Oracle Utilities Operational Device Cloud

Service

Overview Guide

Release 2.1.1 SP 1

E84302-01

March 2017

Oracle Utilities Operational Device Cloud Service Release 2.1.1 SP 1 Overview Guide Copyright © 2017 Oracle and/or its affiliates. All rights reserved.

This software and related documentation are provided under a license agreement containing restrictions on use and disclosure and are protected by intellectual property laws. Except as expressly permitted in your license agreement or allowed by law, you may not use, copy, reproduce, translate, broadcast, modify, license, transmit, distribute, exhibit, perform, publish, or display any part, in any form, or by any means. Reverse engineering, disassembly, or decompilation of this software, unless required by law for interoperability, is prohibited.

The information contained herein is subject to change without notice and is not warranted to be error-free. If you find any errors, please report them to us in writing.

If this is software or related documentation that is delivered to the U.S. Government or anyone licensing it on behalf of the U.S. Government, then the following notice is applicable: U.S. GOVERNMENT END USERS: Oracle programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, delivered to U.S. Government end users are

"commercial computer software" pursuant to the applicable Federal Acquisition Regulation and agency-specific supplemental regulations. As such, use, duplication, disclosure, modification, and adaptation of the programs, including any operating system, integrated software, any programs installed on the hardware, and/or documentation, shall be subject to license terms and license restrictions applicable to the programs. No other rights are granted to the U.S. Government.

This software or hardware is developed for general use in a variety of information management applications. It is not developed or intended for use in any inherently dangerous applications, including applications that may create a risk of personal injury. If you use this software or hardware in dangerous applications, then you shall be responsible to take all appropriate fail-safe, backup, redundancy, and other measures to ensure its safe use.

Oracle Corporation and its affiliates disclaim any liability for any damages caused by use of this software or hardware in dangerous applications.

Oracle and Java are registered trademarks of Oracle and/or its affiliates. Other names may be trademarks of their respective owners.

Intel and Intel Xeon are trademarks or registered trademarks of Intel Corporation. All SPARC trademarks are used under license and are trademarks or registered trademarks of SPARC International, Inc. AMD, Opteron, the AMD logo, and the AMD Opteron logo are trademarks or registered trademarks of Advanced Micro Devices. UNIX is a registered trademark of The Open Group.

This software or hardware and documentation may provide access to or information about content, products, and services from third parties. Oracle Corporation and its affiliates are not responsible for and expressly disclaim all warranties of any kind with respect to third-party content, products, and services unless otherwise set forth in an applicable agreement between you and Oracle. Oracle Corporation and its affiliates will not be responsible for any loss, costs, or damages incurred due to your access to or use of third-party content, products, or services, except as set forth in an applicable agreement between you and Oracle.

Contents

Oracle Utilities Operational Device Cloud Service Overview.............................................................................................. 1

Welcome to Oracle Utilities Operational Device Cloud Service .................................................................................................. 1

Oracle Utilities Operational Device Cloud Service Applications. . . . . . ...................................................................................... 2

Documentation .................................................................................................................. . . . . .......................................................... 2

Supported Client Platforms and Browsers ....................................................................................................................................... 3

Supported Integrations .......................................................................................................... . ........................................................... 3

Contents - 1

Oracle Utilities Operational Device Cloud Service Overview Guide Oracle Utilities Operational Device

Cloud Service Overview

This guide provides an overview of the Oracle Utilities Operational Device Cloud Service, including:

•

Welcome to Oracle Utilities Operational Device Cloud Service

•

Documentation

•

Supported Client Platforms and Browsers

•

Supported Integrations

Welcome to Oracle Utilities Operational Device Cloud Service Oracle Utilities Operational Device Cloud Service is a cloud-based solution used to maintain information about assets and various features and functions around managing those assets. The solutions provides a means of recording asset acquisition, maintenance, procurement, installation and removal, and so on.

Oracle Utilities Operational Device Cloud Service comprises the following functional areas:

•

Oracle Utilities Operational Device Cloud Service provides functionality to manage the receipt, installation, maintenance, tracking and removal of assets.

•

Oracle Utilities Operational Device Cloud ServiceOracle Utilities Operational Device Cloud Service Analytics (via Oracle Utilities Analytics Cloud Service)

•

Provides a business intelligence environment to manage and monitor the performance of your organization. This includes the analytics content (Dashboards) delivered out-of-the-box.

Please refer to the respective product documentation for more information.

Oracle Utilities Operational Device Cloud Service Overview - 1

Oracle Utilities Operational Device Cloud Service Overview Guide Documentation

Oracle Utilities Operational Device Cloud Service Applications Oracle Utilities Operational Device Cloud Service includes the following Oracle Utilities applications:

•

Oracle Utilities Operational Device Management v2.1.1 SP 1

•

Oracle Utilities Operational Device Management Analytics for v2.6.x

•

Oracle Utilities Operational Device Management Extractors and Schemas for v2.6.x

•

Oracle Utilities Integration for Device Operations

Documentation

The following documentation is available to support the product: Configuration and User Documentation

•

Oracle Utilities Work and Asset Management and Operational Device Management Business User Guide

•

Oracle Utilities Work and Asset Management and Operational Device Management Administrative User Guide

Oracle Utilities Analytics Documentation

•

Oracle Utilities Analytics Administration Guide

•

Oracle Utilities Analytics Dashboards for Operational Data Analytics, Metric Reference Guide

•

Oracle Utilities Extractors and Schema for Operational Data, Data Mapping Guide

Oracle Utilities Operational Device Cloud Service Overview - 2

Oracle Utilities Operational Device Cloud Service Overview Guide Supported Integrations

Supported Client Platforms and Browsers

This section details supported client platforms and browsers.

Users access Oracle Utilities Operational Device Cloud Service via a web browser. Oracle Utilities Operational Device Cloud Service supports the following operating system/web browser combinations:

Web Browser

Operating System

IE 11

Windows 7

Firefox ESR 45

Windows 8.1

Windows 10

Safari iPad2

iOS

9.2

Supported Integrations

Oracle Utilities Operational Device Cloud Service requires integration with a host application which sends activities and other information. Oracle Utilities Operational Device Cloud Service can also integrate to non Oracle Utilities products, such as a Customer Information Management, Customer Relationship Management, Asset Management System, etc. via a custom integration.

Integrations include:

Oracle Utilities Product

Versions

Integration Products

Oracle Utilities Analytics (via Oracle

2.6.x

•

Oracle Utilities Operational Device

Utilities Analytics Cloud Service)

Management

•

Oracle Utilities Analytics

Oracle Utilities Integration for

SOA 12.1

•

Oracle Utilities Operational Device

Device Operations

Management

•

Oracle Utilities Meter Data Management

Oracle Utilities Operational Device Cloud Service Overview - 3

Oracle Utilities Operational Device Cloud Service Overview Guide

Document Outline

- Contents

- Oracle Utilities Operational Device Cloud Service Overview

- Welcome to Oracle Utilities Operational Device Cloud Service

- Oracle Utilities Operational Device Cloud Service Applications

- Documentation

- Supported Client Platforms and Browsers

- Supported Integrations

Table of Contents

Oracle Utilities Operational Device Cloud Service Overview..........................................

Oracle Utilities Operational Device Cloud Service Applications. . . . . . ..........................

Supported Client Platforms and Browsers ............................................................

Contents