ、「アクティブ・ディレクトリ・セキュリティ (ADSI)」オプション

- 「管理」、「管理サーバー」、「インターネットの構成」メニュー・オプション、Active Directoryセキュリティ・オプション

- IntradocDir/config/config.cfg

例

ADSIセキュリティを有効にする例:

UseAdsi=true

関連項目

- NtlmSecurityEnabled

- UseNtlm

UseCascadingStyleSheets

Dynamic Converterのカスケード・スタイル・シート(CSS)の使用を有効にします。

TRUEに設定されている場合、カスケード・スタイル・シートは有効です。

FALSEに設定されている場合、カスケード・スタイル・シートは無効です。このオプションは、CSSをサポートしない古いブラウザでのみ有用です。

デフォルトはTRUEです。

使用方法

- 第2.8.3項「Dynamic Converter」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UseCascadingStyleSheets=false

UseDatabaseWfInQueue

WebCenter Contentユーザー・インタフェースで、「ワークフローのコンテンツ」ページに「自分への割当て」という名前のフィルタを表示できるようにします。(このフィルタは自動的に、ネイティブ11gインタフェースに表示されます。)

1 (またはtrue)に設定すると、このフィルタがユーザー・インタフェースに表示されます。

0 (またはfalse)に設定すると、このフィルタはユーザー・インタフェースに表示されません。

デフォルトはtrueです。

config.cfgファイルでUseDatabaseWfInQueue=1を設定している場合、次の手順を実行します。

1. Content Serverを再起動します。

2. コンテンツ・サーバーのホーム・ページに表示されるClick to complete workflow setupという警告メッセージをクリックします。
コンテンツ・サーバーから返される、Workflow setup is now completeという成功メッセージを確認します。

config.cfgファイルでUseDatabaseWfInQueue=0を設定している場合、次の手順を実行します。

1. Content Serverを再起動します。

使用方法

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

UseDatabaseShortIndexName

使用するデータベースで18文字を超える索引名がサポートされない場合に必要です。

TRUEに設定されている場合、短い索引名が使用されます。

FALSEに設定されている場合、短い索引名は使用されません。

デフォルトはFALSEです。

使用方法

- 第2.9項「データベース」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UseDatabaseShortIndexName=false

UseFourDigitYear

この文字列は廃止されています。SystemDateFormatを使用してください。

4桁または2桁の年の表示フォーマットを指定します。

- TRUEに設定されている場合、コンテンツ・サーバー・インスタンスは年を4桁で表示します。

- FALSEに設定されている場合、コンテンツ・サーバー・インスタンスは年を2桁で表示します。

コンテンツ・サーバーは、2桁および4桁の両方の年のデータ入力をサポートしています。

デフォルトはTRUEです。

使用方法

- 第2.10項「日付および時間」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UseFourDigitYear=false

関連項目

- SystemDateFormat

UseNestedGroups

JpsUserプロバイダ・オプション。コンテンツ・サーバーが認証プロバイダでのユーザーの直接および間接のグループ・メンバーシップを取得するかどうかを指定します。

TRUEに設定されている場合、ユーザーの直接および間接のグループ・メンバーシップが取得されます。これはJpsUserプロバイダのデフォルトの動作です。

FALSEに設定されている場合、ユーザーの直接のグループ・メンバーシップのみが取得されます。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- IntradocDir/data/providers/jpsuserprovider/provider.hda

例

構成エントリとしての使用例:

UseNestedGroups=false

UseNetscape

プロバイダ経由のLDAPサーバー接続に使用する方法を指定します。

- TRUEに設定されている場合、Netscape SDKが使用されます。パフォーマンス向上のためにこの設定をお薦めします。

- FALSEに設定されている場合、JNDI接続が使用されます。

デフォルトはTRUEです。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「Netscape SDKを使用」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

UseNetscape=0

UseNtlm

コンテンツ・サーバー・インスタンスのNT LAN Manager (NTLM)認証を有効にします。

- この設定は、NtlmSecurityEnabledがTRUEの場合のみ有効です。

- このオプションは、IIS Webサーバーを使用している場合のみ使用可能です。

- TRUEに設定されている場合、Windowsネットワーク(NTLM)で定義されているユーザーは、自分のネットワーク資格証明を使用して、コンテンツ・サーバー・インスタンスにログインできます。

