Application Management Pack for Oracle Utilities Network Management System

Metrics Guide

Release 12.1.0.1.0

Part number E70288-01

December 2015

Documentation build: 12.22.2015 14:46:36 [NMSOEM_1450824396000]

Copyright © 2015, Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable:

U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are "commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use. Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Third-party licenses relating to Enterprise Manager and this plug-in are available for viewing online at: Enterprise Manager Licensing Information (http://docs.oracle.com/cd/E24628_01/doc.121/e24474/title.htm).

Overview

The performance metrics (all metrics here except for the ones in Response and Status) are collected at 5 minute intervals. Some of the performance metrics measure activity "per 5 minutes". These metrics show the difference between the count in the previous collection and the count in the current collection. Some other performance metrics measure activity "per hour". These metrics extrapolate their value by multiplying the "per 5 minutes" metric by 12.

The following metrics are available in the Application Management Pack for Oracle Utilities Network Management System plug-in.

Next in This Section

- NMS Services Metrics

NMS Services Metrics

Table 1. Response

Metric

Description

Status

Current status of NMS

Table 2. Status

Metric

Description

Status

Current status of NMS

Isis

Current status of NMS Isis

Services

Current status of NMS Services

Table 3. Study Sessions

Metric

Description

Total Sessions

Total number of study sessions

Powerflow Sessions

Number of powerflow study sessions

Non-Powerflow Sessions

Number of non-powerflow study sessions

Table 4. Jobs Table

Metric

Description

Active Notify Alarms

Active notify (NFY) alarms

Active Jobs

Total active jobs (not including notify alarms)

Incomplete Jobs

All jobs in a restored or incomplete state

Restored (Incomplete) Outages

Outage jobs in a restored/incomplete state

Active Outages

Outage jobs in an active state

Active Non-Outages

Non-outage jobs in an active state

Active Fuzzy Jobs

Fuzzy jobs in an active state

Active Momentary Outages

Momentary outage jobs in an active state

Incomplete Non-Outages

Non-Outage jobs in an incomplete state

Incomplete Fuzzy Jobs

Fuzzy jobs in an incomplete state

Incomplete Momentary Outages

Momentary outage jobs in an incomplete state

Table 5. INCIDENTS Table

Metric

Description

Total Incidents

Total incidents (including AMI power-offs, customer calls, and damage assessments)

Total Active Incidents

Total active incidents (including AMI power-offs, customer calls, and damage assessments)

Total Restored Incidents

Total restored incidents (including AMI power-offs, customer calls, and damage assessments)

Total Damage Assessments

Total damage assessments

Active Damage Assessments

Active damage assessments

Restored Damage Assessments

Restored damage assessments

Total AMI Power-offs

Total AMI power-offs

Active AMI Power-offs

Active AMI power-offs

Restored AMI Power-offs

Restored AMI power-offs

Total Customer Calls

Total customer calls

Active Customer Calls

Active customer calls

Restored Customer Calls

Restored customer calls

Unprocessed Calls

Calls which still need to be processed (have not yet been assigned to a job)

Total Incidents Per Hour

Total incidents per hour (extrapolated)

Damage Assess Per Hour

Damage assess per hour (extrapolated)

AMI Power-offs Per Hour

AMI power-offs per hour (extrapolated)

Customer Calls Per Hour

Customer calls per hour (extrapolated)

Total Calls Per Hour

Total calls per hour (extrapolated)

Total Incidents Per 5 Minutes

Total incidents per 5 minutes

Damage Assess Per 5 Minutes

Damage assess per 5 minutes

AMI Power-offs Per 5 Minutes

AMI power-offs per 5 minutes

Customer Calls Per 5 Minutes

Customer calls per 5 minutes

Total Calls Per 5 Minutes

Total calls per 5 Minutes

Table 6. Number of logged in users by type

Metric

Description

Total Users

Total logged in users

Web Workspace

Number of logged in Web Workspace non-View-Only users

WW View Only

Number of logged in Web Workspace View Only users

Storm Management

Number of logged in Storm Management users

Service Alert

Number of logged in Service Alert users

Web Call Entry

Number of logged in Web Call Entry users

Configuration Assistant

Number of logged in Configuration Assistant users

Web Callbacks

Number of logged in Web Callbacks users

Model Management

Number of logged in Model Management users

Table 7. DDS_ALARM_LOG Table

Metric

Description

Total Operations Per Hour

Total device operations per hour (extrapolated)

Sustained Per Hour

Sustained device operations per hour (extrapolated)

Transient Per Hour

Transient device operations per hour (extrapolated)

Total Operations Per 5 Minutes

Total device operations per 5 minutes

Sustained Per 5 Minutes

Sustained device operations per 5 minutes

Transient Per 5 Minutes

Transient device operations per 5 minutes

Table 8. Crew Activity

Metric

Description

Crew Actions Per Hour

Crew actions (assign, en route, on-site, release, etc.) per hour (extrapolated)

Crew Actions Per 5 Minutes

Crew actions (assign, en route, on-site, release, etc.) per 5 minutes

Documentation Accessibility

Our goal is to make Oracle products, services, and supporting documentation accessible to all users, including users that are disabled. To that end, our documentation includes features that make information available to users of assistive technology.

For information about Oracle's commitment to accessibility, visit the Oracle Accessibility Program website at http://www.oracle.com/pls/topic/lookup?ctx=acc&id=docacc.

Accessibility of Code Examples in Documentation

Screen readers may not always correctly read the code examples in this document. The conventions for writing code require that closing braces should appear on an otherwise empty line; however, some screen readers may not always read a line of text that consists solely of a bracket or brace.

Accessibility of Links to External Web Sites in Documentation

This documentation may contain links to Web sites of other companies or organizations that Oracle does not own or control. Oracle neither evaluates nor makes any representations regarding the accessibility of these Web sites.

Access to Oracle Support

Oracle customers have access to electronic support through My Oracle Support. For information, visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=info or visit http://www.oracle.com/pls/topic/lookup?ctx=acc&id=trs if you are hearing impaired.