デフォルト値はありません。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「システム・プロパティ」、「インターネット」タブ、「NTドメイン・セキュリティ (NTLM)」オプション

- 「管理」、「管理サーバー」、「インターネットの構成」メニュー・オプション、NTドメイン・セキュリティ・オプション

- IntradocDir/config/config.cfg

例

NTLMセキュリティを有効にする例:

UseNtlm=true

関連項目

- NtlmSecurityEnabled

- UseAdsi

UserCache

usersディレクトリへのパスを定義します。このディレクトリには、ユーザー・パーソナライズ情報が格納されます。

デフォルトはDomainHome/ucm/cs/data/users/です。

使用方法

- 第2.12項「ディレクトリとパス」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserCache=c:/myuserdata/

UserCacheMaxSize

ユーザー・キャッシュ内の最大要素数。

デフォルトは5000です。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.26項「ユーザー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserCacheMaxSize=5000

関連項目

UserCacheClusterSupport

UserCacheMaxSizeMatchInitialSize

UserCacheClusterSupport

ユーザー・キャッシュに対してユーザー・キャッシュ・クラスタリングのサポートを有効または無効にします。

TRUEに設定されている場合、キャッシュ・クラスタリングは有効です。

FALSEに設定されている場合、キャッシュ・クラスタリングは無効です。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.26項「ユーザー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserCacheClusterSupport=true

関連項目

UserCacheMaxSize

UserCacheMaxSizeMatchInitialSize

システムがユーザー・キャッシュ・メモリーを事前に割り当てる必要があるかどうかを示すフラグ。

TRUEに設定されている場合、システムはユーザー・キャッシュに対してメモリーを事前に割り当てます。

FALSEに設定されている場合、システムはユーザー・キャッシュに対してメモリーを事前に割り当てません。

デフォルトはFALSEです。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.26項「ユーザー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserCacheMaxSizeMatchInitialSize=true

関連項目

UserCacheMaxSize

UserCacheTimeout

グローバルおよび外部のユーザー情報の一時キャッシュのタイムアウトを設定します(ミリ秒単位)。

デフォルトは60000ミリ秒(1分)です。

使用方法

- 第2.7項「コンテンツ・サーバー」

- 第2.26項「ユーザー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserCacheTimeout=120000

UseRedirectedOutput

Java仮想マシンからの出力の取得を有効にします。これには、任意の有効なトレース機能からのロギング出力およびVMクラッシュ時に生成されるスタック・ダンプが含まれます。

Windowsシステムでコンテンツ・サーバーがサービスとして実行されている場合のみ使用されます。

使用方法

- 第2.11項「デバッグ」

場所

IntradocDir/config/config.cfg

例

UseRedirectedOutput=true

UseRevisionCreateDate

アーカイブをインポートするシステムでこの変数が設定されている場合、アーカイバはdCreateDateを使用して比較を行います。

これにより、コンテンツ・サーバーは、割り当てられているdInDateではなく、初期作成日でリビジョンを区別できます。

これは、デフォルトでは設定されていません。

重要:
この構成設定は、古いバージョン(7.5より前)のコンテンツ・サーバーからレガシー・コンテンツをインポートしていない場合に使用します。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

UseRevisionCreateDate=true

UserFilteredSubjects

現在のユーザーのセキュリティ資格証明が変更された場合にリフレッシュする必要があるサブジェクトを指定します。

- サブジェクトは、コンテンツ・サーバー・サービスによって、オプション・リストの変更や新規ユーザーの追加などのシステム変更が行われた場合に通知されるサブシステムです。

- この設定に、任意のカスタム・セキュリティ・サブジェクトを追加します。カスタム・オブジェクトは、通常、非常に複雑なセキュリティ統合の場合のみ作成されます。

- これはカンマ区切りリストです。

デフォルトはusers,accountsです。

使用方法

- 第2.24.1項「内部セキュリティ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

UserFilteredSubjects=users,accounts,licenses

UseSearchCache

TRUEに設定されている場合、検索キャッシュは有効です。検索キャッシュに検索エンジンの最近の問合せをキャッシュすることによって、パフォーマンスが向上します。

デフォルトはTRUEです。

使用方法

- 第2.23項「検索」

場所

IntradocDir/config/config.cfg

例

構成変数としての使用例:

UseSearchCache=true

問合せを実行するブラウザURLリクエストのCGI行でこの変数がFALSEに設定されている場合、毎回強制的に問合せが実行されます。これにより(毎回新しい検索結果が生成されるので)、実行される問合せの処理速度を測定したり、キャッシュ結果を検証したりできます。

http://...?IdcService=GET_SEARCH_RESULTS&...UseSearchCache=false

UseSecureLdap

LDAPプロバイダでSSLが使用されるかどうかを指定します。

- TRUEに設定されている場合、SSLは使用されます。適切な証明書をLDAPサーバーにインストールする必要があります。SSLを開始した後は、この証明書によってLDAPサーバーとコンテンツ・サーバー・インスタンスの間の通信が保護されます。

- FALSEに設定されている場合、SSLは使用されません。

デフォルトはFALSEです。

使用方法

- 第2.24.2項「外部セキュリティ」

場所

- 「LDAPプロバイダの追加」/「LDAPプロバイダの編集」ページ、「SSLを使用」

- IntradocDir/data/providers/provider_name/provider.hda

例

構成エントリとしての使用例:

UseSecureLdap=true

関連項目

- LdapPort

UseSSL

Secure Sockets Layer (SSL)を有効にします。

- この設定は、変数HttpWebRootおよびHttpCgiPathに影響します。

- SSL対応のWebサーバーを使用している場合のみ、Secure Sockets Layerを使用します。

- TRUEに設定されている場合、SSL (httpではなくhttps)が使用されます。

デフォルトはFALSEです。

使用方法

- 第2.24.2項「外部セキュリティ」

- 第2.27項「Webサーバー」

場所

- 「システム・プロパティ」、「インターネット」タブ、「Secure Sockets Layerの使用」

- IntradocDir/config/config.cfg

例

構成設定として、SSLを有効にします。

UseSSL=true

スクリプトとして、構成設定の値を返します。

<$UseSSL$>

関連項目

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「HttpCgiPath」

- 『Oracle Fusion Middleware Oracle WebCenter Contentでの開発』の「HttpWebRoot」

VaultDir

vaultディレクトリへのパスを定義します。

- これは、コンテンツ・サーバーのネイティブ・ファイル・リポジトリのルート・ディレクトリです。

- この設定は、vaultディレクトリがコンテンツ・サーバーのrootディレクトリに置かれていない場合のみ必要です。

デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.8.1項「Inbound Refinery」

場所

- コンテンツ・サーバー: DomainHome/ucm/cs/bin/intradoc.cfg

- Inbound Refinery: IntradocDir/ucm/ibr/bin/intradoc.cfg

例

構成エントリとしての使用例:

VaultDir=f:/vault

VerboseMode

Inbound Refineryログのロギング・レベルを指定します。

- TRUEに設定されている場合、Inbound Refineryログに、すべてのメッセージおよび構成情報(PDFが最適化されているかどうか、カスタム・コンバータ・パスの場所、カスタム変換の許容時間など)が記録されます。

- FALSEに設定されている場合、Inbound Refineryログに記録されるのは、エラー・メッセージのみです。

デフォルトはFALSEです。

使用方法

- 第2.8.1項「Inbound Refinery」

- 第2.11項「デバッグ」

場所

- 「ローカルInbound Refineryの構成」画面、「一般」タブ、詳細ロギング

- IntradocDir/IdcRefinery/connections/main/intradoc.cfg

例

構成エントリとしての使用例:

VerboseMode=true

WarnAboutTimeZone

コンテンツ・サーバー・インストーラがコンピュータのタイムゾーンを決定できない場合に警告を表示するかどうかを指定します。

- TRUEに設定されている場合、デフォルトのタイムゾーンが使用され、警告が表示されます。

- FALSEに設定されている場合、デフォルトのタイムゾーンが使用され、警告は表示されません。

デフォルトはFALSEです。

タイプおよび使用方法

- 第2.10項「日付および時間」

- 第2.18項「ローカライズ」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

WarnAboutTimeZone=true

WebBrowserPath

スタンドアロン・アプリケーションから起動されてコンテンツ・サーバー・ヘルプ・ファイルを表示するWebブラウザへのパスを定義します。

デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

場所

- 「システム・プロパティ」、「パス」タブ、「ブラウザ実行可能ファイルのパス」

- DomainHome/ucm/cs/bin/intradoc.cfg

例

構成エントリとしての使用例:

WebBrowserPath=c:/Program Files/Internet Explorer/Iexplore.exe

WebDAVMaxInactiveInterval

ユーザーがWebDAVクライアント・アプリケーションからコンテンツ・サーバー・インスタンスにログインする際、WebDAVコンポーネントによりクライアントにCookieが設定されます。このCookieは、WebDAVMaxInactiveIntervalパラメータで指定されている時間内にWebDAVリクエストが実行されるかぎり、設定されたまま残ります。

このCookieは、WebDAVクライアント・アプリケーションが終了しても、設定されたまま残ります。Cookieの期限が切れた場合、ユーザーは、Microsoft Word、Microsoft ExcelおよびMicrosoft PowerPointの各ソフトウェアからWebDAVトランザクションを実行するために、コンテンツ・サーバー・インスタンスに再ログインする必要があります。

デフォルトは7200秒(2時間)です。

重要:
ソフトウェア更新後もこの設定を有効なまま維持するには、次のいずれかのタスクを実行します。

- IntradocDir/config/config.cfgファイルでこの設定を追加または編集します。

- コンテンツ・サーバーのユーザー・インタフェースで、「管理」、「管理サーバー」、「一般構成」の順に選択し、「追加の構成変数」フィールドでこの設定を入力します。

使用方法

- 第2.14項「フォルダとWebDAV」

場所

IntradocDir/components/Folders_g/folders_environment.cfg

例

WebDAVMaxInactiveInterval=7200

WeblayoutDir

weblayout/ディレクトリへのパスを定義します。

- これは、コンテンツ・サーバーのWebサイトのルート・ディレクトリです。

- この設定は、weblayout/ディレクトリがコンテンツ・サーバーのルート・ディレクトリに置かれていない場合のみ必要です。

デフォルト値はありません。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.8.1項「Inbound Refinery」

場所

- コンテンツ・サーバー: DomainHome/ucm/cs/bin/intradoc.cfg

- Inbound Refinery: DomainHome/ucm/ibr/bin/intradoc.cfg

例

構成エントリとしての使用例:

WeblayoutDir=f:/weblayout

WebServerAuthOnly

Webサーバー・フィルタで、コンテンツ・サーバー・データベースに定義されているユーザーを認証するかどうかを指定します。

- TRUEに設定されている場合、Webサーバー・フィルタは、コンテンツ・サーバー・データベースから取得する内部ユーザーの名前およびパスワードによるユーザーの検証を実行しません。

- IISでBasic認証が有効な場合、この設定はTRUEである必要があります。この設定により、各種ブラウザはBasic認証を使用してMicrosoft Networkにログインでき、ユーザーはNetscapeブラウザでWindowsのユーザー名とパスワードを使用してログインできます。

- このオプションが有効な場合、ユーザーはコンテンツ・サーバーのユーザー・データベースで認証されないので、新規ユーザーの追加は、Windowsネットワーク・ドメインにそれらを追加することによってのみ実現できます。ただし、Windowsネットワーク・ユーザーと同じ名前のユーザーがデータベースに存在している場合は、Windowsネットワーク・プロファイルではなく、コンテンツ・サーバーのセキュリティ・プロファイルが使用されます。

デフォルトはFALSEです。

使用方法

- 第2.27項「Webサーバー」

- 第2.24.2項「外部セキュリティ」

場所

IntradocDir/config/config.cfg

例

Webサーバー認証のみを有効にする構成エントリとしての使用例:

WebServerAuthOnly=true

WorkflowDir

ワークフロー・データが含まれるワークフロー・ディレクトリへのパスを定義します。

デフォルトはIntradocDir/data/workflow/です。

使用方法

- 第2.12項「ディレクトリとパス」

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

WorkflowDir=c:/workflow_info/

WorkflowIntervalHours

ワークフロー更新サイクルの間隔を定義します(時間単位)。

ワークフローの任意のリビジョンの更新イベント・スクリプトがこの間隔で実行されます。

デフォルトは1時間です。

使用方法

- 第2.28項「ワークフロー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

WorkflowIntervalHours=2

XMLEncodingMode

コンテンツ・サーバーを使用するためのブラウザで、URLの国際文字を指定するために使用されます。

この変数をFULLに設定すると、次のような場合に役に立ちます。

- コンテンツ・サーバーがUTF-8を使用するブラウザで使用されている場合(すなわち、Always send URLs as UTF-8の設定が有効な場合)。これは通常、古いバージョンのMicrosoftブラウザでのみ発生します。

- コンテンツ・サーバーのURLをJavascript変数に格納するカスタム・コンポーネントが作成されている場合。その場合、URLを完全にエンコードすることが必要になる場合があります。

- PDAタイプのデバイス(PALM、ハンドヘルド・コンピュータなど)からコンテンツ・サーバーがアクセスされている場合。これらのデバイスを通じてアクセシビリティを提供するコンポーネントが使用されている場合、URLを完全にエンコードすることが必要になる場合があります。これらのデバイスは、非7ビット文字が含まれるURLをサポートしない可能性があります。

デフォルトはPARTIALです。

使用方法

- 第2.7項「コンテンツ・サーバー」

場所

IntradocDir/config/config.cfg

例

構成エントリとしての使用例:

XMLEncodingMode=full

オラクル社の法律上の注意点について

コピーライトについて

Copyright © 1994-2015, Oracle and/or its affiliates.All rights reserved.

商標と登録商標について

OracleおよびJavaはOracle Corporationおよびその関連企業の登録商標です。その他の名称は、それぞれの所有者の商標または登録商標です。

Intel、Intel Xeonは、Intel Corporationの商標または登録商標です。すべてのSPARCの商標はライセンスをもとに使用し、SPARC International, Inc.の商標または登録商標です。AMD、Opteron、AMDロゴ、AMD Opteronロゴは、Advanced Micro Devices, Inc.の商標または登録商標です。UNIXは、The Open Groupの登録商標です。

ライセンス制約の保証と結果的に生じる損害の免責

このソフトウェアおよび関連ドキュメントの使用と開示は、ライセンス契約の制約条件に従うものとし、知的財産に関する法律により保護されています。ライセンス契約で明示的に許諾されている場合もしくは法律によって認められている場合を除き、形式、手段に関係なく、いかなる部分も使用、複写、複製、翻訳、放送、修正、ライセンス供与、送信、配布、発表、実行、公開または表示することはできません。このソフトウェアのリバース・エンジニアリング、逆アセンブル、逆コンパイルは互換性のために法律によって規定されている場合を除き、禁止されています。

保証免責

ここに記載された情報は予告なしに変更される場合があります。また、誤りが無いことの保証はいたしかねます。誤りを見つけた場合は、オラクル社までご連絡ください。

制限付権利

このソフトウェアまたは関連ドキュメントを、米国政府機関もしくは米国政府機関に代わってこのソフトウェアまたは関連ドキュメントをライセンスされた者に提供する場合は、次の通知が適用されます。

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations.As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs.No other rights are granted to the U.S. Government.

危険な用途への使用について

このソフトウェアもしくはハードウェアは様々な情報管理アプリケーションでの一般的な使用のために開発されたものです。このソフトウェアもしくはハードウェアは、危険が伴うアプリケーション（人的傷害を発生させる可能性があるアプリケーションを含む）への用途を目的として開発されていません。このソフトウェアもしくはハードウェアを危険が伴うアプリケーションで使用する際、安全に使用するために、適切な安全装置、バックアップ、冗長性（redundancy）、その他の対策を講じることは使用者の責任となります。このソフトウェアもしくはハードウェアを危険が伴うアプリケーションで使用したことに起因して損害が発生しても、オラクル社およびその関連会社は一切の責任を負いかねます。

第三者のコンテンツ、製品、サービスに対する免責事項

このソフトウェアまたはハードウェア、そしてドキュメントは、第三者のコンテンツ、製品、サービスへのアクセス、あるいはそれらに関する情報を提供することがあります。オラクル社およびその関連会社は、第三者のコンテンツ、製品、サービスに関して一切の責任を負わず、いかなる保証もいたしません。オラクル社およびその関連会社は、第三者のコンテンツ、製品、サービスへのアクセスまたは使用によって損失、費用、あるいは損害が発生しても一切の責任を負いかねます。

ドラフトのアルファ版およびベータ版ドキュメントについて

このドキュメントが試作版の場合:

このドキュメントは試作版であり、デモおよび暫定使用のみを目的としたものです。このソフトウェアを使用するハードウェアに限定するものではありません。オラクル社およびその関連会社は、このドキュメントに関して一切の責任を負わず、いかなる保証もいたしません。また、このドキュメントを使用したことによって損失、費用、あるいは損害が発生しても、一切の責任を負いかねます。